en	The backup failed to complete for the following reason:

en	The backup file is named “ ”

en	The backup file “ ” is empty.

en	The backup file “ ” unexpectedly disappeared from the remote server “ ”.

en	The backup file, , is still being generated on the remote server “ ”.

en	The backup is for the “ ” domain not owned by the current account.

en	The backup name is not formatted correctly. It should be similar to “ ”.

en	The backup process completed, but occurred.

en	error

en	errors

en	The backup process completed.

en	The backup process detected the existence of the “ ” script. In earlier versions of “ ”, the system executed this script prior to any checks or verifications, and it executed the script regardless of whether the backups were up-to-date.

en	The backup process encountered the following :

en	error

en	errors

en	The backup process failed.

en	The backup process on “ ” completed.

en	The backup process on “ ” encountered an error.

en	The backup process on “ ” failed.

en	The backup process terminated prematurely with the “ ” signal.

en	The backup process was delayed for over waiting on statistics processing

en	hour

en	hours

en	The backup transferred via “ ” to the server “ ” as user “ ” in the default directory.

en	The backup transferred via “ ” to the server “ ” as user “ ” in the “ ” directory.

en	The backups on “ ” have been waiting for statistics processing to complete for over , which indicates that the server is too overloaded to complete processing in a timely manner.

en	hour

en	hours

en	The bandwidth limit must be a number. Exponents are allowed (e.g. 1024e+3).

en	The best way to get faster sorts is through indexing or query optimization. However, gradually increasing the size of this buffer may help. We do not recommend exceeding 2M.

en	The blacklist is a list of content you do not wish to receive in email. The sender of blacklisted content will also receive a warning message of your choice.

en	The blacklist is empty.

en	The blocked IP address

en	The bucket name must be between and characters.

en	The bucket name must be between and characters.

en	The bucket name must not begin or end with a hyphen or a period.

en	The bucket name must not begin or end with a hyphen.

en	The bucket name must only contain numbers, hyphens, and letters.

en	The bucket name must only contain numbers, hyphens, and lowercase letters.

en	The bucket name must only contain numbers, periods, hyphens, and lowercase letters.

en	The buffer is not valid .

en	The bulk policy has been applied to all domains.

en	The cPanel Store sent a verification code to . Check your inbox. If you don’t see it, you may need to check your spam folder.

en	The cPanel account “ ” does not own the domain “ ”.

en	The cPanel user “ ” is not allowed to grant access to any of the requested database users.

en	The call to “ ” failed because of an error:

en	The call to “ ” timed out after .

en	second

en	seconds

en	The capabilities of a provider determine the provider’s rank.

en	The cause of your misconfiguration is:

en	The certificate authority’s domain name.

en	The certificate cannot be decoded because of an error:

en	The certificate chain failed ’s verification ( ).

en	The certificate could not be installed on the domain “ ”.

en	The certificate does not exist at the expected filesystem path ( ).

en	The certificate does not exist.

en	The certificate does not match your selected domain.

en	The certificate does not support the domain “ ”. It supports : .

en	this domain

en	these domains

en	The certificate file ( ) is corrupted.

en	The certificate file ( ) is empty. This may indicate filesystem corruption.

en	The certificate files usually have the “ ” extension.

en	The certificate for has been created and saved in your directory. It has been installed on your domain. Please note that the certificate will display in web browsers after it is installed, since it is self-signed.

en	The certificate for the domain “ ” has been saved.

en	The certificate for the “ ” service passed all checks.

en	The certificate for wildcard domain “ ” will secure this domain.

en	The certificate has expired.

en	The certificate has the following errors:

en	The certificate has the following properties:

en	The certificate information could not be retrieved because of an error:

en	The certificate is neither self-signed nor from .

en	The certificate is not complete.

en	The certificate is not valid.

en	The certificate is now active on the website for the following domain names:

en	The certificate list could not be retrieved because of an error:

en	The certificate may already be on your server. You can either paste the certificate here or try to retrieve it for your domain.

en	The certificate may already exist on the server. You can automatically fill the certificate or paste the entire file above.

en	The certificate order is for the following domain :

en	name

en	names

en	The certificate should include the lines that contain BEGIN and END.

en	The certificate signing request passphrase can contain only alphanumeric characters.

en	The certificate signing request passphrase must be at least long.

en	character

en	characters

en	The certificate signing request text was not valid.

en	The certificate text was not valid.

en	The certificate that is installed on this website contains the following properties:

en	The certificate verification failed because of an error:

en	The certificate was successfully installed on the domain “ ”.

en	The certificate will expire today.

en	The certificate will expire very soon.

en	The certificate will not renew via because it was not issued via .

en	The certificate will renew via when the parent domain “ ” renews, but this domain will be excluded.

en	The certificate will renew via when the parent domain “ ” renews.

en	The certificate will renew via , but this domain will be excluded.

en	The certificate will renew via .

en	The certificate will secure some, but not all, of the domains on websites on which they exist.

en	The certificate “ ” has been deleted.

en	The certificate “ ” was deleted successfully.

en	The certificate’s representation is attached to this message.

en	The certificate’s representation is included below:

en	The certificate’s chain of trust will expire very soon.

en	The certificate’s expiration date

en	The certificate’s key is shorter than the recommended length of .

en	bit

en	bits

en	The certificate’s key is too weak to provide adequate encryption.

en	The certificate’s signature is too weak to provide adequate security.

en	The changed values are valid settings. Click “Update” to save the settings.

en	The changes could not be saved because an error occurred:

en	The changes failed a syntax check failed with the following error:

en	The changes to the private key could not be saved because an error occurred:

en	The charset of the “ ” table is not “ .” The system can only convert tables with “ ” encoding.

en	The checked-out branch includes new deployable changes.

en	The child node “ ” failed to handle “ ” functionality for the user “ ”.

en	The chunk size for buffer pool resizing operations.

en	The clone URL include a password.

en	The clone URL include whitespace characters.

en	The clone URL include a valid IP address or a fully-qualified domain name.

en	The code you provided is invalid.

en	The code you provided is invalid. Enter the six-digit code in the latest email from Site Quality Monitoring.

en	The code you provided is invalid. Enter the six-digit code in the latest email from the Site Quality Monitoring service.

en	The combined length of the subdomain and root domain cannot exceed 254 characters.

en	The combined length of the username, character, and domain cannot exceed characters.

en	The command already has an active at “ ” and is running with the process :

en	The command is already running with the process :

en	The command must complete within to avoid a timeout.

en	second

en	seconds

en	The command “ ” failed to report errors to the status file.

en	The comment field cannot be empty.

en	The company division must be no longer than .

en	character

en	characters

en	The company name cannot exceed 140 characters.

en	The company name must be no longer than .

en	character

en	characters

en	The compare-to value, , is not a number.

en	The compression level to save messages in when you enable “Compress Messages”.

en	The config file, , already has support for .

en	The configuration entry with “ ” of “ ” has an invalid value for “ ”: “ ”.

en	The configuration entry with “ ” of “ ” lacks the required parameter “ ”.

en	The configuration file for the “ ” instance does not contain an install folder.

en	The configuration file that provides the rule “ ” is disabled. Whether enabled or disabled, the rule will have no visible effect until you enable the configuration file for the “ ” vendor.

en	The configuration is missing the required parameter key “ ”.

en	The configuration key “ ” is not a valid configuration field for the provider “ ”.

en	The configuration name cannot be empty.

en	The configuration name cannot contain two consecutive periods.

en	The configuration name contains invalid characters.

en	The configuration name must contain the string “ ”.

en	The configuration name must end with the suffix “ ”.

en	The configured provider does not support explicit wildcard domains.

en	The configured shared IPv6 address does not use a valid format (IPv6/CIDR): .

en	The configured value for “ ” was less than the configured value for “ ”. In order for to properly block brute force attempts, “ ” must be greater than or equal to “ ”.

en	The connection driver reported the following error:

en	The connection timed out while waiting for the tar child process to exit.

en	The connection timed out. Please try again.

en	The connection to the server ended in failure at . ( )

en	The content of “ ” is invalid.

en	The content “ ” of the file, as accessed at “ ” and redirected from “ ”, did not match the expected value.

en	The content “ ” of the file, as accessed at “ ” and redirected from “ ”, did not match the expected value. The domain “ ” resolved to an address “ ” that does not exist on this server.

en	The content “ ” of the file, as accessed at “ ”, did not match the expected value.

en	The content “ ” of the file, as accessed at “ ”, did not match the expected value. The domain “ ” resolved to an address “ ” that does not exist on this server.

en	The conversion of addon domain “ ” into the full account “ ” failed. Review the log for further details.

en	The conversion of addon domain “ ” into the full account “ ” succeeded. Review the log for further details.

en	The conversion of the domain “ ” failed.

en	The conversion of the domain “ ” succeeded.

en	The conversion process moves the following items even if you do not copy any email data:

en	The countries list is empty.

en	The current ( ) is lower than the ( ). This will cause the system to automatically delete messages that it did not previously consider to be spam. We recommend that you increase your .

en	The current account, , does not have the permissions needed by “ ”.

en	The current configurations will update the new record to the following:

en	The current customization is invalid.

en	The current identity of the SSH server at “ ” does not match its identity in your account’s file.

en	The current locally checked-out branch.

en	The current security policy requires that you change your password every to avoid your account being compromised.

en	day

en	days

en	The current setting is shown in .

en	The current tab has unsaved changes. You should save the changes before you navigate to another tab.

en	The current user does not have a home directory on the system.

en	The currently installed packages on the server.

en	The custom zone data for the domain “ ” is invalid. The error returned was:

en	The custom zone file is invalid.

en	The customization parameter is missing or not an object.

en	The data on this page is no longer synchronized with the server. Please .

en	The database name cannot contain more than .

en	character

en	characters

en	The database restoration subprocess for “ ” has closed the archive.

en	The database restoration subprocess for “ ” has ended.

en	The database restoration subprocess for “ ” has opened the archive.

en	The database restoration subprocess for “ ” is running …

en	The database server is currently offline.

en	The database server is not currently running. If this is not intentional, you may experience problems with your upgrade.

