en	Your CSR “ ” already has the same “ ” ( ) as the new CSR. Each CSR’s “ ” must be unique.

en	Your Disk Usage Limit is calculated based on how much disk space all your accounts have been allocated.

en	Your Disk Usage Limit is calculated based on how much disk space all your accounts have used.

en	Your Email

en	Your IP address ( ) does not host an SSL website with the domain “ ”.

en	Your IP address ( ) is shared with other users. You cannot set a primary website unless you have a dedicated IP address.

en	Your IP address has changed. Please log in again.

en	Your IP address is shared with other users. You cannot set a primary website unless you have a dedicated IP address.

en	Your Name

en	Your Name:

en	Your Perl script needs to know how to find the modules in your path.

en	Your Ruby on Rails application “ ” has been deleted.

en	Your Version Is Expiring

en	Your Web Disk account password.

en	Your WordPress site is being created.

en	Your version ( ) has reached status. Upgrade now to prevent security and compatibility problems.

en	Your version ( ) will reach status soon. Upgrade now to prevent security and compatibility problems.

en	Your key imported successfully.

en	Your database is not complete: The “ ” table does not exist.

en	Your session has expired.

en	Your Config file is missing info.

en	Your server now runs on .

en	Your account exceeds its disk quota. You cannot add or edit users.

en	Your config file is missing information for your account.

en	Your account contains the maximum number of email accounts that you can create. To create more email accounts, delete any unwanted email accounts or contact your hosting provider.

en	Your account exceeds the maximum allowed mailing lists.

en	Your account has reached its disk usage quota. Because of this, you cannot upload files.

en	Your account is configured to receive notifications when updates for your installs are available.

en	Your account is configured to receive notifications when updates for your installs are available.

en	Your account is not authorized to access this page.

en	Your account is not completely set up. We sent a security code to the email address that you provided. Enter it in the form below.

en	Your account is suspended. Please contact the billing or support department or your server administrator.

en	Your account owner has set an auto-delete threshold of . You can use that threshold or set a lower one for your own account, but you cannot disable the auto-deletion.

en	Your account uses the following server to perform mail services: “ ” ( ). All accounts that you create will use this configuration.

en	Your account will automatically upgrade to the theme soon. For more information, read our blog post.

en	Your account “ ” is already associated with an existing “ ” account. Please log in to connect a new account.

en	Your account “ ” is not associated with an existing “ ” account. Please log in to connect the account.

en	Your account’s language is set to “ ”.

en	Your account’s nameservers are not updated.

en	Your account’s nameservers have been set to .

en	Your account’s nameservers inherit ‘s nameservers.

en	Your account’s nameservers were not updated:

en	Your account’s password has been reset.

en	Your account’s password:

en	Your addon domain limit of has been reached. The addon domain was not added.

en	addon domain

en	addon domains

en	Your administrator or hosting provider has globally enabled update notifications.

en	Your answers have been saved.

en	Your app is NOT installed because there was a problem. Try again or contact our support team.

en	Your app is installed, its name is “ ”.

en	Your app, , has been changed to development mode. You will need to restart the app for changes to take effect.

en	Your app, , has been changed to production mode. You will need to restart the app for changes to take effect.

en	Your application could not be deleted.

en	Your application is incomplete or invalid.

en	Your application name cannot be longer than 15 characters.

en	Your browser failed to load “ ” because of an error ( ):

en	Your browser failed to parse a certificate from “ ” because of an error:

en	Your browser failed to parse a key from “ ” because of an error:

en	Your browser failed to parse “ ” as because of an error:

en	Your browser may have blocked the request, or your connection may be unstable

en	Your certificate for “ ” (ID: ) already has the same “ ” ( ) as the new certificate. Each certificate’s “ ” must be unique.

en	Your certificate will expire in .

en	day

en	days

en	Your certificate “ ” already has that “ ”. Each certificate’s “ ” must be unique.

en	Your change affects the following account services:

en	Your computer is unable to contact . Check the connection to your server and reload your browser.

en	Your configuration changes have been successfully saved.

en	Your configuration insert blocks may need updating. An outdated configuration may impact some functionality with this version of .

en	Your contact email address. For example, .

en	Your cron entry for “ ” has been successfully saved.

en	Your current IP address is “ ”.

en	Your current IP address “ ” is not on the whitelist.

en	Your current configuration is not compatible with this version of due to incompatible configuration insert or replace blocks from .

en	Your current configuration is not compatible with this version of due to the existence of incompatible configuration insert blocks.

en	Your current configuration is not compatible with this version of .

en	Your current custom block configuration is not compatible with this version of .

en	Your current custom configuration is not compatible with this version of , or contains errors.

en	Your currently active mail client is “ ”.

en	Your database does not appear to use the storage engine. We recommend lowering the key buffer size to save memory.

en	Your database is reporting a high number of JOINs performed without indexes. The best way to get faster JOINs is to add indexes. The system will recommend a higher or lower Join Buffer Size based on the size of your system memory. We do not recommend exceeding 2M.

en	Your document root is not empty. Remove any files and try again.

en	Your domain‘s current is more complex than what the interface supports. This interface only supports the addition of “Pass” mechanisms. The editor will attempt to preserve other mechanisms.

en	Your email address cannot contain more than characters.

en	Your email address.

en	Your entry must be a domain name (e.g. example.com).

en	Your file match the naming schema.

en	Your file name and any directory names must be less than or equal to 255 bytes.

en	Your full file path must be less than or equal to 4096 bytes.

en	Your hosting provider disabled the “ ” .

en	Your hosting provider enables this feature by default. You disable this feature.

en	Your hosting provider has not enabled any Webmail clients.

en	Your hosting provider moderates installations for the .

en	Your hosting provider must enable either the “ ” or “ ” features to perform this action.

en	Your hosting provider must enable the to perform this action.

en	feature

en	features

en	Your hosting provider must enable the feature to perform this action.

en	Your hosting provider must enable the “ ” feature to perform this action.

en	Your hosting provider must enable the “ ” feature to add or modify cPanel-generated records. Currently, only the “ ” feature is enabled for your account.

en	Your hosting provider must enable the “ ” feature to perform this action. Currently, only the “ ” feature is enabled for your account.

en	Your hosting provider recommends .

en	Your hostname cannot be less than eight characters.

en	Your hostname cannot be null.

en	Your hostname cannot begin or end with a hyphen.

en	Your hostname cannot begin or end with a period.

en	Your hostname cannot begin with “ ”.

en	Your hostname cannot contain any spaces.

en	Your hostname must be a .

en	Your hostname must contain at least two periods.

en	Your hostname must contain at three unique sections split by periods.

en	Your image has been scaled to the new dimensions: “ ”.

en	Your images have been converted.

en	Your images have been thumbnailed into

en	Your key buffer has come under heavy use historically. We recommend increasing this value to facilitate the increased load.

en	Your key buffer’s size is larger than our recommended maximum. You should reduce the size to avoid paging.

en	Your key “ ” already has that “ ”. Each key’s “ ” must be unique.

en	Your key “ ” already has the same “ ” ( ) as the new key. Each key’s “ ” must be unique.

en	Your license was not purchased from , !

en	Your login credentials are listed below:

en	Your main account gives FTP access to all files in your web hosting account.

en	Your nameserver setup in is invalid. Please enter at least two nameservers there before attempting to create an account.

en	Your neighboring addresses are not in the Trusted Hosts list.

en	Your new account username is “ ”.

en	Your new contact email been saved.

en	address has

en	addresses have

en	Your new password.

en	Your new settings have been saved.

en	Your new website, “ ”

en	Your notification settings have changed.

en	Your password cannot exceed letters and numbers.

en	Your password does not meet the strength requirements, you must change it now to avoid having your account compromised.

en	Your password does not meet the strength requirements. Change it now to avoid compromised accounts.

en	Your password does not meet the system’s strength requirements. Enter a password with strength rating of or higher.

en	Your password has changed.

en	Your password must contain at least .

en	character

en	characters

en	Your password requires at least letters and numbers.

en	Your password reset security code is:

en	Your previous attempt to change the hostname is still running. Please wait until it completes.

en	Your primary email address changed from “ ” to “ ”.

en	Your primary nameserver. For example, .

en	Your request does not contain the required data or is not in a supported scheme.

en	Your request is invalid.

en	Your search matched of .

en	record

en	records

en	Your secondary email address changed from “ ” to “ ”.

en	Your secondary nameserver. For example, .

en	Your security question answers are saved.

en	Your security questions and answers have been saved.

en	Your selection removed .

en	Your server administrator must enable Full-Text Search Indexing (powered by ) in order for you to use this feature.

en	Your server administrator must enable to use this feature.

en	Your server administrator must enable the service to use this feature.

en	Your server administrator or hosting provider has globally disabled update notifications for all accounts.

en	Your server cannot update because of one or more immutable files.

en	Your server currently accepts messages that originate from servers in .

en	Your server currently blocks messages that originate from servers in .

en	Your server currently runs on version . Your system’s version will reach on . We recommend that you upgrade to the latest version to avoid any disruption in your service. For more information on how to update your version, read our documentation.

en	Your server has copied the defaults from your cache and the configuration defaults file ( ) to , and it has generated the following critical values:

en	Your server has copied the defaults from your cache and the configuration defaults file ( ) to , and it has generated the following critical values:

en	Your server is currently using the deprecated “ ” nameserver. The system will update it to “ ”.

en	Your server is protected by .

en	Your server is protected by .

en	Your server is protected by .

en	Your server may run out of memory if you enable “ ” for multiple users.

en	Your server requires nameservers before you can create or reseller accounts.

en	Your server supports .

en	Your server uses .

en	Your server uses a self-signed certificate. You may receive unverified or untrusted certificate security warnings from your client. To access your calendars and contacts, you trust these self-signed certificates in your calendar and contacts application.

en	Your server will no longer block messages that originate in .

en	Your server will no longer block messages that originate in “ ”, “ ”, “ ”, “ ”, “ ”, “ ”, “ ”, “ ”, “ ”, “ ”, and .

en	other country

en	other countries

en	Your server will now block messages that originate in .

en	Your server will now block messages that originate in “ ”, “ ”, “ ”, “ ”, “ ”, “ ”, “ ”, “ ”, “ ”, “ ”, and .

en	other country

en	other countries

en	Your server will send status and error notifications to this address.

en	Your server’s / service is disabled. You cannot use the feature while your server is in this state. For information on upgrading / on your server, read our documentation.

en	Your server’s / target is set to “ ”. You cannot use the feature while your server is in this state. To allow to manage / on your server, read the .

en	Your server’s / target is set to “ ”. You cannot use the feature while your server is in this state. To allow to upgrade / on your server, read the .