en	The database server‘s address is “ ”. When connecting to the database server you must specify this host.

en	The database server’s address or .

en	The database server’s address is .

en	The database server’s port. The port must be between 1 and 65535.

en	The database table prefix should only contain the letters and and the numbers . The system will remove all other characters.

en	The database user “ ” will be renamed to “ ” even though overwrite was requested because it is a reserved name.

en	The database “ ” already exists, and you, “ ”, are not allowed to create a user with the same name.

en	The database “ ” already exists.

en	The database “ ” cannot be added because a user with the same name already exists.

en	The database “ ” does not exist.

en	The database “ ” will be renamed to “ ” even though overwrite was requested because it is a reserved name.

en	The day(s) of the week on which you wish to run the cron job.

en	The default version for “ ” has been set to “ ”.

en	The default is .

en	second

en	seconds

en	The default common mail provider configuration is not set.

en	The default identity for “ ” already exists.

en	The default key type for certificates and s.

en	The default setting applies to all new accounts and any accounts that do not explicitly set caching.

en	The deployment that you triggered on is complete. Updating last deployment information …

en	The deployment that you triggered on is in progress …

en	The deployment that you triggered on is queued …

en	The deprecated service, , has been removed and replaced with .

en	The deprecated service, , has been removed.

en	The description for your private key was updated.

en	The description is used in the title of the image tag and cannot exceed 50 characters. These titles provide additional assistance to screen readers and other assistive technology. Some browsers also show the title if you hover over the image.

en	The desired locale has been saved to your browser. To change the locale in this browser again, select another locale on this screen.

en	The destination name must contain between and characters.

en	The diameter of a sphere that encloses the entire location, in meters. This value defaults to 1m if nothing is set.

en	The directory for the PID file “ ” does not exist.

en	The directory is empty, no images found.

en	The directory name must contain only printable characters.

en	The directory “ ” could not be removed from the device:

en	The directory “ ” does not contain a backup for the user “ ”.

en	The directory “ ” does not exist.

en	The disk-write test failed to write to a temporary file ( ) because of an error: ( : ).

en	The display configuration parameter “ ” requires a hex color code without a Number symbol ( ). For example, represents red.

en	The displayed rules are from the following vendor rule :

en	set

en	sets

en	The distributed account “ ” owns that addon domain. First use ’s “ ” interface to dedistribute the account. Then, you can convert the addon domain to a account.

en	The document root must be a relative path. It must not begin with a slash (“ ”).

en	The document root must begin with “ ”.

en	The domain on account exceeded the maximum number of emails per hour.

en	The domain on account has exceeded the “Number of emails a domain may send per day before the system sends a notification” setting defined in Tweak Settings.

en	The domain cannot be or .

en	The domain does not have an certificate installed.

en	The domain does not have autoresponders.

en	The domain does not have email accounts.

en	The domain does not have email forwarders.

en	The domain list is empty.

en	The domain name cannot exceed .

en	character

en	characters

en	The domain name change was successful (“ ” is now “ ”).

en	The domain name may not be the same as a username.

en	The domain name must include a valid .

en	The domain name must include at least two labels.

en	The domain or record name cannot be or .

en	The domain or record name cannot exceed .

en	character

en	characters

en	The domain owner for the domain “ ” does not exist.

en	The domain ownership check failed because the caller did not specify a domain.

en	The domain ownership check failed because the caller did not specify a username or .

en	The domain ownership check failed because the system could not convert the into a username.

en	The domain userdata file for the “ ” domain appears to be missing.

en	The domain violated its account-level limit, which is currently .

en	The domain violated its domain-level limit, which is currently .

en	The domain violated the global limit, which is currently .

en	The domain you have selected already has some account data associated with it. The domain change may fail, but even if it succeeds, username collisions between the two domains may not be handled gracefully. To avoid this risk, please either choose a different domain or clean up any remaining accounts before making the change.

en	The domain ‘ ’ uses a PHP version, ‘ ’, that no longer exists in the system. You must select a new PHP version for this domain.

en	The domain “ ” (from the “ ”) resolves to an address ( ) that is on this server.

en	The domain “ ” already exists in the userdata for the user “ ”.

en	The domain “ ” already exists in the userdata.

en	The domain “ ” already exists.

en	The domain “ ” contains a reserved subdomain, , that is already in use. This subdomain may not be used here.

en	The domain “ ” contains a slash.

en	The domain “ ” does not belong to “ ”.

en	The domain “ ” does not exist in the for the user “ ”.

en	The domain “ ” does not exist.

en	The domain “ ” does not match ( ) for certificate # .

en	the given website

en	any of the given websites

en	The domain “ ” for user “ ” is invalid.

en	The domain “ ” is not configured for this account.

en	The domain “ ” is not managed on this server. You do not have sufficient privileges to install SSL for it. Only root may install SSL websites for domains that are not already set up on the server. Please set up this domain on a new account, or create it as parked domain, a subdomain, or an addon domain of an existing account that you own, and try again.

en	The domain “ ” is not managed on this server. You must specify an IP address to install SSL for “ ” or set up this domain on a new account, or create it as parked domain, a subdomain, or an addon domain of an existing account, and try again.

en	The domain “ ” is not owned by “ ”.

en	The domain “ ” is not suitable for because the system did not find any or records with a public address.

en	The domain “ ” is not suitable for because this system is not the authoritative nameserver.

en	The domain “ ” is not valid.

en	The domain “ ” is not valid:

en	The domain “ ” is now being redirected to “ ”.

en	The domain “ ” may not be created by “ ” because a zone already exists for the domain, “ ”.

en	The domain “ ” may not be created by “ ” because “ ” is already owned by another user.

en	The domain “ ” may not be created by “ ” because “ ” is already owned by “ ”.

en	The domain “ ” no longer inherits the version. It is now set to “ ”.

en	The domain “ ” now inherits the “ ” version from “ ”.

en	The domain “ ” that the addon domain “ ” would be parked on top of is not a valid domain name:

en	The domain’s authoritative nameserver.

en	The downloaded file was not a valid vendor metadata file:

en	The downloaded test file is corrupt.

en	The downloaded test file is empty. The remote account possibly exceeded its quota.

en	The downloaded vendor archive does not match the expected digest ( or ).

en	The email account currently uses % ( / ) of its capacity.

en	The email address cannot exceed characters.

en	The email address provided is not valid. This address must start with the mailbox name, then the “@” sign, then the mail domain name.

en	The email address you provided does not match our records.

en	The email address “ ” is not a valid virtual username:

en	The email address “ ” is not valid.

en	The email body must not be empty.

en	The email field must be empty or an email address.

en	The email filters in the backup are not for the current user.

en	The email must contain a username and a domain.

en	The enabled value must be 0 or 1.

en	The encoded certificate is the portable format for the certificate. Please be sure to keep a copy of this certificate and the associated private key in a safe location.

en	The end result is that the other site is stealing your bandwidth.

en	The entered value for the parameter is not valid:

en	The entered value, , is not a number.

en	The environment variable name, “ ”, is invalid. Environment variable names must not begin with a number, must not be longer than 256 characters, and may only contain the following characters:

en	The environment variable value, “ ”, is invalid. Environment variable values must contain fewer than 1024 printable characters.

en	The environment variable value, “ ”, is invalid. Environment variable values must not contain variable substitution literals:

en	The error log file

en	The error reported by the reset attempt was:

en	The exact error encountered was:

en	The existing virtual host was updated with the new certificate.

en	The expiration date is in the past.

en	The expiration date is too far in the future.

en	The expiration date must be set in the future.

en	The expiration date of the token.

en	The expiration format should be Unix Epoch.

en	The expire date is too far in the future.

en	The expired certificate had the following properties:

en	The external application you are trying to connect is not supported.

en	The external authentication links file, “ ”, indicates its schema version as version “ ”. The system cannot restore the data in this file because it does not know how to interpret that schema version.

en	The favicon is the graphic that appears on the corner of browser tabs, bookmarks, and desktop and mobile phone shortcuts.

en	The favicon must be a file. The images dimensions must be 32px by 32px.

en	The feature list “ ” does not exist on the system. The feature list setting for the user “ ” has been set to .

en	The feature “ ” exists but is not enabled.

en	The fetch returned no data.

en	The field “ ”, must be defined and not an empty string.

en	The file contain a name and at least one package.

en	The file already exists but you set the overwrite flag to 1 to restore the file.

en	The file is larger than the maximum of kilobytes.

en	The file is not a recognized email filter backup format.

en	The file located in the “ ” directory does not contain JSON, space-separated key and value pairs on newlines, or equals sign-separated key and value pairs on newlines.

en	The file name must have the .yaml extension. (Example: )

en	The file name must start with meta_, followed by the vendor name and have the .yaml extension. (Example: )

en	The file name must use the meta_ prefix, followed by the vendor name and a .yaml extension. The vendor name must only contain characters in the following set: (Example: )

en	The file name must use the meta_ prefix. (Example: )

en	The file name should begin with , followed by the short vendor identification code, and finally the extension.

en	The file name “ ” contains invalid characters for a filename.

en	The file name “ ” is not a or image.

en	The file transfer succeeded.

en	The file was moved back into place after restart but is not functional on this domain.

en	The file you uploaded, , contains a virus so the upload was canceled:

en	The file “ ” could not be removed from the device:

en	The file “ ” does not appear to be a file.

en	The file “ ” does not contain a database to restore.

en	The file “ ” does not exist for the account.

en	The file “ ” does not exist in the requested directory “ ”.

en	The file “ ” does not exist in the user’s home directory.

en	The file “ ” does not exist.

en	The file “ ” does not include an entry for the email account “ ”.

en	The file “ ” for user “ ” is larger than the maximum allowed file size of .

en	The file “ ” in the archive is corrupt.

en	The file “ ” is not available.

en	The file “ ” is not in a mailbox.

en	The file “ ” is not readable.

en	The file “ ” requested is a hidden file, but you are not showing hidden files.

en	The file “ ” was saved.

en	The file “ ” you tried to upload was not in the directory.