en	Your server’s / version is “ ”.

en	Your server’s current participation setting is DISABLED.

en	Your server’s current participation setting is ENABLED.

en	Your server’s database service is disabled. You cannot use the feature while your server is in this state. For information on upgrading the database version on your server, read our documentation.

en	Your server’s database version is “ ”.

en	Your server’s database version target is set to “ ”. You cannot use the feature while your server is in this state. To allow to manage databases on your server, read the .

en	Your server’s database version target is set to “ ”. You cannot use the feature while your server is in this state. To allow to upgrade the database version on your server, read the .

en	Your server’s one-minute, five-minute, and 15-minute load averages.

en	Your session cookie is invalid. Please log in again.

en	Your session has expired. Please log in again.

en	Your session may have expired or you logged out of the system. again to continue.

en	Your session may have expired or you logged out of the system. again to continue.

en	Your source code exist in a subdirectory within your home directory.

en	Your support provider link:

en	Your sysctl values appear to not be set appropriately for your Apache configuration. To resolve this, please see the documentation on

en	Your system administrator must disable this setting in WHM’s interface to enable the feature.

en	Your system administrator must enable the Site Publisher feature for your account.

en	Your system administrator must enable this setting in WHM’s interface to enable the feature.

en	Your system administrator must manually disable this setting on the command line with the WHM API 1 backup_config_set function to enable the feature.

en	Your system appears to use a Host-Routed networking configuration. Changing the v4 Addresses assigned to your system is restricted to the host node. Please contact your Hosting Provider to make any changes to the v4 Addresses assigned to your system.

en	Your system contains an old configuration. To update your PHP-FPM configuration, read our documentation.

en	Your system may have issues installing this product due to an insufficiently large root partition.

en	Your system may have issues installing this product due to an unsupported Operating System Version.

en	Your system may have issues installing this product due to an unsupported Operating System.

en	Your system may have issues installing this product due to an unsupported Server Type.

en	Your system may have issues installing this product due to insufficient RAM.

en	Your system requires of memory to convert the remaining domains to .

en	Your system uses a single-user license, but there already .

en	is

en	are

en	user

en	users

en	Your system’s utility detected errors. (see the attached file for details). For more information about those errors, read the manual page, the documentation at http://smartmontools.sourceforge.net/, and the developers’ mailing list.

en	Your system’s version ( ) will reach End of Life in .

en	day

en	days

en	Your system’s version ( ) will reach End of Life soon.

en	Your system’s version ( ) will reach in on .

en	day

en	days

en	Your system’s license allows up to , but there already .

en	user

en	users

en	is

en	are

en	user

en	users

en	Your system’s “ ” is too low.

en	Your system’s “ ” setting meets the minimum requirements for the number of accounts on the system.

en	Your ticket is not submitted until you enter the ticket information in the window.

en	Your token name cannot contain more than .

en	character

en	characters

en	Your user-defined rules are included below.

en	Your user-defined rules are not included below.

en	Your username cannot contain more than characters.

en	Your username cannot exceed letters and numbers.

en	Your username requires at least letters and numbers.

en	Your web browser lacks support for a feature that this page requires.

en	Your website is ready. Start adding content and personalizing “ ” now.

en	Your website is ready. Start adding content and personalizing “ ” using .

en	Your websites’ users have consumed of your monthly bandwidth.

en	Your websites’ users have consumed of your monthly bandwidth. When you run out of bandwidth, your websites may be inaccessible until the start of the next month.

en	Your websites’ users have consumed all your monthly bandwidth. Your websites may be inaccessible until the start of the next month.

en	Your “ ” uses the “ ” setting. Your website’s stats may not function.

en	Yours

en	You’re about to delete “ ”.

en	You’re ready to use Site Quality Monitoring.

en	You’re receiving this notification because your server has legacy EasyApache 3 RPMs installed. We removed support for EA3 in version 76.

en	ZB

en	Zebibytes

en	Zettabytes

en	ZiB

en	Zip Archive

en	Zone Editor

en	Zone Information

en	Zone Records for “ ”

en	Zones

en	( )

en	- of

en	- of

en	Configuration

en	Excessive Number of Failed Login Attempts from ( : )

en	Login Security

en	MB quota limit ( MB used).

en	MB total disk space used.

en	Security Advisory

en	Survey

en	Traffic

en	will reach End of Life (EOL) on systems on December 31, 2021. This means that after this date, will no longer provide bug, security, or feature updates to . We encourage you to convert to before December 31, 2021.

en	Library Status:

en	second

en	seconds

en	and are both equivalent to .

en	byte

en	bytes

en	denied access to information that this system needs in order to authenticate you. , but authorize this server to access the information that it requests.

en	did not return an authorization code.

en	did not return the correct validation token.

en	did not send back the token.

en	did not send back the state of the request.

en	does not exist.

en	has a uid 0 account

en	has non default permissions. Expected: , Actual: .

en	has non root user and/or group

en	is disabled.

en	is nearing its limit.

en	is not a valid parameter for services “ ”.

en	is not supported on .

en	is unavailable for your account. This occurred because it is associated with your username, which has changed from “ ” to “ ”.

en	limit exceeded.

en	of user IPv6 addresses are bound.

en	per domain

en	per wildcard domain

en	purchase

en	reached .

en	selected

en	total

en	%

en	, created UTC

en	, has been upgraded. No further action is required on your behalf.

en	, shared

en	: Action required to complete “ ” order.

en	: Changing from “ ” to “ ”.

en	: Install certificate!

en	: Normally would replace the current certificate with one that secures any new domains. However, of the website’s secured domains just failed . When all currently secured domains pass , will request a new certificate that includes all domains that pass .

en	: Normally would request a new certificate that would secure any new domains. However, the domain that the certificate currently secures just failed . That domain pass to enable AutoSSL to request a new certificate. This new certificate will secure all domains that pass .

en	: Potential reduced coverage

en	: Received “ ” response.

en	: Sending “ ” query …

en	: The certificate expires on at .

en	: The certificate renewal may cause a reduction of coverage on at

en	: The certificate expires on at .

en	: certificate expiry on

en	: certificate installed!

en	: reduced coverage

en	: would normally renew this certificate now, but of the website’s secured domains just failed . To provide you with more time to resolve , will defer the renewal until at . After that time, will request a replacement certificate that excludes any domains that fail .

en	this problem

en	these problems

en	: certificate expiry on

en	: certificate installed!

en	: multiple s ( )

en	: “ ”

en	: “ ” → “ ”

en	:: ( ) produced :

en	error

en	errors

en	:: ( ) produced an operating system error ( , ) and :

en	error

en	errors

en	Traffic

en	has reached .

en	will reach soon.

en	Only

en	and Extensions

en	selection

en	–alias of ‘ ’

en	’s “ ” mismatched ( ). Records of the same name and type must always have the same value.

en	records have

en	values

en	is not available on or earlier. Please upgrade to a more recent OS or install with the . See for installation instructions using .

en	OS is the only commercially-supported Linux operating system optimized for your needs, ensuring spikes in resource usage won’t take down an entire server.

en	s required:

en	support is not enabled.

en	Token

en	Token Expiration Date

en	Token Name

en	Tokens

en	key used has insufficient . The is required.

en	token names can be alpha-numeric and can contain dashes and underscores.

en	tokens allow you to log in to your server without the need for a password. You can use an token to authenticate with ’s remote . If you use a remote billing solution, you will need to set up an token on all of your servers. For more information, read our .

en	tokens are now available in .

en	Record

en	Records

en	Reference

en	Port:

en	Settings (for )

en	/ Settings (for )

en	has been disabled.

en	has been enabled.

en	is .

en	is .

en	’s makes s like “ ” resolve to the indicated user’s (for example, the user “ ”’s) primary web virtual host.

en	Web Server

en	Tweak

en	handler names must include a hyphen (for example, handler name

en	’s Installed SSL Resource

en	’s Installed SSL Resources

en	Registration Notifications

en	Execution

en	Certificate

en	Domain Validated

en	Logs

en	Notifications

en	Options

en	Providers

en	Setting

en	Statuses:

en	can confirm management status for only of this user’s .

en	domain

en	domains

en	cannot confirm management status for any of this user’s .

en	domain

en	domains

en	cannot increase “ ”’s coverage.

en	cannot proceed at this time. Its next run will continue where this process stopped.

en	cannot request a certificate because all of the domains on the website have failed .

en	cannot request a certificate because all of the website’s domains have failed .

en	cannot secure any domain without confirming its management status.

en	defers certificate renewal because a domain on the current certificate has failed . The system only sends this notification when a certificate is in the latter half of its renewal period.

en	did renew the certificate for “ ”.

en	failures and deferrals only. (default)

en	failures only.

en	has deferred normal certificate renewal because a domain on the current certificate has failed .

en	has deleted the expired log for the provider “ ” from ( ).

en	has installed a certificate successfully.

en	has provisioned a new certificate for a dynamic domain.

en	has renewed a certificate, but the new certificate lacks at least one domain that the previous certificate secured.

en	has renewed a certificate, but the new certificate lacks one or more of the website’s domains.

en	has renewed “ ”’s Domain Validated (DV) certificate. The new certificate lacks of the website’s domains:

en	has successfully renewed the Domain Validated (DV) certificate for “ ”. The new certificate lacks the following that the previous certificate secured:

en	domain

en	domains

en	is disabled.

en	is in progress …

en	is now checking all users. The process has “ ”.

en	last ran on .

en	on “ ” has provisioned a new certificate for your dynamic domain “ ”. Install this certificate onto any devices that host -secured services from that domain.

en	provider’s redirect limit:

en	will attempt to secure the domain the next time it runs.

en	will attempt to secure the domain when the parent domain “ ” renews.

en	will attempt to secure this website, but the domain will be excluded.

en	will be unable to provision new free certificates once the provider no longer functions.

en	will not secure a new domain because a domain on the current certificate has failed . The system only sends this notification when a certificate is not yet in the latter half of its renewal period.

en	will not secure new domains because a domain on the current certificate has failed , and the certificate is not yet in the renewal period.

en	will request a new certificate.

en	will try to renew your certificates.

en	will verify status and at a time.

en	user’s

en	users’

en	’s configured provider is “ ”.

en	Destination

en	Blacklist for “ ”

en	Forward List for “ ”

en	Ignore List for “ ”

en	Log for “ ”

en	Whitelist for the account “ ”.

en	failed to locate a home directory for “ ”.

en	failed to locate a mail directory for “ ”.

en	has been disabled on the account “ ”.

en	has been enabled on the account “ ”.

en	lists for “ ”.

en	message for “ ”.

en	queue for the account “ ”.