en	The file “ ” you uploaded already exists.

en	The filename of the key to generate.

en	The filename “ ” contains invalid characters. Do not include the ,/ ; characters in the filename.

en	The files must be in one of the following directories on the server:

en	The files outside of your home directory, the metadata that the system uses to store email in the mail directory, the email in Trash folders, or the files that you do not have permission to access.

en	The filesystem node “ ” is not a regular file.

en	The filesystem “ ” mounted at “ ” reached “ ” status because you currently use % of its available blocks.

en	The filesystem “ ” mounted at “ ” reached “ ” status because you currently use % of its available inodes.

en	The file’s size exceeds your account’s remaining disk usage quota. Because of this, you cannot upload this file.

en	The filter name cannot be empty.

en	The filter name cannot contain “ ” or “ ”.

en	The filter name must be unique. If you give the filter the same name as another filter, the previous filter will be overwritten.

en	The final character cannot be a null byte.

en	The first label must contain only the following characters: . The label cannot begin or end with a symbol.

en	The first set of digits of Latitude are for Degrees. Degrees must be a 1 or 2 digit number between 0 and 90.

en	The first set of digits of Longitude are for Degrees. Degrees must be a 1 to 2 digit number between 0 and 180.

en	The first time you enable a log statistics program, it will take between 24 and 48 hours for the reports to appear in a user’s interface. If the server is under load, it can take longer than 48 hours for the report to appear.

en	The following IP address is now able to access your site:

en	The following Ruby on Rails application was started:

en	The following Ruby on Rails application was stopped:

en	The following User is not valid:

en	The following Cluster members are not serving records for zone “ ”.

en	The following been deprecated and no longer used by .

en	database has

en	databases have

en	is

en	are

en	The following invalid:

en	privilege is

en	privileges are

en	The following configuration options are missing or invalid:

en	The following generated warnings from the checkallsslcerts script.

en	service

en	services

en	The following on the server should be updated as soon as possible because we plan to remove support for in a future version of . If you do not update the outdated software, the system may block your updates until you do.

en	application

en	applications

en	it

en	them

en	The following on the server should be updated as soon as possible.

en	application

en	applications

en	The following not refer to that you can access:

en	does

en	do

en	a feature

en	features

en	The following not allowed in a certificate because forbidden:

en	domain is

en	domains are

en	its top-level domain is

en	their top-level domains are

en	The following lost coverage when the certificate expired:

en	domain

en	domains

en	The following will lose coverage when the certificate expires:

en	domain

en	domains

en	The following caused the failure:

en	error

en	errors

en	The following occurred as the system moved or copied backup files locally:

en	error

en	errors

en	The following occurred during account backups:

en	error

en	errors

en	The following occurred during transport to the remote backup server:

en	error

en	errors

en	The following :

en	is not a valid MySQL privilege

en	are not valid MySQL privileges

en	The following required for handler “ ”:

en	module is

en	modules are

en	The following required for handler “ ”:

en	module is

en	modules are

en	The following more than once in the :

en	parameter appears

en	parameters appear

en	The following invalid:

en	parameter is

en	parameters are

en	The following required but not appear in the :

en	parameter is

en	parameters are

en	does

en	do

en	The following additional input:

en	parameter requires

en	parameters require

en	The following failed check:

en	domain

en	domains

en	its

en	their

en	The following to migrate with whose first with one or more other proposed new usernames. To resolve this, you can either rename the incoming or deselect .

en	remote user is set

en	remote users are set

en	a new name

en	new names

en	character conflicts

en	characters conflict

en	account

en	accounts

en	it

en	them

en	The following account will receive commission payments for items sold on this server.

en	The following additional problems occurred:

en	The following are all examples of valid entries:

en	The following cPanel usernames were found to be invalid: .

en	The following cPanel usernames were found to be misconfigured: .

en	The following cPanel usernames were found to have an email alias to a reserved username: .

en	The following changes could not be applied to the “ ” file:

en	The following configuration is already active:

en	The following configuration is not active:

en	The following conflicts are installed on this machine. They will be removed as part of this package selection:

en	The following digests are available:

en	The following disk almost full: . You must remove unused files in before proceeding.

en	partition is

en	partitions are

en	that partition

en	those partitions

en	The following domain lost coverage when the certificate expired:

en	name

en	names

en	The following domain will lose coverage when the certificate expires:

en	name

en	names

en	The following domains do not belong to your account:

en	The following domains do not exist in your account:

en	The following domains have had their exclusion removed:

en	The following domains use on the source server:

en	The following domains will now be excluded from the process:

en	The following domains, owned by user “ ”, have updates in progress:

en	The following email address was added to your blacklist:

en	The following email address was added to your ignore list:

en	The following email address was added to your whitelist:

en	The following error occurred while the system attempted to import zones into the database:

en	The following events were logged: .

en	The following exception has occurred:

en	The following extensions could not be selected due to unresolved conflicts:

en	The following extra in ’s index:

en	entry remains

en	entries remain

en	The following files already exist on the server in the directory “ ”:

en	The following filter did not pertain to this dataset:

en	The following is not a valid MySQL command to create a procedure or function:

en	The following is not a valid MySQL command to create a table:

en	The following is not a valid MySQL command to create a trigger:

en	The following is not a valid MySQL command to create a view:

en	The following is not a valid MySQL command to create an event:

en	The following limits show how many accounts could be created based on your remaining resources. If account creation is limited by a specific number of accounts then you may not be able to create as many accounts as listed below.

en	The following log files are almost 2 gigabytes in size. You should rotate or remove them to prevent an “File Size Exceeded” error in .

en	The following non-fatal occurred while allowing support access to this server:

en	error

en	errors

en	The following notification settings control what notifications receives.

en	The following packages have been disabled because they have unlimited bandwidth or quota limits:

en	The following parameter invalid:

en	name is

en	names are

en	The following parameters were invalid:

en	The following parameters were missing:

en	The following profiles are available for this server:

en	The following related resources have also been deleted:

en	The following requirements are not installed on this machine. They will be added as part of this package selection:

en	The following reserved usernames were found in use by cPanel users: .

en	The following resources could not be deleted because of errors:

en	The following resources depend on this key. If you want to keep any of them, uncheck the corresponding checkbox(es) below. When you delete a key, certificates and certificate signing requests that are associated with them cannot be used unless you provide the key again.

en	The following rule did not have an ID:

en	The following service passwords failed to change: “ ”.

en	The following service passwords were changed: “ ”.

en	The following settings are obsolete and have been removed from the server configuration file:

en	The following settings were absent and have been selected based on the current state of your installation.

en	The following settings were absent or invalid. Your server has copied the defaults for them from the configuration defaults file ( ).

en	The following settings were absent, but were restored from your file:

en	The following sort did not pertain to this dataset:

en	The following table shows which users’ statistics processing cycles have lasted longer than the configured delay ( ) between cycles.

en	The following usernames are reserved for anonymous access and cannot be used for new accounts:

en	The following users are near to or have exceeded their individual mail quota:

en	The following value is not valid for the “ ” setting:

en	The following variables may be used in commands:

en	The following vendor name is not valid:

en	The following “.default” corresponding “.local” . We will notify you when we make changes to the “.default” templates.

en	template has a

en	templates have

en	copy

en	copies

en	The following “.default” changed in a recent update in the environment.

en	template has

en	templates have

en	The following “ ” has too many array members:

en	The following “ ” is not an array:

en	The following “ ” lacks a function:

en	The following “ ” lacks a module:

en	The following “ ”’s arguments are not given as a hash:

en	The form has been reset to the last saved value for each property.

en	The form has returned

en	error

en	errors

en	The forwarded email address cannot exceed characters.

en	The friendly name be unique. A connection with this friendly name already exists.

en	The friendly name can only contain alphanumeric, dash, and underscore characters.

en	The friendly name cannot be longer than .

en	character

en	characters

en	The full username with its associated domain cannot exceed characters.

en	The full name cannot exceed 256 characters.

en	The full name cannot include the following special characters: .

en	The full path of the private key on this server.

en	The full username cannot exceed characters.

en	The function displays the most recent entries in your website’s error logs in reverse chronological order. You can use this information to find broken links or problems with missing files.

en	The function “ ” has not been implemented. Override this function in a subclass.

en	The given IP address or range is invalid.

en	The given IP range does not fit within the given subnet mask.

en	The given backup path contains invalid data.

en	The given certificate does not match the given key.

en	The given comment is invalid:

en	The given password is too weak. Please enter a password with a strength rating of or higher.

en	The given password is too weak. Please enter a password with a strength rating of .

en	The given price ($ ) must be a multiple of $ .

en	The given range name does not exist

en	The given serial number ( ) does not match the zone’s serial number ( ). Refresh your view of the zone, then resubmit.

en	The given value ( ) is not a valid amount.

en	The group “ ” already exists on this system.

en	The group “ ” already exists.

en	The handler for “ ” has been removed.

en	The handler “ ” has been assigned to the extensions “ ”.

en	The home directory for “ ” does not exist.

en	The home directory.

en	The home icon ( ) signifies your home directory (“ ”).

en	The host must be a valid address or .

en	The host name “ ” does not resolve to any addresses.

en	The host “ ” does not exist in the file.

en	The host “ ” was added to the access list.

en	The hosting platform of choice.

en	The hostname ( ) resolves to the “ ” address. It should resolve to the “ ” address. Ensure that the contents of are configured correctly, and also that there is a correct record entry for the hostname in the zone file.

en	The hostname may not contain the following :

en	character

en	characters

en	The hostname must be a valid domain name, fully-qualified domain name, or IPv4 or IPv6 address.

en	The hostname must be unique. A connection with this hostname already exists.

en	The hostname of the server that provides the cell.

en	The hostname “ ” is already verified. You cannot disable verification.

en	The image format for the button icon.

en	The import of database “ ” had errors.

en	The incoming email sender’s address.

en	The information provided below is used to create a self-signed certificate and the corresponding certificate signing request. Since this is the information that users will see when they access a site via SSL, it is important to provide accurate and valid information.

en	The input must be a float number with up to .

en	decimal place

en	decimal places

en	The input must be a number between “ ” and “ ”.

en	The input must be a positive float number with up to .

en	decimal place

en	decimal places

en	The input must be a positive integer between “ ” and “ ”.

en	The input must be a valid function.

en	The input must be a valid hexadecimal color (including the pound sign). See the provided examples:

en	The input must be an integer or a combination of using these bitwise operators: .

en	The input parameter must be a string or a hash reference.

en	The input should be a negative whole number.

en	The input should be a positive whole number.

en	The input should be a valid hexadecimal color (excluding the pound sign).

en	The input should be a valid hexadecimal color (including the pound sign).

en	The input should be a whole number.

en	The input should be zero or a positive whole number.

en	The input should contain a dollar (USD) amount.

en	The input should only contains numbers.

en	The input value for Idle Check Interval cannot exceed 4 digits.

en	The input value for Idle Check Interval must be an integer greater than 0.

en	The input value for Idle Hibernate Timeout (Seconds) cannot exceed 4 digits.

en	The input value for Idle Hibernate Timeout (Seconds) must be a valid positive integer.

en	The input value for MDBOX rotation interval cannot exceed 6 characters.

en	The input value for MDBOX rotation size cannot exceed 4 characters.

en	The input value for Maximum Number of Authentication Processes cannot exceed 4 digits.

en	The input value for Maximum Number of Authentication Processes must be a positive whole number.

en	The input value for Maximum Number of Mail Processes cannot exceed 4 digits.

en	The input value for Maximum Number of Mail Processes must be a positive whole number.

en	The input value for Maximum Connections Per Address cannot exceed 4 digits.

en	The input value for Maximum Connections Per Address must be a positive whole number.

en	The input value for Maximum Connections Per Address cannot exceed 4 digits.

en	The input value for Maximum Connections Per must be a positive whole number.

en	The input value for Number of Spare Authentication Processes cannot exceed 4 digits.

en	The input value for Number of Spare Authentication Processes must be a positive whole number.

en	The input value for Process Limit for Mail cannot exceed 4 digits.

en	The input value for Process Limit for Mail must be a positive whole number.

en	The input value for Process Memory Limit for Authentication cannot exceed 4 digits.

en	The input value for Process Memory Limit for Authentication must be a positive whole number.

en	The input value for Size of Authentication Cache cannot exceed 4 characters.

en	The input value for Spam Expire Time must be an integer greater than 0.

en	The input value for Spam Expire Time must be an integer less than 366.

en	The input value for Time to Cache Failed Logins cannot exceed 4 digits.

en	The input value for Time to Cache Failed Logins must be a positive whole number.

en	The input value for Time to Cache Successful Logins cannot exceed 4 digits.

en	The input value for Time to Cache Successful Logins must be a positive whole number.

en	The input value for Trash Expire Time must be an integer greater than 0.

en	The input value for Trash Expire Time must be an integer less than 366.

en	The input value for “Interval between IDLE ‘OK Still here’ messages” must be a positive whole number.

en	The installation failed with the above errors.

en	The installation failed, but you can attempt to complete the installation manually. Review the error messages for more details. Your website may not function as intended until you correct the errors.

en	The installation of “ ” is at or near end-of-life and requires an update.

en	The installation of “ ” is at or near end-of-life.

en	The installation path “ ” already exists.

en	The installed certificate covers the following domains:

en	The installed certificate does not cover this domain.

en	The integration configuration file for “ ” did not contain a “ ” or “ ” entry.

en	The interval is too large.

en	The issuer must be no more than 32 characters.

en	The kernel does not support .

en	The key ( ) in the “ ” service’s certificate differs from the system’s default key type ( ). The system will attempt to replace this certificate with a new one from the “ ” provider.

en	The key ID for the private key is “ ”.

en	The key can only be a string, not “ ”.

en	The key cannot be empty.

en	The key could not be processed. Please make sure it is in the correct format.

en	The key does not match the certificate.

en	The key failed to load due to an error:

en	The key file “ ” is too large ( ).

en	The key is invalid.

en	The key is shorter than the recommended length of .

en	bit

en	bits

en	The key may already exist on the server. You can automatically fill the key or paste the entire file above.

en	The key named “ ” was imported.

en	The key text was not valid.

en	The key with the name “ ” is currently “ ” for use when connecting to this account.

en	The key “ ” has been authorized.

en	The key “ ” has been deauthorized.

en	The key “ ” is unknown, so the system will not restore this key.

en	The key “ ” was deleted successfully.

en	The key, “ ” has an invalid value type of: “ ”.

en	The keys for the “ ” host in the file are out of date.

en	The largest size for temporary tables stored in memory. This does not include MEMORY tables. The value of will override this setting if it is a smaller value.

en	The last attempt to update was blocked.

en	The last character of Latitude is the hemisphere, which can only be N or S.

en	The last character of Longitude is the hemisphere, which can only be E or W.

en	The last few lines of these logs in reverse order have been included in this message.

en	The last service to request authentication (for example, )

en	The last time a request to update the address happened.

en	The last time the address changed.

en	The last username to request authentication

en	The length of the string cannot be greater than .

en	character

en	characters

en	The length of the string cannot be less than .

en	character

en	characters

en	The length of the string should be .

en	character

en	characters

en	zero

en	The license holder disabled the Market as previously indicated by the “ ” on .

en	The linked FTP account “ ” has been removed.

en	The linked subdomain “ ” has been removed.

en	The list below contains the associated hits to send with the report. If you see multiple hits, exclude any unrelated hits from the report to help the vendor identify the problem.

en	The list of addresses or address prefixes allowed to use this token. You can separate these items with commas, new lines, or any whitespace character. Leave this blank to allow any caller IP to use the token.

en	The list of addresses or ranges of servers allowed to use this token. You can separate these items with commas, new lines, or any whitespace character. Leave this blank to allow any caller IP to use the token.

en	The list should contain one entry per line. Each entry should be formatted as a Perl regular expression.

en	The list “ ” on the domain “ ” does not exist.

en	The local configuration has been moved to a temporary file.

en	The local file list contains:

en	The local part can only contain letters , numbers , periods, hyphens , and underscores .

en	The local part cannot exceed characters.

en	The local part of the forwarded email address cannot exceed characters.

en	The local part of the forwarded email address cannot start with a period, end with a period, or include two consecutive periods.

en	The local part of the forwarded email address contains invalid characters.

en	The local part “ ” for user “ ” is invalid.

en	The local server failed to transfer offloaded “ ” functionality for the user “ ”.

en	The local username cannot be empty.

en	The local username “ ” is not a valid username.

en	The locale field contains “ ” characters on line “ ”. The limit is “ ” characters.

en	The locale selected when you logged in is overriding your account’s locale setting. To use your account’s locale setting, click the “ ” button below.

en	The location to which the certificate authority will report exceptions. Either a or standard .

en	The location’s altitude, in meters.

en	The location’s horizontal precision, in meters. This value defaults to 10000m if nothing is set.

en	The location’s vertical precision, in meters. This value defaults to 10m if nothing is set.

en	The log data will appear here after you load it.

en	The log file contained the following information:

en	The log file for the restore of user “ ” is empty.

en	The log follower for “ ” indicated an internal error ( ).

en	The log is not available.

en	The log transmission for “ ” did not include a final status for the check. This may indicate a failure. Check the “ ” file for more information.

en	The log transmission for “ ” did not include a final status for the installation. This may indicate a failure. Check “ ” for more information.

en	The log transmission for “ ” did not include a final status for the uninstallation. This may indicate a failure. Check “ ” for more information.

en	The log transmission for “ ” included a failure status ( ) for the installation.

en	The log transmission for “ ” included a failure status ( ) for the uninstallation.

en	The login is invalid.

en	The lookup failed because of an error:

en	The mail provider “ ” is no longer on the Common Mail Providers list.

en	The mail queue does not contain any messages on hold.

en	The mail server delivered this message successfully.

en	The mail server is currently delivering this message.

en	The mailing list “ ” is already configured.

en	The mailing list “ ” is not delegated to you.

en	The mailing list “ ” was successfully deleted.

en	The mailing list “ ” was successfully updated.

en	The main address of your server is “ ”. The hostname does not resolve to this address.

en	The main domain, , was restored when the account was created.

en	The master authentication process keeps a cache of validated logins so that it does not need to recheck the login credentials each time mail is retrieved. This specifies the amount of memory used for the cache, in .

en	The maximum memory usage (in ) of ’s internal “ ” service. Each / certificate that tracks requires additional memory. Servers with many domains may need to increase this value to ensure that operates correctly.

en	The maximum memory usage of the and login processes, in .

en	The maximum memory usage of the and processes, in . These processes read mostly memory-mapped files, so setting a high limit should not affect your server’s performance.

en	The maximum number of server processes.

en	The maximum number of aborted connection attempts per host before the host is blocked by the server. This does not protect against brute force attempts.

en	The maximum number of characters for the email address list is “ ”.

en	The maximum number of concurrent deliveries per user. A value of “ ” disables the per-user limit.

en	The maximum number of email addresses in the email address list is “ ”.

en	The maximum number of redirections a domain can use and still pass an HTTP-based Domain Control Validation.

en	The maximum permitted number of simultaneous client connections.

en	The maximum price is $ USD.

en	The maximum size in bytes for user-created MEMORY tables.

en	The maximum size to which a mailbox file may grow before the system rotates it.

en	The maximum time that an mailbox file may exist before the system rotates it.

en	The method that the provider uses to issue the certificate.

en	The method “ ” is not supported.

en	The minimum number of processes that the system will attempt to reserve in order to accept more client connections.

en	The minimum price is $ USD.

en	The minimum size of the buffer that is used for queries that cannot use an index and instead, perform a full table scan. Increase gradually to get potentially faster full joins when adding indexes is not possible. Best left low globally and set high in sessions that require large full joins.

en	The minimum spam score must be numeric.

en	The module does not contain a process_config_file_permission policy, skipping …

en	The module does not contain any security rules, skipping …

en	The module “ ” is missing the required .