en	“ ” record created: “ ”

en	authorized: “ ”

en	forbidden: “ ”

en	forbidden: “ ” (alias of “ ”)

en	forbidden: “ ” (via “ ”)

en	forbidden: “ ” (via “ ”, alias of “ ”)

en	Record

en	is installed, and is running.

en	is installed, but is not running.

en	is installed, but appears to be disabled.

en	server did not return a response.

en	and Non Settings

en	and Settings (for and )

en	Version

en	Daemon

en	Virus Scanner

en	is disabled for this account.

en	License Detected

en	Manual Installation Needed on:

en	Manual Installation Needed.

en	failed to parse the stored file for this page “ ”.

en	failed to register the component “ ”. A component with the same identifier already exists.

en	failed to register the component “ ”. You must set the page identifier.

en	failed to retrieve the requested component settings. You must set the page identifier.

en	failed to save the component settings for “ ”. You must set the page identifier.

en	failed to unregister the component “ ”. No such component exists.

en	Daemon

en	Domains

en	Mode

en	Key Details

en	Keys for “ ”

en	can protect clients from various forms of attack, such as or a attack. Visitors’ browsers will compare the server’s record to the record at the registrar. If they match, then the visitor knows that the record is valid. uses digital signatures to strengthen authentication. These digital signatures use public key cryptography to sign the data.

en	is only supported on servers configured with .

en	key synchronization failure

en	key synchronization failure on “ ”.

en	key synchronization failures.

en	Cluster Error

en	Cluster Management

en	Errors Occurred

en	Path Diagram

en	Resolver Performance Issues

en	Role

en	Role Notes:

en	Zone Failed To Load:

en	Zone Removal

en	records forbid “ ” from issuing certificates for any of this user’s .

en	domain

en	domains

en	allows users to create and edit Domain Name System zone files.

en	clustering is disabled.

en	clustering is enabled.

en	clustering separates your main server from the nameservers that handle requests. This helps to prevent downtime and improve server performance.

en	does not contain any addresses for “ ”.

en	resolver failure

en	resolvers respond slowly

en	server may be down.

en	-based also failed.

en	-based failed.

en	Records

en	disabled for:

en	Priority

en	has no domains that are on the service default certificates.

en	maintenance task errors.

en	Server

en	Server

en	Server

en	rejected the request “ ” ( ).

en	allows websites to support 11 and retain compliance with standards.

en	allows websites to support 11 and retain compliance with standards. is more secure than , but may perform slower.

en	is recommended for systems running .

en	keys are smaller than keys of comparable strength. Smaller keys speed up / handshakes by reducing the amount of data sent.

en	“ ”, created UTC

en	- Create a Profile

en	FAQ

en	conflict removed

en	installation instructions.

en	is not installed.

en	is up to date

en	requires . You must upgrade your system to a compatible operating system before you can migrate to .

en	template updated

en	Configuration

en	is software that installs, configures, updates, and validates your web server, PHP, and other components of your web server. allows for automatic updates and uses the system package manager to install and manage software.

en	support is now available with the plugin.

en	Mail Server

en	Mail Server (on another port)

en	Update Failures

en	is disabled on the server which makes ineffective. Use the to enable .

en	Connection to “ ” as “ ” failed because of an error: .

en	Destination

en	Domain

en	Login to “ ” as “ ” failed because of an error: .

en	Quota Reached:

en	Quota Warning:

en	Server

en	accounts

en	allows users to manage the files associated with their site with an client.

en	login to “ ” successful.

en	servers behind firewalls require this setting.

en	version control repositories repository repo master checkout check out branch clone remote source code commit head gitweb history log publish deployment build continuous integration

en	Version Control

en	Database

en	System Changes

en	Report

en	defends email users against spam. When enabled, the mail server will temporarily reject any email from a sender the server does not recognize. If the email is legitimate, the originating server will try again after a delay. After sufficient time has elapsed, the server will accept the email.

en	is

en	is

en	is not enabled for your account.

en	is not enabled on your server.

en	is now disabled.

en	is now enabled.

en	will never defer emails from entries on the Trusted Hosts list.

en	will never defer emails from trusted mail providers.

en	Commit

en	Status Code

en	-based Domain Control Validation failed.

en	-based Domain Control Validation required .

en	redirection

en	redirections

en	Maintenance Notifications

en	Table Conversion Failure

en	relies on PHP 7.4, which reaches End of Life on November 28, 2022. Because of this, we have removed , and the system has automatically migrated all data to . For more information, read our documentation.

en	or address.

en	Information

en	Address

en	Address Check

en	Address-based Protection

en	Address-based protection is currently disabled. will not create new blocks, but existing blocks will remain.

en	Address-based protection tracks login attempts from specific addresses. When disabled, will not block addresses, but existing blocks will remain.

en	Address:

en	Addresses

en	Address

en	Address Prefix

en	address

en	Address

en	Address Prefix

en	Ranges

en	address

en	has enabled.

en	is installed but brute-force attack protection is disabled.

en	is installed but not running.

en	is a free malware scanning tool. You can use it to search for malware on your server.

en	is now available for installation through .

en	Buffer Pool Chunk Size

en	Buffer Pool Instances

en	Buffer Pool Size

en	Log Buffer Size

en	Log File Size

en	Sort Buffer Size

en	Usage

en	Installation

en	is a powerful, cross-platform backup and recovery solution.

en	is installing.

en	(Key Signing Key)

en	is installed, but it uses an unknown patch set.

en	is not available when Secure Boot is active.

en	is not compatible with Secure Boot.

en	was found, but it is not currently active. The system cannot determine the patch set that uses. Please visit support to resolve this issue.

en	Process Limit

en	User Concurrency Limit

en	enabled.

en	not enabled.

en	and Operating Systems …

en	Web Server

en	Web Server Installation

en	is installing.

en	rotation interval (Weeks or Days)

en	rotation size ( )

en	Entry Editor

en	Record

en	failed to regenerate the archives for the list “ ” because of an error:

en	failed to regenerate the configuration for the list “ ” because of an error:

en	system variables reference

en	/ Database Name

en	/ Username

en	is disabled for all of your domains.

en	is disabled for one or more of your domains. Only disable while you troubleshoot a problem with your configuration. Without enabled, your domains lose the extra layer of protection that the module provides.

en	is enabled for all of your domains.

en	is enabled for some domains.

en	is not enabled on your server. You cannot manage vendors with disabled. Please refer to this document on .

en	is not enabled on your server. You cannot manage vendors with disabled. To enable go to and select as an option when attempting to rebuild .

en	is not enabled on your server. You cannot set global configuration properties with disabled. Please refer to this document on .

en	is not enabled on your server. You cannot set global configuration properties with disabled. To enable go to and select as an option when attempting to rebuild .

en	vendors group related rules into separate configuration files. Select the configuration files you want to enable or disable for your system.

en	FAQ

en	Specification Reference

en	is not enabled for your account.

en	is not enabled on your server.

en	is not enabled on your server. With disabled, you can view historic data in the log. However, you will not get updated log data or be able to configure custom rules. Please refer to this document on .

en	is not enabled on your server. With disabled, you can view historic data in the log. However, you will not get updated log data or be able to configure custom rules. To enable go to and select as an option when rebuilding .

en	Auto Configuration:

en	Editor

en	Manager

en	Zone Import Failure

en	Zone Import In Progress

en	Zone Import Successful

en	is deprecated and we will remove it in a future release.

en	is no longer supported. Please choose another nameserver configuration.

en	zone import successful.

en	Database

en	Database Server

en	Databases for “ ”

en	Information

en	Server

en	User

en	Users for “ ”

en	check for anonymous users

en	created a file but failed to start.

en	failed to start.

en	is sane.

en	system variables reference

en	test database does not exist.

en	test database exists.

en	version or later must run on the server. The installed version is .

en	/ Upgrade

en	/ Upgrade (Step of )

en	/ authentication failed, and the system could not reset the / password

en	/ authentication failed. The system could not reset the remote / password

en	/ is a commonly-used relational database management system that is a core service on most systems. This interface allows you to upgrade your / server to a newer version. will automatically upgrade your / installation to newer point releases (the third digit in the version string) because these upgrades involve little risk to your users’ data. Upgrades to new major releases (the first two digits in the version string) are more involved because there is a substantial risk of data loss. This interface attempts to walk you through the major release upgrade process.

en	/ is not enabled on this system. Restoring only the user’s grants file …

en	/ server access restored.

en	Server

en	Web Server

en	cache is active.

en	cache is inactive.

en	caching for the system set to off.

en	caching for the system set to on.

en	caching is disabled for the selected users.

en	caching is disabled for “ ”.

en	caching is enabled for all user accounts. You can change these settings in the Manager interface.

en	caching is enabled for the selected users.

en	caching is enabled for “ ”.

en	caching successfully cleared for the selected users.

en	caching successfully cleared for “ ”.

en	caching successfully cleared.

en	caching

en	configuration successfully rebuilt.

en	reverse proxy is now installed.

en	reverse proxy is now uninstalled.

en	service restarted.

en	standalone package uninstalled. You are now using in reverse proxy mode.

en	DNS Zones Corrupted

en	is deprecated and we will remove it in a future release.

en	is no longer supported. Please choose another nameserver configuration.

en	log preview:

en	Account is over quota.

en	Configuration

en	Configuration Options for the “ ” domain.

en	Conversion has started. Please visit to view the conversion log.

en	Pool options

en	Settings

en	Settings for:

en	User account over quota prevented startup.

en	Settings

en	configuration is updated with the new changes.

en	conversion has started. Click here to view the progress: .

en	is applied to all domains whose versions have extension installed.

en	is disabled on the selected domains.

en	option is disabled because you are missing package. Please refer to the notification above.

en	option is disabled when one or more selections contain PHP version of .

en	option is disabled when one or more selections contain PHP version that doesn’t have corresponding package installed.

en	service for

en	service for Daemons

en	Default:

en	Directive

en	Handler

en	Handlers

en	Handlers do apply to .

en	Version

en	Versions

en	and Configuration

en	versions are not available.

en	Password

en	Library Match Limit

en	Library Match Limit Recursion

en	Database Name

en	Database Server

en	Databases

en	Server

en	Username

en	allows users to create and manage databases.

en	is disabled on this server, so the system will not restore any resources.

en	sent the following warning text upon the restoration of the “ ” database:

en	version “ ” or later is required to restore databases in restricted mode.

en	Configuration updated.

en	recognizes malicious code in real-time and stops malware in its tracks.

en	Settings

en	is more compatible with older clients (for example, browsers older than 11) than . New installations of ship with this setting.

en	is more compatible with older clients (for example, browsers older than 11) than . This is more secure than -bit, but will perform slower than -bit keys.

en	Login from Local Machine.

en	Login from a Known Network IP Address

en	Login from an Unknown Network IP Address

en	Password

en	webmail data

en	Destination

en	via

en	Compatible Destination

en	Destination

en	Restrictions

en	Mode

en	Mode

en	Configuration Error

en	’s “ ” setting is now disabled. The system will now restart to make the changes take effect.

en	Key

en	Key Passphrase

en	Port

en	is not listening on port “ ” for ticket ID “ ” and server “ ”. Access the and update the authentication information or select the correct ticket ID and server.

en	providers can be enabled by the server administrator.

en	Certificate

en	Information

en	Providers

en	Statuses:

en	Types:

en	Validation Types

en	certificate expiry.

en	certificates expiring

en	/ Status

en	/ Wizard

en	Reference

en	Reference

en	enabled value is invalid “ ”. Must be 0, 1, or an empty string.

en	homedir value is invalid “ ”. Must be a valid file path.

en	value is invalid “ ”. Must be an integer, unlimited, or an empty string.

en	value is invalid “ ”. Must be ‘ ’, ‘ ’, or an empty string.

en	value is invalid “ ”. Must be a numeric expression, ‘ ’, or an empty string.

en	value is invalid “ ”. Must be 1 or an empty string.

en	value is invalid “ ”. Must be ‘ ’, ‘ ’, or an empty string.

en	Server (if you choose to disable this, you should disable in the interface as well)

en	Filter

en	Filter allows users to use to identify, sort, and delete unsolicited mail.

en	Cipher Suite

en	Protocols

en	Status: Default Key Type Mismatch

en	Status: Defective

en	Status: Incomplete

en	Status: OK

en	Status: Ready for Renewal

en	Verified

en	Daemon

en	Daemon (Configurable Log Monitoring Service)

en	Drivers:

en	Processing Server

en	Processor

en	encountered an error of type “ ” while parsing the template “ ”:

en	encountered an error of type “ ”:

en	Manager

en	Reference

en	Mailbox Names

en	mailbox names disabled.

en	mailbox names enabled.

en	Reference

en	API version:

en	will transmit your support request directly to

en	’s clustering allows you to synchronize records among multiple or machines.

en	is a single management interface that enables you to easily install, configure, and manage your sites. includes access to the feature-set, including enhanced security, cloning, staging, smart updates, and more.

en	allows users to manage and manipulate files on the server with multiple types of devices.

en	Destination

en	may not be installed; the following directory was not found:

en	may not be installed; the following file was not found:

en	, , and require digest authentication support to be enabled in order to access your over a clear text/unencrypted connection. If the server has an SSL certificate signed by a recognized certificate authority and you are able to make an SSL connection over port 2078, you do not need to enable this.

en	does not support the self-update system and does not allow new installations. , will remove in a future version of .

en	encountered errors outside of . Log into the system via to resolve them, or you can click the “Refresh” button to rebuild the system‘s cache.

en	(Zone Signing Key)

en	runs backups on your server. By default, this script runs at 2:00 AM where the server is located, because this is an off-peak time for most servers. We recommend that you set it to run during off-peak hours, early enough to allow your server to finish backups before peak traffic resumes. If you have backups disabled, the script will immediately exit after it runs.

en	is already disabled.

en	is already enabled.

en	is disabled on the server.

en	Brute Force Protection

en	Configuration Issues

en	Daemon

en	Database Integrity Notices

en	is

en	is

en	is already disabled.

en	is already enabled.

en	is disabled on the server.

en	is now disabled.

en	is now enabled.

en	provides protection from brute force attacks against your web services.

en	: Username-based Protection for local requests

en	Brute Force

en	Login Notifications

en	Notifications

en	and later required on both ends.

en	Task List

en	Commission

en	Configuration

en	FAQ

en	Knowledge Base

en	Version

en	allows hosting providers and users the ability to automate server management tasks while offering your customers the tools they need to manage their sites.

en	version ( ) will reach End of Life in

en	day

en	days

en	version ( ) will reach End of Life soon.

en	version will be the last version to support .

en	version will be the last version that supports . Support for version 110 will end June 30, 2024. We encourage you to to to an or server before June 30, 2024. For more information, read our document.

en	version will be the last version that supports .

en	version “ ” will be the last version to support this outdated version of “ ”.

en	will deprecate the Legacy Backup system in the near future. We recommend that you upgrade to the new Backup system.

en	does not maintain this module. Contact the maintainer for support.

en	is not responsible for any aspect of any third-party modifications available.

en	strongly recommends that you do not restore data from anyone whom you would not trust with root access to the server.

en	provides you with the ability to log in to with your account.

en	API version:

en	Account Password

en	Analytics behavioral data collection is opt-in for other user accounts. User privacy is important to us whenever we gather data. Also, we do not collect individual users’ data without consent. We do not collect information about who users are or the private data related to their accounts.

en	Analytics behavioral data collection is opt-in only. User privacy is important to us whenever we gather data. We do collect data without your consent. We do not collect information about who users are or the private data related to their accounts.

en	Backup

en	Backup (legacy notification)

en	Backup Destination Disabled

en	Backup Destination Disabled (legacy notification)

en	Configuration Checks

en	Curated

en	Daemon

en	Default:

en	Documentation

en	Error Log:

en	File Manager v3 - File Upload

en	L.L.C. loves to hear our customer’s ideas about how to improve our product.

en	License Activation

en	License Checkout

en	Log and Bandwidth Processor

en	Login

en	News

en	News (displayed in the dashboards of all of the accounts owned by your account.):

en	Plugin File Generator

en	Release Notifications

en	Service Subdomains

en	Stats Log:

en	Support

en	Support is requesting temporary access to your server to better assist you with ticket number “ ”.

en	Theme

en	Theme List

en	University

en	Update Failures

en	User:

en	Version

en	Web Disk

en	Web Disk Configuration

en	Web Services

en	Daemon

en	Daemon

en	version:

en	Admin Cache

en	Admin Cache Service

en	WHM FAQ

en	WHM Version

en	End of Life Notice

en	Upgrade Blockers

en	detected a license on the server “ ”.

en	failed to update server software.

en	failed to update.

en	has determined that the following database tables are corrupt:

en	is not responsible for the filesystem service connection, security, or the data passed. Please take appropriate safety measures.

en	now includes ” ” as an . This upgrade has appended “ ” to the names of the binaries in the “ ” directory. The system will replace them with a symlink to the new binaries in the “ ” directory.

en	version change from “ ” to “ ” is blocked

en	’s server configuration file, , was not present the last time it was checked.

en	internal analytics service.

en	account impersonation is disabled.

en	cannot automatically re-establish access to the remote server.

en	does not support on this version of .

en	experienced an unknown error.

en	has upgraded your document to “ ” encoding. Please verify that the file opens correctly in your application.

en	highly recommends that the source server run the same Roundcube database type at least 24 hours to ensure that email accounts using Roundcube will transfer properly.

en	highly recommends that the source server runs the same major version for at least 24 hours to ensure any data conversions have completed.

en	is adding the cron job …

en	is changing the email address …

en	is deleting the cron job …

en	is editing the cron job …

en	moved the configuration file “ ” temporarily to “ ”.

en	no longer supports the hardened kernel. We recommend that you use free symlink protection. In order to enable , you must replace the hardened kernel with a standard kernel. For instructions, please read the document on .

en	removed the mail provider “ ” from the Common Mail Providers list.

en	service certificate warnings

en	strongly recommends that you use the “ ” instead of override templates whenever possible.

en	successfully added the job.

en	successfully deleted the job.

en	successfully updated the email address.

en	users cannot access these features, and other lists cannot grant access to them.

en	will disable the passwords of users who trigger leech protection, suspending them. To reactivate their accounts, reset their passwords.

en	will forward all unrouted email for “ ” to “ ”.

en	-provided Records.

en	does not translate strings. You will need to provide your own translations.

en	is not defined!

en	has been restored.

en	Cache File Out of Date

en	binary is unavailable on the system.

en	trigger devices to check for new messages when a message is delivered to an email account’s INBOX. To add support for this feature to your server, to obtain an mail certificate, and then install it below.

en	Mail Push Notifications ( )

en	client devices must close and the Mail app to enable push notifications after the certificate is installed.

en	for and

en	encountered an internal error:

en	encountered the maximum allowed errors ( ) and will not continue.

en	flags require enclosing brackets.

en	is disabled

en	Critical Errors

en	System Logger Daemon

en	is not defined!

en	execution encountered a fatal error:

en	execution failed with error:

en	System Logger Daemon

en	only accepts relative file paths; “ ” is not a relative path.

en	and Domains

en	All Checks Fail

en	Any Check Fails

en	Please install the “ ” with the settings that I provided.

en	terminate

en	account

en	accounts

en	Show all impacted domains

en	pending

en	why?

en	and elapsed

en	hour

en	hours

en	minute

en	minutes

en	and elapsed

en	hour

en	hours

en	second

en	seconds

en	elapsed

en	hour

en	hours

en	, , and elapsed

en	hour

en	hours

en	minute

en	minutes

en	second

en	seconds

en	and elapsed

en	minute

en	minutes

en	second

en	seconds

en	elapsed

en	minute

en	minutes

en	elapsed

en	second

en	seconds

en	apply kernel updates

en	apply software updates

en	enable quotas

en	use CloudLinux features.

en	* Contained in the mail directory.

en	* Excludes email archives.

en	-- Not Available --

en	-- Select a version --

en	-- Select a group --

en	-- Select a location --

en	- Self Signed -

en	and

en	begins with

en	contains

en	does not begin

en	does not contain

en	does not end with

en	does not match

en	ends with

en	equals

en	is above (numbers only)

en	is below (numbers only)

en	is not above (numbers only)

en	is not below (numbers only)

en	matches

en	or

en	compressed, uncompressed

en	in size or more

en	received ( )

en	transferred this month.

en	/min.

en	… and more

en	require Digest Authentication support to be enabled in order to access your Web Disk over a clear text/unencrypted connection.

en	(auto-generated for “ ” on at )

en	optional.

en	is

en	are

en	authentication.

en	requires

en	require

en	repaired in files.

en	was

en	were

en	reached

en	.

en	dynamic . Because of “ ”, you cannot create a zone with that name.

en	is already a

en	are already

en	domain

en	domains

en	this domain is a subdomain

en	these domains are subdomains

en	“ ” .

en	is not a valid

en	are not valid

en	value

en	values

en	valid .

en	is not a

en	are not

en	column

en	columns

en	failed during maintenance.

en	A task

en	Tasks

en	omitted because of the per-certificate domain limit:

en	Domain

en	Domains

en	:

en	Domain

en	Domains

en	( ) for certificate # the website “ ”.