en	method

en	methods

en	The most common network portion will be /64. The network portion might be as low as /48, or as high as /128, which would be a single IPv6 address.

en	The mysql server’s address is .

en	The name associated with the service provider.

en	The name by which the server identifies itself when sending mail from “ ”.

en	The name can contain up to 50 characters; it may contain spaces, numbers, letters, hyphens, and underscores; and it begin with a letter or number.

en	The name must be 50 characters or less, start with a letter or a number, and may only contain: spaces, numbers, letters, hyphens, and underscores.

en	The name of a database user on this system may include only the following characters:

en	The name of another account on this server has the same initial as the given username ( ). Each username’s first must be unique.

en	character

en	characters

en	character

en	characters

en	The name of the profile. Once saved, you cannot change the Profile Name.

en	The name of the database profile. Once you save this, you cannot change the Profile Name.

en	The name of the sender of the message received by the autoresponder, if available.

en	The name of the token that you are creating.

en	The name or full path of the slow query log file.

en	The name parameter is not valid.

en	The name “ ” does not begin with the required prefix “ ”.

en	The name “ ” is invalid:

en	The new certificate is the same certificate as the previous one.

en	The new configuration is not valid. Additionally, the system could not restore the previous configuration:

en	The new group will be added when the current item is added to the plugin that is to be generated.

en	The new name must be different from the old name.

en	The newly created account “ ” will gain full access to the database.

en	The next name to query depending on the value of the “Flag” field. Must be a fully qualified domain-name.

en	The next time that the “ ” provider attempts to renew the certificate, the system will attempt to add the following to that certificate:

en	domain

en	domains

en	The node “ ” is too long:

en	The notes must be at most characters.

en	The notification settings for your specific user account can be modified .

en	The number must be an even multiple of .

en	The number of processes to spawn to process code for web server requests.

en	The number of days between each execution of the cron job, or the day of the month on which you wish to run the cron job. For example, 15 to run the cron job on the 15th of the month.

en	The number of days that you wish to keep logs and messages in the queue:

en	The number of days to keep logs must be a positive integer.

en	The number of days to keep messages before the function removes them. This function only works if the function is enabled.

en	The number of days to keep messages before the function removes them. This function only works if the function is enabled.

en	The number of desired characters must be at least 1 and at most 256.

en	The number of failures per IP address before a one-day block must be greater than or equal to the number of failures per IP address before normal brute force protection.

en	The number of file descriptors available for use.

en	The number of hours between each execution of the cron job, or the hour each day (in military format) at which you wish to run the cron job. For example, 2100 to run the cron job at 9:00pm.

en	The number of hours to wait between responses to the same email address, or zero to always respond.

en	The number of minutes between each execution of the cron job, or the minute of each hour on which you wish to run the cron job. For example, 15 to run the cron job every 15 minutes.

en	The number of minutes during which the mail server accepts a resent email from an unknown triplet.

en	The number of minutes during which the mail server defers email from an unknown triplet.

en	The number of months between each execution of the cron job, or the month of the year in which you wish to run the cron job. For example, 7 to run the cron job in July.

en	The number of regions that the buffer pool is divided into. For systems with buffer pools in the multi-gigabyte range, dividing the buffer pool into separate instances may improve concurrency, by reducing contention as different threads read and write to cached pages.

en	The number of seconds after which an idle process is set to be killed so it releases CPU time and RAM.

en	The number of seconds that the system will wait for a response from the remote server.

en	The number of seconds the server waits for activity on a connection before closing it.

en	The number of seconds to delay before moving users to the IMAP hibernate process. This will help save system memory. A value of “0” disables this option.

en	The number of threads the server stores in a cache for re-use.

en	The number of unique domains each certificate can contain.

en	The number of users on the server exceeds the maximum number of allowed users for your host server.

en	The number should be greater than .

en	The number should be greater than or equal to .

en	The number should be less than .

en	The number should be less than or equal to .

en	The number you have entered can not be equal to .

en	The number you have entered is not equal to .

en	The one-click installer will write files in to the selected domain’s document root. The installer will overwrite any files that exist whose names match a file name that is part of the installation.

en	The only value for this address must be “ ”. This is the name that this server sends with ’s “ ” command to send “ ”’s outgoing email.

en	The only legal values for are and .

en	The operating system version.

en	The operation on “ ” succeeded.

en	The operation “ ” “ ” failed with a “ ” error.

en	The operation “ ” “ ” failed with a “ ” error:

en	The operation “ ” “ ” succeeded.

en	The option “ ” is invalid.

en	The order item not match any entries in the pending queue.

en	ID

en	IDs

en	does

en	do

en	The order was successful.

en	The order was unsuccessful.

en	The original address, “ ”, is not available. The system will use one of your available unused addresses instead.

en	The original message:

en	The overall hash check of the backup failed: Expected “ ” but received “ ”.

en	The package and feature list settings for the user “ ” have been set to because the package “ ” does not exist on the system and could not be recreated due to an error:

en	The package name “ ” does not refer to an existing package you are authorized to edit.

en	The package that you choose determines these settings. For example, you can only select an IP address if the selected package includes a dedicated IP address.

en	The package “ ” already exists.

en	The package “ ” already exists. If you wish to make changes, please edit the package.

en	The package “ ” conflicts with this version of . The system renamed the file “ ” to “ ”.

en	The package “ ” does not exist.

en	The package “ ” failed to install: “ ”.

en	The package “ ” failed to uninstall: “ ”.

en	The package “ ” is already installed.

en	The package “ ” must be installed first.

en	The page number “ ” does not exist. Only “ ” pages exist.

en	The parameter has no values. Enter a value for the parameter and try again.

en	The parameter path is required.

en	The parameter ‘file’ is required.

en	The parameter ‘path’ is required.

en	The parameter ‘permissions’ must contain a valid file system permission.

en	The parameter “ ” contains an invalid value. The named values “ ” and “ ” are mutually exclusive.

en	The parameter “ ” contains whitespace. This function cannot accept whitespace.

en	The parameter “ ” is not a known option.

en	The parameter “ ” is required and must be a non-empty .

en	The parameter “ ” is required and must be a non-empty hashref.

en	The parameter “ ” is required.

en	The parameter “ ” may not contain null bytes.

en	The parameter “ ” may not contain single-quote characters (apos()).

en	The parameter “ ” may not contain slashes.

en	The parameter “ ” must be .

en	The parameter “ ” must be .

en	The parameter “ ” must be a coderef.

en	The parameter “ ” must be a valid string.

en	The parameter “ ” must be a whole number.

en	The parameter “ ” must be an arrayref.

en	The parameter “ ” must be either the number of days: “ ” or a Unix Epoch time in the future: “ ”.

en	The parameter “ ” must contain only lowercase letters, numbers, hyphens ( ), and underscores ( ).

en	The parameter “ ” must contain the attribute “ ”.

en	The parameter “ ” should be an object of the class “ ”.

en	The parameter “ ” specified is not valid:

en	The parameter “ ” was passed the invalid value of “ ”.

en	The parameter “ ” with a value of “ ” must be a valid system user.

en	The parameter, , is not quoted.

en	The parked domain “ ” is not a valid domain name:

en	The passphrase for the key “ ” is incorrect.

en	The passphrase may not begin or end with a space.

en	The passphrase must be at least long.

en	character

en	characters

en	The passphrase must be no longer than .

en	character

en	characters

en	The passphrase provided was incorrect.

en	The passphrase was incorrect.

en	The password for the Web Disk account “ ” has been successfully changed.

en	The password for “ ” could not be changed because: “ ”.

en	The password for “ ” has been changed without results: “ ”.

en	The password has a strength of , but your system requires a strength of .

en	The password of the account to transfer.

en	The password of the account on the remote server.

en	The password strength must be at least .

en	The password that you entered has a strength rating of “ ”. You cannot use it because it is too weak and too easy to guess. Please enter a password with a strength rating of “ ” or higher.

en	The password that you entered is incorrect. Try again.

en	The password that you provided is not correct, or the key is not permitted access:

en	The password you entered does not match “ ”.

en	The password you selected cannot be used because it is too weak and would be too easy to guess.

en	The passwords do not match.

en	The path contain literal and substitution variables:

en	The path begin with a forward slash (/).

en	The path end with a forward slash (/).

en	The path cannot contain the directory references, whitespace, or the following characters:

en	The path cannot contain the following characters:

en	The path for the repository’s directory.

en	The path must begin with a forward slash (/).

en	The path must end with a forward slash (/).

en	The path or port number is valid.

en	The path provided is not a file:

en	The path “ ” does not exist.

en	The path “ ” is not a database backup file.

en	The path “ ” is not a valid cPanel theme document root.

en	The path “ ” is not inside the user’s home directory ( ).

en	The person needs to know the password.

en	The pid file “ ” already exists and contains non-digit characters. Remove the file first if you really wish to use this file as the pid file.

en	The plugin file “ ” was generated successfully. Please before creating a new one.

en	The port number must be a positive integer.

en	The port number must be an integer between 1 and 65535.

en	The port number must be between and .

en	The port that the system uses to communicate with the remote server.

en	The port “ ” is not a known service port.

en	The port “ ” is not valid.

en	The previous configuration is now invalid.

en	The previous document root for “ ” was not restored because “ ” is outside the previous home directory paths .

en	The primary color on the button.

en	The primary text color on the button.

en	The primary virtual hosts file ( ) already exists. If you really want to rebuild this file from ’s configuration, you must delete this file first. Ordinarily, ’s configuration is built from the primary virtual hosts file, not the other way around.

en	The private key failed to load for “ ”. It does not exist or you do not have permission to view it.

en	The private key failed to load: The request did not contain the “ ” field.

en	The private key has been deleted:

en	The private key may already be on your server. You can either paste the private key here or try to retrieve the matching key for your certificate.

en	The private key “ ” could not be deleted because an error occurred:

en	The private key’s passphrase.

en	The privileges for the user “ ” on the list cannot be modified because you do not have an email account with that name.

en	The process dumped a core file.

en	The process failed.

en	The process failed. Run the following command from the command line:

en	The process has run for “ ”.

en	The process id “ ” is not valid.