en	The given domain

en	None of the given domains

en	does not match

en	matches

en	not correspond to the filesystem and probably should not exist. Do you want to delete ?

en	This entry does

en	These entries do

en	it

en	them

en	on the source server. Restricted Restore does not allow the transfer of reseller privileges. After the system restores the , you can assign reseller privileges in WHM’s Reseller Center interface ( ).

en	This user is a reseller

en	These users are resellers

en	user

en	users

en	on the source server. To transfer an account’s reseller privileges from the source server, edit the for the desired above. Be aware that reseller privileges can give users special permissions, including full root access, to your server.

en	This user is a reseller

en	These users are resellers

en	account

en	accounts

en	:

en	URL

en	URLs

en	:

en	Warning

en	Warnings

en	:

en	subdomain

en	subdomains

en	for the following available, and the system has installed :

en	A certificate

en	Certificates

en	website was

en	websites were

en	it

en	them

en	.

en	.

en	.

en	(Default)

en	( )

en	CPU

en	CPUs

en	MB

en	exceeds the maximum value ( ).

en	is too low. The minimum value is .

en	of configuration cluster servers received your updated settings.

en	of the that you have entered that you do not control.

en	domain

en	domains

en	is a domain

en	are domains

en	unexpected for this address:

en	value exists

en	values exist

en	% ( of )

en	-bit

en	-bit , created UTC

en	-bit encryption is too weak to provide adequate security. This system will only generate keys with at least -bit encryption.

en	Access

en	%

en	Status:

en	OK

en	Status:

en	Cluster Error with peer “ ”.

en	commands for these servers are currently being queued.

en	Clustering

en	Server

en	key synchronization failure for “ ”.

en	keys were recently synchronized to the Cluster for the zone “ ”. Some cluster members don’t currently serve records for this zone. This may cause failed resolution if your server queries these nameservers.

en	Certificate

en	Certificate

en	Click-Through Status:

en	s

en	Server

en	password change could not be queued.

en	password change has been queued.

en	Full-Text Search Indexing (powered by ) provides fast search capabilities for mailboxes. This significantly improves the speed and convenience of the search experience for devices, , , , and users.

en	Server

en	Address

en	Address Settings

en	Aliases

en	address-related problem detected.

en	Server

en	indicates that this website’s certificate is revoked.

en	Certificate

en	Callback Status:

en	Status:

en	Server

en	disk error detected.

en	Port:

en	Server

en	Daemon

en	Site Management

en	/Certificate Generator

en	certificate

en	Verified

en	:

en	: -

en	requires and to be enabled.

en	Port:

en	Type Added

en	Types

en	Extensions

en	Versions

en	Port:

en	Group Restrictions

en	Restrictions

en	Cipher List

en	Minimum Protocol

en	( )

en	Target

en	is required.

en	(DEPRECATED)

en	Documentation

en	Documentation

en	Documentation

en	has detected a manual hostname change.

en	is corrupt or invalid.

en	execution failed with a “ ” signal and an “ ” error:

en	failed because it took longer than .

en	second

en	seconds

en	failed because it went without reading any data.

en	second

en	seconds

en	Add

en	:

en	:

en	:

en	:

en	“ ”

en	:

en	Two servers that attempt to write changes to a matching record on the same remote server will cause a conflict and may corrupt data.

en	: If you do not disable leech accounts, you may receive a large number of these emails.

en	: The addon domains feature has been disabled.

en	: The parked domains feature has been disabled.

en	: You logged in with the reseller or password.

en	: Certain spam score testing keywords may offend some users. Proceed with caution.

en	security tokens are disabled. This server is currently vulnerable to cross-site request forgery and cross-site scripting attacks.

en	require authorization.

en	domains have been found.

en	(Bad request)

en	(Authorization required)

en	(Payment required)

en	(Forbidden)

en	(Not found)

en	(Method not allowed)

en	(Not acceptable)

en	(Proxy authentication required)

en	(Request timeout)

en	(Conflict)

en	(Gone)

en	(Length required)

en	(Precondition failed)

en	(Request entity too large)

en	(Request URI too large)

en	(Unsupported media type)

en	(Request range not satisfiable)

en	(Expectation failed)

en	(Unprocessable entity)

en	(Locked)

en	(Failed dependency)

en	(Internal server error)

en	(Not Implemented)

en	(Bad gateway)

en	(Service unavailable)

en	(Gateway timeout)

en	(HTTP version not supported)

en	(Variant also negotiates)

en	(Insufficient storage)

en	(Not extended)

en	Odd-numbered builds are development builds. install them in a production environment. They change often and we may not have fully tested or documented them yet.

en	:

en	before converting character sets, since this action can produce unexpected results.

en	.

en	This server is running on a development license. If this server is being used in a production environment, please notify immediately.

en	: This token expired on .

en	item (“ ”, line ):

en	The system failed to disable this provider module for the service “ ” because of an error:

en	.

en	The system does not support the “ ” language.

en	This feature, “ ”, is not enabled on your account. Please contact your reseller for access.

en	This feature, “ ”, is not enabled on your account. Please contact your reseller for access. You will be redirected to the home page.

en	Your account has not enrolled in Site Quality Monitoring. Redirecting to the signup form.

en	:

en	: Some file permissions were set improperly.

en	: The system failed to apply the style you selected.

en	: The system failed to set the default style.

en	: The system was not able to find the trash index file.

en	: You have selected of . Either deselect an account to transfer, or deselect its corresponding “ ” field.

en	available IP address

en	available IP addresses

en	: You have selected that will not complete properly because of .

en	account transfer

en	account transfers

en	a domain conflict

en	domain conflicts

en	: You have selected that will not complete properly because the already on the local server.

en	account transfer

en	account transfers

en	username

en	usernames

en	exists

en	exist

en	: Your contact information and preferences have not been updated:

en	Misuse of command line tools can corrupt or even destroy your data.

en	Misuse of command line tools can destroy data or even render your server unusable.

en	To filter all mail that has marked as spam, just choose “ ” and “ ”, then enter “ ” in the box.

en	: To filter all mail that has marked with a spam score of 5.0 or greater, choose and , then enter “ ” in the box (Note: If you wanted to match a spam score of 4, you would use `. A spam score of 3 would be , etc).

en	:

en	.

en	The setting should not be an email address at “ ”.

en	This will irrevocably remove the following accounts:

en	: At this time is not supported and can cause a broken environment.

en	: Selecting the wrong initial encoding may corrupt the file.

en	: Users must log into cPanel and use the Remote Database Access feature to set up access from these hosts. After you have done this, if you would like to configure access from all users’ accounts .

en	: Users must log into cPanel and use the Remote feature to set up access from these hosts. After you have done this, if you would like to configure access from all users’ accounts .

en	If you need to remove support’s access to your system, and you do not have a Customer Portal account, use WHM’s interface.

en	: Make sure that the following addresses may connect to your server:

en	You are logged in as a reseller or root user.

en	You are logged in with the reseller or root password.

en	: If you authorize a key that is identical to other keys, those keys may also become authorized.

en	: You select the “Allow direct requests” checkbox when you use hotlink protection for files that you want visitors to view in (for example, Users).

en	:

en	:

en	: This will remove ALL files within the trash directory!

en	Automatic detection is possible if the configured records do not resolve.

en	Click a number to view more bandwidth information for that day. This only covers bandwidth information for the past 30 days.

en	Click a number to view more bandwidth information for that day. This only covers bandwidth information for the past .

en	day

en	days

en	Domains must be registered with a valid registrar and configured to point to your DNS servers before they can be used as an alias.

en	Extensions are installed directly from the PECL repository.

en	Gems are installed directly from the RubyForge repository.

en	IP addresses on the blacklist can never log in to your server.

en	IP addresses on the whitelist can always log in to your server.

en	If you change your password, you will end your current session.

en	Modules are installed directly from the CPAN repository.

en	Packages are installed directly from the PHP Extensions and Applications repository (PEAR).

en	The number of “parent” domains excludes the “ ” domains because the system automatically includes them during purchase if they pass .

en	The system will delete this user’s email messages from the server. This will not affect any messages previously downloaded to the user’s devices.

en	To manage records, use the new .

en	Users can enable login notifications in the Contact Information area inside of .

en	When you install this application, you agree to the License Terms.

en	You can set the password for this account at the following URL:

en	You don’t have a dedicated IP address. Browsers that were released before 2013 may not support . Because of this, users may see false security warnings when they visit your SSL-secured websites.

en	You don’t have to import both keys. It is perfectly acceptable to just import a public OR private key if that is all you need on the server.

en	characters max.

en	max.

en	character

en	characters

en	: A rebuild of this database is in progress. Search results may be incomplete.

en	: By default, the root password is set to a random string. You should set this to something that is very hard to guess. You do not need to remember this password unless you plan to connect manually to as the root user.

en	: By default, the database root password is set to a random string. You should set this to something that is very hard to guess. You do not need to remember this password unless you plan to connect manually to the database server as the root user.

en	: For your protection, the server sent this email to all of the contact email addresses that you associated with your account.

en	: If a package name is by a reseller’s username and an underscore, that reseller can see the package.

en	: If you do not select a checkbox, the system will operate in authentication-only mode.

en	: Queries can only return a maximum of per type.

en	entry

en	entries

en	: Restricted Restore performs additional security checks on the backup file. If a component of the backup file has a security issue, the system will not restore that portion of the backup.

en	: The rebuild of this database that started on at is still in progress. The process ID is “ ”. Search results may be incomplete until the rebuild finishes.

en	: This change does affect accounts that already exist. These accounts can be updated to the new shared IP using the “ ” interface.

en	: This interface does not enforce database prefixing. It is possible to rename a prefixed name to a non-prefixed name, but the ownership will not change.

en	: To avoid any issues, it is strongly recommended that you update your corresponding “.local” when you see these notifications in future.

en	template

en	templates

en	: To password protect directories that are inside public_html, go to the area.

en	: You can specify denied IP addresses in the following formats:

en	: You must remove one of the packages manually to resolve this conflict.

en	: You must select a protocol in the Protocols Enabled section before selecting IPv6 Enabled.

en	: ’s Webmail system requires in order to function.

en	: is required and you cannot disable it.

en	valid if sum at that link is .

en	: You can use this field to provide a description for this private key.

en	for — Lines: Words: Size:

en	Supports server restoration.

en	version for your operating system.

en	Add to local disk and restore?

en	Overwrite and restore?

en	: We strongly recommend that you do not select this option. This option causes Apache to log every transaction, including your users’ and clients’ private data. The resulting log files will fill your system’s file partitions quickly.