en	The process timed out while waiting for the remote pkgacct session “ ” to finish.

en	The process timed out while waiting for the remote transfer session “ ” to finish.

en	The process with ID “ ” should have the effective user “ ” (UID ), but its effective user is actually “ ” ( ).

en	The process with ID “ ” was invoked with the command “ ”, which does not match the given pattern:

en	The process with ID “ ” was invoked with the command “ ”, which the system explicitly ignores.

en	The process “ ” is still running with the process IDs:

en	The process “ ” stalled while it processed statistics and bandwidth data for user “ ”.

en	The process “ ” stalled while it ran for user “ ”.

en	The processor failed to start because the session “ ” has been aborted.

en	The processor failed to start because the session “ ” is pausing.

en	The product with “ ” does not have the attribute “ ”.

en	The profile activation log is located at:

en	The profile “ ” already exists and the “ ” param was not true.

en	The profile “ ” is valid.

en	The program you have chosen to pipe to ( ) has the following problems:

en	The proposed repository root, , is already under version control.

en	The protocol should be followed by a colon and two forward slashes. (Example: )

en	The provided URL does not point to a valid vendor specification file.

en	The provided clone URL include a valid protocol.

en	The provided optional parameters are invalid.

en	The provided password is incorrect.

en	The provided primary contact email address, , is not valid.

en	The provided secondary contact email address, , is not valid.

en	The provided theme name “ ” is not a valid theme name.

en	The provided theme “ ” is not available to this user.

en	The provided username is invalid.

en	The provided “ ” directory does not reside in the user’s home directory, the “ ” directory.

en	The provider does not issue certificates that include more domains than the current certificate includes.

en	The provider is not configured.

en	The provider module “ ” does not allow changes to attribute values.

en	The provider module “ ” must extend the module “ ”.

en	The provider name “ ” is invalid.

en	The provider supplied the following remarks about the address allocation:

en	The provider supports wildcard domains.

en	The provider “ ” is not enabled for any services with authentication.

en	The provider’s button label.

en	The provision process exited with errors. Please check the log for details.

en	The provision process is complete.

en	The pseudo-user “nobody” is not permitted to send email.

en	The pseudo-user “nobody” is permitted to send email.

en	The public and private key are similar to a puzzle. They are created together to use during the login/authentication process. The public key resides on the server (the remote location). The private key resides locally on your computer/server. When you attempt to login to a server, the public and private key are compared. If they match, then you will be allowed to login to the server location.

en	The public and private key are similar to a puzzle. They are created together to use during the login/authentication process. The public key resides on the server (the remote location). The private key resides locally on your computer/server. When you attempt to login to a server, the public and private key are compared. If they “match”, then you will be allowed to login to the server location.

en	The public can now view the information that you provided in this form.

en	The publication process will delete and backup all content from the “ ” directory and subdirectories. The system stores this backup in the “ ” directory. You must manually restore the backup if you choose to publish the new website.

en	The publishing process failed. Please try again.

en	The query “ ” failed because of an error:

en	The question cannot be longer than 128 characters.

en	The question must be at least 2 characters long.

en	The question must be unique.

en	The queue is currently empty.

en	The quota for the email account “ ” was successfully modified.

en	The quota for the “ ” user is now MB ( blocks).

en	The quota must be a number or “unlimited”.

en	The quota setup process completed successfully.

en	The range is still in use

en	The range overlaps with another existing range:

en	The range should be a shortened IPv6 address that ends with a slash (/), followed by a number which indicates the network portion of the IPv6 address range.

en	The raw log file is attached to this email.

en	The real name field cannot contain characters.

en	The rearrangement of home directories on the account is complete.

en	The reason for the block

en	The reason for your submission.

en	The rebuild failed because the system could not create the file “ ” because of an unknown error.

en	The rebuild failed because the system could not open the datastore file “ ”.

en	The rebuild failed because the system could not open the directory “ ” because of an error:

en	The rebuild failed because the system could not open the file “ ” because of an error:

en	The rebuild failed because the system could not read the file “ ” because of an error:

en	The rebuild failed because the system could not rewind the file pointer for “ ” because of an error:

en	The rebuild failed because the system could not write the file “ ” because of an error:

en	The recommended key size for a certificate is currently .

en	bit

en	bits

en	The record is not a valid list of tags and values.

en	The record requires the “ ” tag.

en	The records cannot contain duplicate “ ” tags.

en	The redirect for this provider are generated based upon the certificate for the service. You can to update that certificate.

en	The redirect for this provider.

en	The redirect for “ ” has been removed.

en	The redirect to “ ” for your Ruby on Rails application “ ” has been deleted.

en	The redirect was successfully removed.

en	The redirect “ ” on “ ” has been removed.

en	The remote dump ended successfully.

en	The remote dump failed because of a collation error. The system will retry with the “ ” character set.

en	The remote dump failed because of an error ( ).

en	The remote account “ ” cannot transfer because an account with the same username exists on the local server.

en	The remote account “ ” cannot transfer because the first the local username “ ”.

en	non-special character matches

en	non-special characters match

en	The remote basic credential check failed due to an error ( ) and response:

en	The remote certificate is self-signed.

en	The remote computer’s address is assigned to the provider:

en	The remote computer’s browser language setting appears to be: “ ”.

en	The remote computer’s location appears to be: ( ).

en	The remote computer’s network link type appears to be: “ ”.

en	The remote computer’s operating system appears to be: “ ” with version “ ”.

en	The remote computer’s operating system appears to be: “ ”.

en	The remote execution of “ ” failed, or the requested account, “ ”, was not found on the server: “ ”.

en	The remote file list contains:

en	The remote host address must be a valid hostname or IP address.

en	The remote host address must not contain a port number.

en	The remote host address must not contain a protocol.

en	The remote host address must not contain path information.

en	The remote hostname does not match the installed certificate.

en	The remote server didn’t report a correct checksum of the archive. Ensure that you selected the correct type of remote server.

en	The remote server does not appear to be running a supported version of cPanel.

en	The remote server is creating the backup file “ ”.

en	The remote server lacks the ability to export its “ ” configuration.

en	The remote server “ ” does not possess the required services for a “ ” node. To link a server as a “ ” node, the server must support the . The remote server is missing the .

en	service

en	services

en	service

en	services

en	The remote server “ ” unexpectedly terminated the connection. The port may be incorrect, or the remote server may not allow connections from this server:

en	The remote server “ ” uses version “ ”. The minimum version that the system supports for “ ” nodes is version “ ”.

en	The remote server’s account username.

en	The remote transfer session “ ” failed.

en	The remote username cannot be empty.

en	The remote username “ ” is not a valid username.

en	The remote “ ” command failed because of an error:

en	The report contains the complete text of the rule.

en	The report contains the following raw :

en	The reported error message was: “ ”

en	The repository name may include the “ ” and “ ” characters.

en	The repository name may not contain .

en	The repository path should begin with “:” if it includes the protocol.

en	The request failed. (Error ID: ) Ask your hosting provider to research this error in ’s main error log.

en	The request has timed out.

en	The request must include the code and associated redirect arguments to retrieve the token.

en	The request timed out.

en	The requested does not contain the needed metadata. Skipping installation …

en	The requested , “ ”, is blacklisted and the system cannot install or update it.

en	The requested , “ ”, is not available from the currently configured vendors.

en	The requested , ” ”, is deprecated and the system cannot install it.

en	The requested does not contain your session’s correct security token.

en	The requested action is a duplicate.

en	The requested action, “ ”, is not supported.

en	The requested application, , is invalid.

en	The requested blocked mail message “ ” does not exist.

en	The requested email account, , is invalid.

en	The requested log file for the domain “ ” is empty.

en	The requested log file “ ” could not be found.

en	The requested mailing list address, “ ”, conflicts with the forwarder “ ”. To create a mailing list named “ ”, you must first delete the forwarder that conflicts with that name.

en	The requested message has been reset.

en	The requested message “ ” at the path “ ” is not readable.

en	The requested message “ ” does not exist.

en	The requested page was not found.

en	The requested provider “ ” is not valid.

en	The requested resource exceeds this server’s payload size limit.

en	The required parameter “ ” is missing.

en	The required parameter “ ” is not set during creation of “ ”.

en	The required parameter “ ” is not set.

en	The required parameters are invalid or missing.

en	The required setuid bit is not set for required program, . Set the correct permissions on the program, .

en	The required setuid bit is not set for required program, . Set the correct permissions on the program, .

en	The reseller “ ” now has access to any free IP addresses on the server.

en	The response exceeded the maximum length ( ). ( …)

en	The response to the “ ” request from “ ” indicated an error ( , ):

en	The rest of the upgrade process requires no user input, but you can perform it interactively.

en	The restoration of parked and addon domains has been disabled by request.

en	The restoration of “ ” will happen after the prerequisite domain “ ” is processed.

en	The restoration process did not restore files or directories because has discontinued support.

en	The restore database process was terminated.

en	The restore failed because the username “ ” is invalid or not an existing user.

en	The restore has failed because the “ ” restore module has been skipped by request and the account “ ” does not already exist.

en	The restore point is invalid:

en	The restore session failed with the following error:

en	The results available below may not contain the record or records you are looking for.

en	The reverse trust relationship could not be established from the remote server to this server.

en	The reverse trust relationship has been established from the remote server to this server as well using API token named “ ”.

en	The reverse trust relationship has been established from the remote server to this server as well.

en	The rollback operation “ ” failed because of an error:

en	The root escalation method “ ” was unsuccessful, now using “ ”.

en	The rsync object failed to instantiate:

en	The rule generates false positive hit entries

en	The rule is invalid. returned the following error:

en	The rule is too strict

en	The rule with ID number “ ” is not unique. There are multiple rules that use the same ID number within the “ ” vendor rule set.

en	The rule with ID number “ ” is not unique. There are multiple rules that use the same ID number within your user-defined rule set.

en	The rule with id “ ” does not exist.

en	The scan type “ ” is disabled for this account.

en	The schema version for “ ” was not correct: Received “ ”, but required “ ”.

en	The script does not contain the name property.