en	This role may grant access to account-level functionality. Only grant this role to users that you trust to access and modify your account.

en	- of items

en	- of

en	domain

en	domains

en	- of .

en	domain

en	domains

en	- of

en	item

en	items

en	of

en	domain

en	domains

en	of

en	website

en	websites

en	: Select what you would like to import.

en	: Locate CSV or XLS file on your computer.

en	The system removed two-factor authentication from your account.

en	Two-factor authentication is now configured on your account.

en	: Your contact information and preferences have been updated.

en	: “ ” has been created.

en	This copy is a trial version and will expire at the end of the trial term. You will need to upgrade to a paid copy to continue using the software after that term.

en	API function calls may change or delete data on your server, which can cause your server to fail. Read the function call’s documentation thoroughly before you use it in the API Shell, a script, or through any other method.

en	This feature operates on the live system.

en	Do update your child node’s hostname after you link two nodes. This operation could corrupt the nodes’ ability to communicate.

en	Enabling this option will prevent it from being used for account and/or system backups.

en	Exercise extreme caution if you select this setting.

en	If you suspect your server is root compromised, do not use this functionality. Contact support directly by using the .

en	Please wait for to finish before creating one account.

en	System Backups contain sensitive security details and should not be transferred over non-encrypted methods.

en	System Backups contain sensitive security details.

en	The address for the converted addon domain will change. Review any settings that may be affected.

en	The following email account(s) have issues with their quota(s):

en	The following email account(s) have quota issues:

en	The server is configured to receive updates from the beta network.

en	This account has reached its disk usage quota.

en	This account has reached the maximum disk usage quota.

en	This account has reached the maximum disk usage quota. Use to delete unused files or contact the system administrator.

en	This action will result in account data loss. use this procedure in an emergency situation.

en	This allows into all user interfaces.

en	This allows a reseller to bypass account package limits if you do not use resource limits.

en	This allows a reseller to bypass many zone modification restrictions.

en	This allows an token user to change account passwords and login with the new password

en	This feature grants access to account-level functionality. Only grant this permission to users that you trust to access and modify your account.

en	This installer only works for the legacy Ruby installation and does not affect applications that you install with the “ ” interface.

en	This interface is and will be removed in a future release.

en	This interface is deprecated and will be removed in a future release.

en	This privilege allows an token user to bypass restrictions that you set on the token.

en	This will overwrite your current configuration; any existing configurations will no longer produce valid security codes.

en	Too many results were found from your search. Not all results were displayed. Please try a more specific search

en	Users will need to keep an eye on their BoxTrapper Queues to ensure that mail they wish to receive is not trapped.

en	You must your server to start using .

en	You need to have a good knowledge of Linux commands before you can use cron jobs effectively. Check your script with your hosting administrator before adding a cron job.

en	Your server run out of memory if you enable PHP-FPM on all domains and accounts. Make certain that your server possesses enough memory to continue, or you experience severe data loss.

en	Your system administrator enable shell access to allow you to view clone .

en	:

en	: Hostname Lookup Error

en	: Hostname Resolution Mismatch

en	: The reached .

en	version

en	versions

en	has

en	have

en	: The “ ” option is disabled in “ ”.

en	: The “ ” option is enabled in “ ”.

en	: There are no granted support tickets for this server, but the Revoke process did not remove support’s addresses from the server’s firewall rules.

en	: There are open support tickets with access granted on this server, but the firewall rules added during in the grant process are missing.

en	: This token will expire on .

en	: This allows a reseller to bypass account creation limits on features such as dedicated addresses and disk usage.

en	: When a support ticket has been closed, immediately revoke support’s access to your server.

en	: When you select the Service Transfer Tool feature, the system will migrate configurations listed below and overwrite any existing configurations on the server. Do use this feature unless you wish to import configurations from another server.

en	: You currently use out of

en	: You currently use out of accounts.

en	: You have no available addresses on your local machine.

en	: You have selected which previously had a dedicated address but you have chosen not to assign one after transfer.

en	account

en	accounts

en	: You selected that use on the source server. The local server does not support . To resolve this issue, disable for each account before you attempt the transfer.

en	account

en	accounts

en	: Your operating system is masquerading as “ “. It is not recommended for production environments.

en	: Your system’s version has reached .

en	: .

en	version

en	versions

en	is

en	are

en	: v , for , is experimental software and is not recommended for production environments.

en	is not my email address

en	provides the most recent stable versions of PHP. If you require legacy versions of PHP, such as PHP , provides hardened and secured versions that are patched against all known vulnerabilities. To learn more about Advanced PHP Features, please read .

en	.

en	Destination

en	to download the log file.

en	.

en	for $ /month.

en	.

en	for $ /month.

en	.

en	and reload the URL, making sure that the section of the URL remains the same.

en	.

en	Destination

en	.

en	.

en	for free.

en	to ensure the system benefits from these updates.

en	.

en	. If the problem persists, check the boot configuration.

en	.

en	for is now available!

en	.

en	will now be transparently rewritten to ( ).

en	Account

en	Accounts

en	Autoresponder

en	Autoresponders

en	Certificate

en	Certificates

en	Day

en	Days

en	Domain forwarder

en	Domain forwarders

en	Email account

en	Email accounts

en	Email forwarder

en	Email forwarders

en	Forwarder

en	Forwarders

en	Month

en	Months

en	Package

en	Packages

en	Recommendation

en	Recommendations

en	Server Configuration

en	Server Configurations

en	Vendor

en	Vendors

en	Year

en	Years

en	this linkage. The system cannot delete a linkage that is in use.

en	account uses

en	accounts use

en	this format.

en	account

en	accounts

en	No accounts

en	uses

en	use

en	selected.

en	account

en	accounts

en	queued

en	additional task

en	additional tasks

en	altered item

en	altered items

en	found.

en	backup

en	backups

en	bit

en	bits

en	( …)

en	bit

en	bits

en	byte

en	bytes

en	or “ ” ( )

en	consecutive digit

en	consecutive digits

en	dangerous item

en	dangerous items

en	ago

en	day

en	days

en	ago.

en	day

en	days

en	from now

en	day

en	days

en	that should be removed or replaced. Run the following command to do this:

en	domain has a certificate

en	domains have certificates

en	on “ ”. Delete , then try again.

en	dynamic DNS domain depends

en	dynamic DNS domains depend

en	that domain

en	those domains

en	occurred:

en	error

en	errors

en	while creating archive files.

en	failure

en	failures

en	updated in “ ”.

en	file was

en	files were

en	No files were

en	hour

en	hours

en	. The system may be misconfgured and will not try again.

en	installation attempt has failed

en	installation attempts have failed

en	.

en	item still remains

en	items still remain

en	been queued for deletion from the outgoing mail queue.

en	message has

en	messages have

en	minute

en	minutes

en	required for “ ”:

en	parameter is

en	parameters are

en	record

en	records

en	match.

en	record

en	records

en	, per record

en	record

en	records

en	field

en	fields

en	second

en	seconds

en	left

en	second

en	seconds

en	generated warnings while checking SSL certificates.

en	service

en	services

en	skipped item

en	skipped items

en	on this server, but the current license allows only .

en	user exists

en	users exist

en	user

en	users

en	feature list “ ” setting overridden and now set to “ ”

en	user has had its

en	users have had their

en	is

en	are

en	feature list “ ” setting reset to use the setting established by feature

en	user has had its

en	users have had their

en	its

en	their

en	list

en	lists

en	this version of PHP. If you remove this PHP version, your virtual hosts may not work properly.

en	virtual host currently uses

en	virtual hosts currently use

en	warning

en	warnings

en	ago.

en	week

en	weeks

en	old or more

en	year

en	years

en	a managed MySQL database

en	a managed MySQL database owned by the cPanel user:

en	a managed MySQL database user

en	a managed MySQL database user owned by the cPanel user:

en	a managed PostgreSQL database

en	a managed PostgreSQL database owned by the cPanel user:

en	a managed PostgreSQL database user

en	a managed PostgreSQL database user owned by the cPanel user:

en	an unmanaged MySQL database

en	an unmanaged MySQL database owned by the cPanel user:

en	an unmanaged MySQL database user

en	an unmanaged MySQL database user owned by the cPanel user:

en	an unmanaged PostgreSQL database

en	an unmanaged PostgreSQL database owned by the cPanel user:

en	an unmanaged PostgreSQL database user

en	an unmanaged PostgreSQL database user owned by the cPanel user:

en	apps passenger ruby ror gems rails

en	backups

en	black

en	blocks

en	blue

en	cPHulk Brute Force Protection

en	cPHulk Brute Force Protection is enabled.

en	cPanel

en	cPanel Account

en	cPanel Analytics

en	cPanel Blog

en	cPanel CalDAV Calendar

en	cPanel CardDAV Address Book

en	cPanel Cloud

en	cPanel Development Forum

en	cPanel Log Rotation Configuration

en	cPanel Logo

en	cPanel Management

en	cPanel Plugin File Generator

en	cPanel Services Cluster Setup

en	cPanel Theme

en	cPanel University

en	cPanel Version

en	cPanel Web Disk Configuration

en	cPanel Web Services Configuration

en	cPanel WHM License

en	cPanel WHM now provides reverse proxy with caching. You can use caching to serve content more quickly. Go to the to install and take advantage of this feature.

en	cPanel WHM update aborted

en	cPanel WHM update failure in upcp script

en	cPanel WHM update terminated

en	cPanel logo

en	cPanel provided statistics software supports a variety of languages. This software does not have a direct mapping from a locale to a language. Default values are set based upon the closest mapping. However, this mapping may sometimes be inaccurate depending upon your customer’s region or needs. This screen allows you to specify the language of the statistics software associated with each locale setting.

en	cPanel version change from “ ” to “ ” failed during updatenow.

en	cPanel version change from “ ” to “ ” is blocked

en	cPanel® does not translate strings. You will need to provide your own translations.

en	calendar contact management address book addressbook

en	calendar delegation

en	check_mysql has determined that there are corrupted database tables

en	checked on at

en	compressed size unknown, uncompressed

en	contact email

en	cpupdate.conf settings converted to local.versions

en	current state

en	day of month

en	default

en	default ( )

en	deleted

en	deprecated

en	development

en	disabled

en	domains addon subdomain parked create domain force https redirect

en	domains parked park aliases alias addon subdomain domain force https redirect

en	down

en	dynamic dns ddns ip subdomain

en	e.g. Contract ends

en	email Authentication Email Deliverability spf domain-keys authentication DKIM

en	email accounts mail disk usage bytes mb size

en	email accounts mail pop imap smtp

en	email archive Email Archiving

en	email calendar contact address book CalDAV CardDAV

en	enabled

en	files

en	for

en	green

en	image manager resize manager scaler thumbnailer format

en	in progress

en	internal

en	language

en	latest visitors

en	legacy mode (“ ”)

en	less »

en	log file

en	manage team manager sub user subaccount subuser

en	meters

en	mod_ruid2 is enabled in Apache. To ensure that this aids in protecting from symlink attacks, Jailed Apache needs to be enabled. If this not set properly, you should see an indication in Security Advisor (this page) in the sections for “Apache vhosts are not segmented or chroot()ed” and “Users running outside of the jail”. If those are not present, your users should be properly jailed. Review for further information.