en	The search matches .

en	record

en	records

en	The second set of digits of Latitude are for Minutes. Minutes must be a 1 or 2 digit number between 0 and 59.

en	The second set of digits of Longitude are for Minutes. Minutes must be a 1 or 2 digit number between 0 and 59.

en	The secret key requires a passphrase.

en	The security code is invalid.

en	The security code must contain six digits.

en	The security code must contain six numeric digits.

en	The security measure is not configured in the module meta-data. It requires a name property.

en	The security token in your request is invalid.

en	The security token is missing from your request.

en	The selected domains now inherit a version. You can see the inherited version in each domain’s row in the table.

en	The selected file exceeds the maximum size ( ).

en	The selected file is empty.

en	The selected tier doesn’t exist on the update server.

en	The selected tier requires a downgrade.

en	The server cannot contact the to validate your login. Verify that your server’s firewall allows IP addresses for “ ” to connect. Error code:

en	The server contains .

en	application that is at or near end-of-life and requires an update

en	applications that are at or near end-of-life and require updates

en	The server contains .

en	application that is at or near end-of-life

en	applications that are at or near end-of-life

en	The server could not find any keys for the specified ticket and server: , ,

en	The server could not validate against the . You must manually import the key from the . To read about how to manually import keys into , read our documentation.

en	The server detected that an SSH key for user “ ” in Ticket ID “ ” and Server “ ” already exists. Run the following script and refresh your browser:

en	The server does not currently monitor the “ ” service.

en	The server failed to communicate with .

en	The server failed to offload mail functionality and storage to “ ” for the user “ ”.

en	The server failed to remove the connection to the linked node.

en	The server failed to retrieve an access token from the Customer Portal. Status Code:

en	The server failed to synchronize the system account’s mail because an error happened:

en	The server failed to synchronize “ ”’s mail because an error happened:

en	The server failed to transfer mail functionality and storage for the user “ ” from the child node “ ” to the child node “ ”.

en	The server failed to transfer offloaded “ ” functionality and storage to the local server for the user “ ”.

en	The server has before enabled.

en	The server has .

en	unmonitored service

en	unmonitored services

en	The server has generated the private key as requested. To use this private key on another server, copy and paste the information from the encoded field below.

en	The server has no configured resolvers.

en	The server is unable to contact the Customer Portal to transmit the key. Manually import the key from the Customer Portal. For more information on how to manually import keys into , see .

en	The server may be misconfigured.

en	The server name must be a valid host name or ip address.

en	The server name, username, and API token are required.

en	The server profile is already set to “ ”.

en	The server received a bad response while acting as a proxy.

en	The server received a malformed response from the Customer Portal.

en	The server records have not updated after . The system will try again in .

en	second

en	seconds

en	second

en	seconds

en	The server reserves this subdomain for system use only. Enter a different subdomain.

en	The server saved the backup file in the “ ” directory.

en	The server successfully offloaded all mail storage and functionality for the user “ ” to the child node “ ”.

en	The server successfully transferred all mail storage and functionality for the user “ ” from the child node “ ” to the child node “ ”.

en	The server successfully transferred all offloaded “ ” storage and functionality for the user “ ” to the local server.

en	The server time and the ® time are different.

en	The server was unable to contact the Customer Portal.

en	The server will act as a backup mail exchanger. The system will hold mail for this domain until a lower number mail exchanger is available.

en	The server will always accept mail for this domain. The system will deliver mail to the local mailbox.

en	The server will approve all of the hosts that you define to send email. The server automatically includes your primary mail exchanger and any servers for which you created an record.

en	The server will not accept mail for this domain. The system sends all mail for this domain to the lowest numbered mail exchanger.

en	The server will now attempt to revert any changes.

en	The server “ ” configured as its nameserver.

en	The server “ ” configured the nameserver as a monitored service.

en	The server “ ” failed to configure as its nameserver.

en	The server “ ” failed to configure the nameserver as a monitored service.

en	The server’s current health statistics are:

en	The server’s firewall configuration has been updated.

en	The server’s hostname conflicts with domain ownership for the user “ ”.

en	The server’s hostname “ ” is currently owned by the user “ ”.

en	The server’s session with the has timed out. Refresh your browser and log in to the .

en	The service account is invalid.

en	The service is down.

en	The service is unavailable.

en	The service “ ” appears to be down.

en	The service “ ” does not support authentication.

en	The service “ ” failed to send the expected response from the socket “ ” because of an error:

en	The service “ ” failed to send the expected response to host “ ” and port “ ” because of an error:

en	The service “ ” failed to start with the message:

en	The service “ ” is not valid.

en	The service “ ” is now operational.

en	The service “ ” does not allow spaces in “ ” for the service. Cipher list: “ ”.

en	The service, , has been deprecated and will be removed automatically in and .

en	day

en	days

en	hour

en	hours

en	The service, , needs to be upgraded and will be upgraded automatically in and .

en	day

en	days

en	hour

en	hours

en	The session ID “ ” does not exist.

en	The session ID “ ” may only contain alphanumeric characters and underscores.

en	The session has already started and cannot accept additional inputs. Would you like to view the transfer session?

en	The session with the Customer Portal timed out. Refresh your browser and log in to the Customer Portal.

en	The setting, , has changed since the last time you saved this page.

en	The setting, , was not set in the configuration file, so the default has been used.

en	The settings were not syntactically valid. ( ) The changes were not saved.

en	The settings were not syntactically valid. The changes were not saved.

en	The shared IP address cannot enumerate more IP addresses.

en	The shared address book “ ” for “ ” already exists.

en	The shared contact for “ ” already exists.

en	The shell name may only contain the following characters:

en	The signing key was not available on the remote server.

en	The size in bytes of the buffer pool. The buffer pool is the memory area where caches table and index data.

en	The size in bytes of the buffer used when reading rows from a table in sorted order after a key sort. Increasing this setting may improve performance.

en	The size of each log file in a log group. Larger values mean less disk I/O due to less flushing, but also slower recovery from a crash.

en	The size of sort buffers used to sort data during creation of an index. A large sort buffer may lead to fewer merge phases while sorting.

en	The size of the buffer that uses to write to the log files on disk. Increasing this value means larger transactions can run without needing to perform disk I/O before committing.

en	The size of the uncompressed file is “ ”.

en	The source account can edit records. The system will update those records as needed.

en	The source account cannot edit records. Because of this, the system cannot redirect queries from the source server’s cluster.

en	The source directory, , is a symlink, and will not be copied.

en	The source server ( ) appears to be the local server. Skipping service proxy setup …

en	The source server ( ) runs version , but this module requires version or higher.

en	The source server does not contain a valid license. You cannot transfer accounts from an unlicensed server.

en	The source server has a version older than 55. Therefore, transferring system configurations is not available.

en	The source server is not running the same Roundcube database type as the target server.

en	The source server is not running the same major version as the target server.

en	The source server is using . Service Configuration transfer is only available when the source server is using .

en	The spam filters will always allow these items.

en	The spam filters will never allow these items.

en	The specified , , appears to point to .

en	The specified domain does not match the email address.

en	The specified path does not exist:

en	The specified providers are missing or invalid.

en	The specified record’s details are already visible. See the corresponding popup window.

en	The specified service account does not exist.

en	The specified user does not exist.

en	The staging directory stores update data before the system applies it. Make sure to select a directory with enough disk space.

en	The start index ( ) is larger than the total number of results ( ).

en	The status for Two-Factor Authentication has changed, possibly in another browser session.

en	The status for has changed, possibly in another browser session.

en	The status for has changed, possibly in another browser session.

en	The stop time must be later than the start time.

en	The subaccount GUID parameter is missing from the Team configuration file, so no services were removed.

en	The subaccount could not be deleted due to the following error “ ”.

en	The subdirectory that will contain your website already contains other files or directories.

en	The subdomain “ ” has been added.

en	The subdomain “ ” has been removed.

en	The subdomain “ ” has been successfully removed.

en	The subdomain “ ” is not a valid domain name:

en	The subdomain “ ” is not valid.

en	The subdomain “ ” is reserved.

en	The subject of the message sent to the autoresponder.

en	The subject_unique_identifier must not be a reference.

en	The submitted username is invalid.

en	The subprocess ended prematurely because it received the “ ” ( ) signal.

en	The subprocess reported error number when it ended.

en	The subprocess with “ ” ended prematurely because it received the “ ” ( ) signal:

en	The subprocess with “ ” reported error code “ ” when it ended:

en	The subprocess with “ ” reported errors:

en	The subprocess “ ” ended prematurely because it received the “ ” ( ) signal.

en	The subprocess “ ” reported error number when it ended.

en	The supplied address “ ” is not a valid IP address.

en	The supplied domain name is invalid.

en	The supplied session ID has an invalid session type. You must provide a session ID with a session type of “ ”.

en	The supplied subdomain name, , conflicts with an existing service subdomain.

en	The system clone this repository if you do not trust the host key for “ ”. To create your repository, select one of the following options:

en	The system connect to the remote repository if you do not accept the host key for “ .”

en	The system aborted the subprocess because it reached the timeout of .

en	second

en	seconds

en	The system aborted the subprocess with the “ ” because it reached the timeout of .

en	second

en	seconds

en	The system aborted the subprocess “ ” (process “ ”) because it reached the timeout of .

en	second

en	seconds

en	The system aborted the subprocess “ ” because it reached the timeout of .

en	second

en	seconds

en	The system added new features during this upgrade. You can enable some of these features directly in this interface.

en	The system added the registry entry for “ ”.

en	The system added the following configuration directives:

en	The system added the missing domain “ ” to repair the for “ ”.

en	The system administrator has disabled the ability to create this type of forwarder.

en	The system administrator has not given the “ ” feature to your account.

en	The system administrator manages the stats programs.

en	The system administrator only allows this account to use the .

en	version

en	versions

en	The system administrator removed two-factor authentication from your “ ” account.

en	The system already possesses a node linkage with alias “ ” to the server with hostname “ ”.

en	The system also attempted to avoid via a direct connection to WHM on “ ”. However, the connection failed its validation ( ). Because of this, “ ” cannot prove its identity, and an attacker may be impersonating that server.