en	more »

en	mysql manager database db

en	nearness_fraction must be a number greater than 0 and less than 1.

en	new

en	optional

en	or

en	or

en	password security change facebook external google secure cpanel

en	password change ftp email webdisk webdav service

en	path/to/error_log/file

en	per domain

en	phpMyAdmin

en	phpMyAdmin database db

en	phpPgAdmin database psql db

en	private

en	production

en	public

en	read-only

en	read-write

en	red

en	sample apps

en	seconds

en	site publisher builder start website generator template

en	six-digit code

en	skin theme

en	sshd shared memory check: A shared memory segment created by sshd process exists.

en	suEXEC is disabled.

en	suEXEC is disabled; however mod_ruid2 is installed.

en	terminal bash tcsh command line shell ssh

en	test_box content is wide and tall.

en	pixel

en	pixels

en	pixel

en	pixels

en	test_box content region is: .

en	to

en	transfer session id

en	undefined

en	unknown

en	unlimited

en	up

en	upcp updates . We recommend that you run this script once per day. The script, by default, is set to run at a random time between 9pm and 6am local time. You may set this script to run at any time you wish. We recommend that you set it to run during off-peak hours.

en	used with dark background colors

en	used with light background colors

en	white

en	year

en	zone editor advanced simple caa cname a aaaa txt dkim dmarc spf mx srv record dns dnssec

en	“Protocol”, the first part of the service field must contain only case insensitive letters a-z, digits 0-9, ‘-’s and ‘+’s. It must not exceed 32 characters.

en	“ ” ( ) does not match “ ” ( ), and “ ” reports that “ ”’s address is “ ”.

en	“ ” ( ) does not match “ ” ( ), and “ ” on “ ” failed:

en	“ ” ( “ ”) is not a valid user for this module.

en	“ ” (process ) ended prematurely because it received the “ ” ( ) signal:

en	“ ” (process ) reported error code “ ” when it ended:

en	“ ” (process “ ”) reported errors:

en	“ ” (“ ”) is already one of this server’s linked nodes.

en	“ ” DNS Remote Configuration.

en	“ ” Does not appear to be a valid path.

en	“ ” Is Being Authorized ( )

en	“ ” Is Requesting Access ( )

en	“ ” Password:

en	“ ” Registration Failed ( )

en	“ ” Registration Timed Out ( )

en	“ ” Themes

en	“ ” Was Denied Access ( )

en	“ ” OK:

en	“ ” OK:

en	“ ” error ( ):

en	“ ” OK:

en	“ ” error ( ):

en	“ ” account is set to expire on .

en	“ ” already controls the domain name “ ”.

en	“ ” already exists and is a regular file.

en	“ ” already exists in the .

en	“ ” already exists.

en	“ ” already exists. Ensuring the correct permissions …

en	“ ” already had mailbox autocreation disabled.

en	“ ” already had mailbox autocreation enabled.

en	“ ” already has SSL installed on the IP address “ ”. The same domain cannot have SSL on more than one IP address.

en	“ ” already owns a dynamic domain named “ ”.

en	“ ” and

en	other domain

en	other domains

en	“ ” as “ ”

en	“ ” attempted to validate a file that does not exist:

en	“ ” called in “ ”

en	“ ” can appear only at the start of a wildcard domain name.

en	“ ” can not be deleted because there are tasks pending.

en	“ ” cannot be a negative value.

en	“ ” cannot be copied to the remote server because it does not exist locally.

en	“ ” cannot be equivalent to “ ”.

en	“ ” cannot be greater than .

en	“ ” cannot be less than .

en	“ ” cannot be routed.

en	“ ” cannot contain the following character:

en	“ ” cannot parse “ ” expressions.

en	“ ” cannot proceed because it requires .

en	“ ” cannot secure all of “ ”’s domains. Remove domains from “ ” to fix this.

en	“ ” can’t read mail because logins are suspended.

en	“ ” can’t receive mail because incoming mail is suspended.

en	“ ” can’t send mail because outgoing mail is suspended.

en	“ ” contains ( ). Such characters are prohibited.

en	a control character

en	control characters

en	“ ” contains a Unicode code point ( ) that is not valid according to .

en	“ ” contains a password. You cannot use this URL.

en	“ ” contains at least 1 user’s home directory. Delete all such accounts, then retry.

en	“ ” contains unsupported characters. It must contain only common letters, numbers, or punctuation characters.

en	“ ” could already receive messages.

en	“ ” could already send messages.

en	“ ” does not control for the “ ” domain.

en	“ ” does not control a domain named “ ”.

en	“ ” does not control the .

en	a domain

en	domains

en	“ ” does not exist, so the password cannot be changed!

en	“ ” does not exist.

en	“ ” does not form a valid resource record. ( )

en	“ ” does not have a product with product “ ”.

en	“ ” does not own a domain named “ ” on this server.

en	“ ” does not own a web virtual host named “ ”.

en	“ ” does not possess the required ( ).

en	feature

en	features

en	“ ” does not refer to any of this system’s locales.

en	“ ” does not refer to any of “ ”’s web virtual hosts.

en	“ ” does not resolve to any addresses on the internet.

en	“ ” does not resolve to any addresses on the internet.

en	“ ” does not resolve to any addresses.

en	“ ” does not resolve to the local server.

en	“ ” does not support streaming.

en	“ ” does not support filesystem checks.

en	“ ” does not support home directory streaming.

en	“ ” does not support streaming.

en	“ ” ended prematurely because it received the “ ” ( ) signal:

en	“ ” exceeds the maximum allowed value ( ).

en	“ ” exists but is not a file!

en	“ ” failed because of an error.

en	“ ” failed to create “ ” in “ ”.

en	“ ” failed to create “ ”.

en	“ ” failed to update because an error occurred:

en	user’s quota

en	users’ quotas

en	“ ” forbids redirections.

en	“ ” functions for user “ ” will now be handled by the local server.

en	“ ” functions for user “ ” will now be handled by “ ”.

en	“ ” general error ( ):

en	“ ” has already collected payment for this certificate. To receive a refund you must . Once you remove this certificate from this system’s queue, you will no longer see its information here.

en	“ ” has an certificate installed, but it is not the certificate that you just ordered (order item “ ”). The system will now install this certificate.

en	“ ” has no limit on disk blocks usage.

en	“ ” has not issued a certificate for order item “ ”. Contact them for further assistance.

en	“ ” in the “ ” parameter is not valid.

en	“ ” indicated that the Market has been disabled by the license holder.

en	“ ” indicated that the certificate with order item “ ” has been canceled.

en	“ ” indicated that the order with “ ” has been canceled.

en	“ ” indicated that you do not have an order with the “ ”. Verify that you logged in to “ ” as the appropriate user.

en	“ ” is properly configured for this domain.

en	“ ” is a child account. Skipping …

en	“ ” is a combined account.

en	“ ” is a directory reserved for cPanel use”.

en	“ ” is a file, but it should be a directory.

en	“ ” is a required parameter.

en	“ ” is a reserved name for database users on this system.

en	“ ” is a reserved name for databases on this system.

en	“ ” is a reserved package name.

en	“ ” is a reserved subdomain.

en	“ ” is a reserved username on this system.

en	“ ” is a reserved username on this system. Enter a different username.

en	“ ” is a reserved username.

en	“ ” is a reserved value.

en	“ ” is a suspended account, but the system must access / as this user. Because of this, the system will temporarily unsuspend “ ”’s local / access.

en	“ ” is a wildcard domain. The source domain must not be a wildcard domain.

en	“ ” is already a dynamic domain.

en	“ ” is already disabled for the selected . Select other users to disable.

en	user

en	users

en	“ ” is already disabled.

en	“ ” is already enabled for the selected . Select other users to enable.

en	user

en	users

en	“ ” is already enabled.

en	“ ” is an abstract base class. Please use an implementation!

en	“ ” is an alias for this server.

en	“ ” is an invalid IPv6 address.

en	“ ” is an invalid username.

en	“ ” is authorized to issue certificates for of this user’s .

en	domain

en	domains

en	“ ” is currently not available.

en	“ ” is disabled but the user “ ” possesses . You must enable “ ” to remove the user “ ”.

en	database

en	databases

en	“ ” is enabled in “ .”

en	“ ” is encrypted. Enter this archive’s password to proceed.

en	“ ” is forbidden at the start or end of a domain label.

en	“ ” is forbidden at the third position of a domain label.

en	“ ” is hosted on an IP address ( ) that you do not control.

en	“ ” is hosted on the server’s main IP address ( ). Only root can set a primary website on the server’s main IP address.

en	“ ” is installed.

en	“ ” is installing. The installation may take a few minutes.

en	“ ” is installing. The installation may take up to minutes.

en	“ ” is invalid because this system allows only printable characters in database names.

en	“ ” is invalid because this system does not allow quote characters ( ) in database names.

en	“ ” is invalid because this system prohibits the backslash ( ) character in / database names.

en	“ ” is invalid because this system prohibits the backslash ( ) character in database names.

en	“ ” is invalid because this system prohibits the slash ( ) character in database names.

en	“ ” is invalid because this system rejects integers that begin with “ ”.

en	“ ” is invalid.

en	“ ” is invalid. A package name may only contain multi-byte UTF-8 characters, spaces, and the following:

en	“ ” is larger ( ) than the allowed size ( ).

en	“ ” is located on a device outside of the device ( ).

en	“ ” is located on a mount point, , outside of the device “ ” (whose mount point is ).

en	“ ” is managed.

en	“ ” is missing the following parameters:

en	“ ” is newer than “ ”, skipping …

en	“ ” is no longer recommended.

en	“ ” is not a directory.

en	“ ” is not a domain that you control.

en	“ ” is not a domain that you own.

en	“ ” is not a known country code.

en	“ ” is not a nonnegative integer.

en	“ ” is not a parked domain.

en	“ ” is not a permitted shell for restricted restore. This account will use the “ ” shell instead.

en	“ ” is not a primary domain.

en	“ ” is not a recognized bit name.

en	“ ” is not a registered internet domain.

en	“ ” is not a supported algorithm.

en	“ ” is not a supported named release tier. Your server won’t receive updates without a valid tier.

en	“ ” is not a valid CPSC service. The valid services are .

en	“ ” is not a valid Dun Bradstreet number.

en	“ ” is not a valid IP address.

en	“ ” is not a valid URL.

en	“ ” is not a valid token name. An token name must not be longer than and may only contain the following :

en	character

en	characters

en	character

en	characters

en	“ ” is not a valid token. tokens are long and contain only the following :

en	character

en	characters

en	character

en	characters

en	“ ” is not a valid . It must be one of: .

en	“ ” is not a valid resource record type.

en	“ ” is not a valid address.

en	“ ” is not a valid address.

en	“ ” is not a valid address.

en	“ ” is not a valid timestamp on this system.

en	“ ” is not a valid backup . The must include the filename to download and use the following format:

en	“ ” is not a valid directive.

en	“ ” is not a valid image.

en	“ ” is not a valid regular expression.

en	“ ” is not a valid regular expression:

en	“ ” is not a valid for the “ ” value.

en	“ ” is not a valid port number.

en	“ ” is not a valid .

en	“ ” is not a valid function name.

en	“ ” is not a valid epoch timestamp.

en	“ ” is not a valid .

en	“ ” is not a valid archive.

en	“ ” is not a valid .

en	“ ” is not a valid .

en	“ ” is not a valid string.

en	“ ” is not a valid host. The system will not restore grants pertaining to it.

en	“ ” is not a valid account name.

en	“ ” is not a valid action for this module.

en	“ ” is not a valid byte count for this interface.

en	“ ” is not a valid clone .

en	“ ” is not a valid contact email address on line “ ”.

en	“ ” is not a valid directive for version “ ”.

en	“ ” is not a valid document root.

en	“ ” is not a valid document root. ( )

en	“ ” is not a valid domain name per ( ).

en	“ ” is not a valid domain name per .

en	“ ” is not a valid domain name.

en	“ ” is not a valid domain or address.

en	“ ” is not a valid domain.

en	“ ” is not a valid email address.

en	“ ” is not a valid filter type.

en	“ ” is not a valid hostname.

en	“ ” is not a valid interval for this interface. This value should be one of the following:

en	“ ” is not a valid item .

en	“ ” is not a valid length for an key. This value must be a positive integer.

en	“ ” is not a valid name for a Perl module.

en	“ ” is not a valid name for a mailing list.

en	“ ” is not a valid name for a theme serializer.

en	“ ” is not a valid name server.

en	“ ” is not a valid nonnegative integer because it contains .

en	invalid character

en	invalid characters

en	“ ” is not a valid notification level for “ ”. The only valid .

en	level is

en	levels are

en	“ ” is not a valid number of bytes.

en	“ ” is not a valid numeric error code for ’s “ ” function.

en	“ ” is not a valid numeric value that MySQL understands.

en	“ ” is not a valid octal permission integer because it contains .

en	invalid character or integer

en	invalid characters or integers

en	“ ” is not a valid octal permission.

en	“ ” is not a valid order item .

en	“ ” is not a valid password strength setting.

en	“ ” is not a valid path for a home directory symbolic link in this restore type.

en	“ ” is not a valid path for a html directory symbolic link in this restore type.

en	“ ” is not a valid process ID.

en	“ ” is not a valid profile activation log ID.

en	“ ” is not a valid protocol for this interface.

en	“ ” is not a valid protocol for this interface. This value should be one of the following:

en	“ ” is not a valid rational number.

en	“ ” is not a valid service name.

en	“ ” is not a valid shell on this system. This account will use the “ ” shell instead.

en	“ ” is not a valid sort method.

en	“ ” is not a valid style name.

en	“ ” is not a valid subdomain name per 1035.

en	“ ” is not a valid theme name.

en	“ ” is not a valid timestamp for this interface.

en	“ ” is not a valid user for this operation.

en	“ ” is not a valid username because it contains a “ ” character.

en	“ ” is not a valid username on this system.

en	“ ” is not a valid username.

en	“ ” is not a valid value for “ ”.

en	“ ” is not a valid value of “ ”.

en	“ ” is not a valid value of “ ”. Use .

en	“ ” is not a valid wildcard domain.

en	“ ” is not a valid “ ” parameter for “ ”.

en	“ ” is not a valid “ ” parameter value. Select from one of the following:

en	“ ” is not a valid “ ” value. You must provide a .

en	“ ” is not a valid “ ”.

en	“ ” is not an .

en	“ ” is not bound to “ ” for Ticket ID “ ” and Server “ ”. Access the and update the authentication information or select the correct Ticket ID and Server.

en	“ ” is not hosted on a dedicated IP address, and the system failed to determine your shared IP address.

en	“ ” is not installed on the system.

en	“ ” is not installed on the system:

en	“ ” is not installed on your system.

en	“ ” is not valid .

en	“ ” is not valid .

en	“ ” is not valid in except to pad the end of the string.

en	“ ” is now being redirected to “ ”.

en	“ ” is now installed.

en	“ ” is now recommended.

en	“ ” is now set to the minimum value.

en	“ ” is now the primary SSL host on “ ”.

en	“ ” is now the primary SSL host.

en	“ ” is now the primary SSL website on its IP address.

en	“ ” is now uninstalled.

en	“ ” is now “ ”.

en	“ ” is ok.

en	“ ” is properly configured for this domain.

en	“ ” is reporting errors.

en	“ ” is reporting warnings.

en	“ ” is required.

en	“ ” is set to be renamed “ ”.

en	“ ” is suspended.

en	“ ” is suspended. Changing the password would unsuspend the account!

en	“ ” is too long by .

en	character

en	characters

en	“ ” is unmanaged.

en	“ ” lacks mail synchronization support.

en	“ ” may not be an empty regular expression.

en	“ ” must be .

en	“ ” must be a complete email address for non-local deliveries.

en	“ ” must be a different value from “ ”.

en	“ ” must be a hash reference.

en	“ ” must be a list of one or more items.

en	“ ” must be a nonnegative integer.

en	“ ” must be a number.

en	“ ” must be a positive integer less than or equal to .

en	“ ” must be a positive integer.

en	“ ” must be a valid Message-ID.

en	“ ” must be an array, not “ ”.

en	“ ” must be an array.

en	“ ” must be an integer value between “ ” and “ ” (inclusive).

en	“ ” must be an integer.

en	“ ” must be either a scalar or a regular expression reference.

en	“ ” must be either “ ” or “ ”.

en	“ ” must be empty or one of the following values:

en	“ ” must be less than or equal to “ ”.

en	“ ” must be one of the following values:

en	“ ” must not be run as .

en	“ ” not allowed in “ ”.

en	“ ” notifications are currently configured to have an importance of “ ”.

en	“ ” now uses “ ” for “ ”.

en	“ ” on “ ” redirects to “ ”.

en	“ ” path is not in the directory “ ”.

en	“ ” points to the same inode as the system file “ ”.

en	“ ” produced a warning.

en	“ ” quota usage

en	“ ” redirects to:

en	“ ” removed the account.

en	“ ” reported error code “ ” when it ended:

en	“ ” reported errors:

en	“ ” reports that the certificate authority issued but then revoked the certificate for “ ” and .

en	other domain

en	other domains

en	“ ” reports that the certificate authority issued but then revoked “ ”’s certificate.

en	“ ” reports that the certificate authority rejected the request for a certificate for “ ” and .

en	other domain

en	other domains

en	“ ” reports that the certificate authority rejected the request for a certificate for “ ”.

en	“ ” reports that the certificate for “ ” and has been canceled.

en	other domain

en	other domains

en	“ ” reports that the certificate for “ ” has been canceled.

en	“ ” requires zone updates on the source server, but the account lacks the authorization to make those updates.

en	“ ” requires of disk space, but you can only upload up to .

en	“ ” requires a package name that you have permission to access.

en	“ ” requires a “ ” parameter.

en	“ ” requires no zone updates on the source server.

en	“ ” requires the “ ” argument.

en	“ ” resolves exclusively to this server. You may include this domain in this website’s certificate request.

en	“ ” resolves to , not “ ”.

en	“ ” resolves to a loopback address:

en	“ ” resolves to a private address. The system will skip for “ ”.

en	“ ” resolves to the following , which exist on this server:

en	address

en	addresses

en	does not

en	do not

en	“ ” resolves to the local server. Provide a remote hostname or address instead.

en	“ ” returned an error:

en	“ ” runs version “ ”. Update the remote server, or fix its .

en	“ ” set up the account.

en	“ ” submitted reseller invalid: .

en	nameserver is

en	nameservers are

en	“ ” successfully added to the range list.

en	“ ” successfully removed from the range list.

en	“ ” support is disabled for “ ”.

en	“ ” support is enabled for “ ”.

en	“ ” supports streaming.

en	“ ” supports home directory streaming.

en	“ ” suspended the account.

en	“ ” the following parameters were invalid:

en	“ ” unsuspended the account.

en	“ ” updated .

en	user’s quota

en	users’ quotas

en	“ ” updated the account.

en	“ ” version “ ” is not installed on the system.

en	“ ” was already able to log in.

en	“ ” was already suspended from receiving messages.

en	“ ” was given an invalid permissions string:

en	“ ” will charge your credit card immediately upon checkout.

en	“ ” will complete in the background (process ID ).

en	“ ” will not complete the charge to your credit card until the certificate is available.

en	“ ”, not this server, handles your account’s mail.

en	“ ”’s backup contains an error: The backup contains a statement ( ) that defines a new delimiter ( ). That delimiter occurs in the phrase before its designation as delimiter, though.

en	“ ”’s certificate expires soon!

en	“ ”’s certificate expires soon. Replace this certificate before to avoid service interruptions.

en	“ ”’s check completed correctly, but the check required an redirection. The system tried to exclude such redirections from this domain by editing the website document root’s “ ” file, but the redirection persists. You should investigate further.

en	“ ”’s certificate failed validation:

en	“ ”’s certificate is removed. Non- services will no longer use this certificate.

en	“ ”’s certificate is valid, but it will expire soon.

en	“ ”’s certificate is valid.

en	“ ”’s grants file contains no / grants to restore.

en	“ ”’s public :

en	nameserver

en	nameservers

en	“ ” is owned by “ ”.

en	“ ” is your license provider and provides support for your license. Click the support link below that was provided by your license provider for assistance with your issue.

en	“secure_id” must be between 3 - 64 non-whitespace characters:

en	“server_num” must be between 1 - 64 non-whitespace characters:

en	“ticket_id” must be between 3 - 64 non-whitespace characters:

en	“undefined” is a reserved package name.

en	† A “Known Network” is an address range or netblock that contains an address from which a user successfully logged in previously.