en	The system always assigns these privileges to newly-created reseller accounts.

en	The system always assigns these privileges to newly-created reseller accounts. If you remove any of these privileges, it may impact the experience of resellers.

en	The system attempted to add an authentication key to the package manager but failed:

en	The system attempted to create a directory “ ” for you to save your data manually, but the system failed to create this directory because of an error:

en	The system attempted to create a directory “ ” to save an authentication key, but the system failed to create this directory because of an error:

en	The system attempted to mirror an authentication key but failed: “ ”.

en	The system attempted to save the database archive data to the directory “ ” for you to restore your data manually; however, the system failed to save this data.

en	The system attempts to prevent particularly insecure passwords, but it is not foolproof.

en	The system automatically executes this function when clustering is enabled.

en	The system automatically generated your credentials, which are not available anywhere else. Save these credentials or use them to log in now and set up another account.

en	The system automatically grants access to packages that the user creates, unless you limit account creation to pre-assigned packages below.

en	The system automatically reset the / root password in order to restore normal operations.

en	The system automatically sends messages to the folder when their spam score exceeds the ( ).

en	The system automatically set the following services to unmanaged in your file:

en	The system backed up the previous configuration to “ ”.

en	The system blacklisted the sender and deleted the , but there were warnings for .

en	message

en	messages

en	one of the messages

en	some of the messages

en	The system blacklisted the sender and deleted the .

en	message

en	messages

en	The system blacklisted the senders and deleted the , but there were errors for .

en	message

en	messages

en	one message

en	some of the messages

en	The system blocks IP addresses with excessive login failures for a duration of “ ” .

en	day

en	days

en	The system blocks addresses for . You can configure this value with the “ ” option.

en	minute

en	minutes

en	The system blocks outbound emails from because you configured the system to automatically block accounts that it detects as potential spammers.

en	this email account

en	these email accounts

en	The system blocks users for . You can configure this value with the “ ” option.

en	minute

en	minutes

en	The system bypassed the zone consistency check because was not available.

en	The system can only activate one profile at a time.

en	The system cannot abort the deletion of the following :

en	user

en	users

en	The system cannot accept “ ” as a domain name ( ).

en	The system cannot accept “ ” as a domain name.

en	The system cannot alter a user without a password.

en	The system cannot alter a user without a username.

en	The system cannot change the from “ ” to “ ” because that already exists.

en	The system cannot change the master entry ( ).

en	The system cannot change the master entry .

en	The system cannot check the promotion preferences:

en	The system cannot check the kernel status:

en	The system cannot contact one or more cluster members. They may exist in an inconsistent state when they reboot. This can cause failed queries.

en	The system cannot continue because you did not provide a password.

en	The system cannot continue because you did not specify a mailing list.

en	The system cannot continue because you gave no database name.

en	The system cannot continue because you gave no username.

en	The system cannot convert the user “ ”.

en	The system cannot create a SQLite database for “ ”. The “ ” user does not have a home directory.

en	The system cannot create the common domain “ ”. You must choose a different domain name.

en	The system cannot create the directory “ ” in restricted mode.

en	The system cannot create the domain “ ” because it is a top-level domain or other public suffix. You must use a different domain name.

en	The system cannot create the lock with the “ ” path:

en	The system cannot create the registry. In this condition, the system cannot manage or upgrade this installation from this interface.

en	The system cannot create the “ ” file.

en	The system cannot delete a user without a username.

en	The system cannot delete the directory “ ”.

en	The system cannot determine the for “ ”. Contact “ ” for support.

en	The system cannot determine the archive’s database schema version because the system failed to load the file “ ” because of an error:

en	The system cannot determine the base domain for “ ” (i.e., the domain on which “ ” is parked).

en	The system cannot determine the main domain of the user “ ”.

en	The system cannot determine the value of the internal parameter “ ”.

en	The system cannot find a file named “ ”.

en	The system cannot find the .cpanel directory for “ ”.

en	The system cannot find the home directory for cPanel user “ ”.

en	The system cannot find the home directory for the user “ ”.

en	The system cannot get the log because the email directory for account “ ” does not exist.

en	The system cannot grant privileges on the MySQL database “ ” because of an error:

en	The system cannot grant privileges to the MySQL user “ ” because of an error:

en	The system cannot load the specified resource.

en	The system cannot manage repositories in the detached HEAD state.

en	The system cannot open the database “ ” because another process has created it but has not yet completed its initialization.

en	The system cannot open the “ ” file to write to it:

en	The system cannot process the file:

en	The system cannot read the image’s dimensions.

en	The system cannot redirect your app due to an error.

en	The system cannot release the lock at the “ ” path:

en	The system cannot remove outdated backups because it cannot read the contents of the directory:

en	The system cannot rename the user “ ” to “ ” because a symbolic link “ ” already exists and is not one of the user’s former home directories.

en	The system cannot restore the MySQL database “ ” because of an error:

en	The system cannot restore the account “ ” because an account with that name already exists on this system.

en	The system cannot restore the database “ ” because PostgreSQL version “ ” is required to restore a database in restricted mode and the installed version is “ ”.

en	The system cannot restore “ ” as a dynamic domain for “ ”. ( )

en	The system cannot set the MySQL account password for “ ” due to the following error “ ”.

en	The system cannot set the MySQL account password for “ ”.

en	The system cannot set the version to “ ” on a domain configured with

en	The system cannot update immutable files, and they may cause unforeseen problems with .

en	The system cannot update information for the repository at “ ” because it cannot access the remote repository.

en	The system cannot update the kernel:

en	The system cannot upgrade this service account to a . To access all the features within this interface, you must delete any accounts that share the same username or link this service account to a .

en	The system cannot upgrade your version of or because of at least one impediment:

en	The system cannot verify that the record updated after 120 seconds.

en	The system cannot write to the “ ” file:

en	The system changed the password for the database user “ ” to a random string because the original password used an old and insecure format that is incompatible with MySQL version ( ). You must manually change the password for “ ” to match the original password in order to ensure that applications that use the credentials will continue to function.

en	The system changed the permissions on the following files or directories:

en	The system changed the theme for user “ ” to “ ”, with the “ ” style, to support this feature.

en	The system cleared the tables.

en	The system completed the rebuild of the index.

en	The system completed the upgrade but the above errors occurred. The may not function as expected. You can manually resolve the issue or uninstall the .

en	The system confirmed that the certificate for the website “ ” is installed.

en	The system connected to “ ” on port “ ” but “ ” sent no response for , so the system has aborted the connection.

en	second

en	seconds

en	The system contacted “ ”, but the system failed to verify that “ ” is not the same server as “ ”. The system cannot link additional nodes until it completes that verification. If “ ” is no longer active, unlink it in the “ ” interface. The failure was:

en	The system copied the upgraded application back to:

en	The system could find the backup file.

en	The system could find the backup path.

en	The system could find the username.

en	The system could create temporary mysql environment because of an error: .

en	The system could locate not the required :

en	The system could not the “ ” file.

en	The system could not the “ ” file. You must the file manually.

en	The system could not access the account user’s directory for :

en	The system could not access the verification file “ ” for the email account “ ”.

en	The system could not activate the trial license.

en	The system could not add the record to “ ”:

en	The system could not add the address book to the search preferences for “ ”:

en	The system could not add the calendars to the free/busy list for “ ”:

en	The system could not add the domain forwarder:

en	The system could not add the forwarder:

en	The system could not add the vendor:

en	The system could not apply the patch:

en	The system could not apply the “ ” patch and returned the following error code:

en	The system could not apply the “ ” patch because the process failed to run.

en	The system could not assign the “ ” enhancement to the “ ” account.

en	The system could not automatically detect a control panel type or version on the source server.

en	The system could not build the report. The row from the table did not include the configuration file path.

en	The system could not build the report. The row from the table did not include the rule ID.

en	The system could not change into the “ ” upgrade working directory:

en	The system could not change to the “ ” directory and returned the following error:

en	The system could not check if the “ ” preference “ ” exists for “ ”:

en	The system could not chmod the “ ” file to “ ”: “ ” You must modify the file permissions manually.

en	The system could not chmod the “ ” file:

en	The system could not chmod “ ” to “ ” because of the following error: “ ”. You must correct the file permissions manually.

en	The system could not clean up the configuration files for the vendor.

en	The system could not complete the backup because a test of “ ” resulted in an error.

en	The system could not complete the backup because it could not mount “ ”.

en	The system could not complete the backup because legacy and current backup processes may not run concurrently, and the first backup process has not finished.

en	The system could not complete the backup because the configuration does not specify the backup directory.

en	The system could not complete your request.

en	The system could not connect to the / server because of an unknown error.

en	The system could not connect to the due to an error: “ ”. Run the “ ” command.

en	The system could not connect to the server:

en	The system could not contact the remote repository.

en	The system could not convert the table “ ” to .

en	The system could not convert the table “ ” to on “ ”.

en	The system could not copy the “ ” folder to working folder “ ”.

en	The system could not create a connection to the remote server because of a verification error. You can attempt to create an insecure connection between the servers instead.

en	The system could not create the “ ” for “ ”. It already exists.

en	The system could not create the database:

en	The system could not create the account.

en	The system could not create the address book “ ” for “ ”. It already exists.

en	The system could not create the address book “ ” for “ ”:

en	The system could not create the base path “ ” for the “ ” lock:

en	The system could not create the calendar “ ” for “ ”. It already exists.

en	The system could not create the calendar “ ” for “ ”:

en	The system could not create the collection “ ”:

en	The system could not create the connection to the remote server because of an error.

en	The system could not create the contact for “ ” in the address book:

en	The system could not create the contact for “ ”:

en	The system could not create the cron job entries: “ ” You must create the entries manually.

en	The system could not create the database user:

en	The system could not create the database “ ”.

en	The system could not create the file “ ”.

en	The system could not create the moderation request:

en	The system could not create the required files in the directory for “ ”. Verify that the correct owner and permissions exist for the user’s home directory.

en	The system could not create the shared address book “ ” for “ ”:

en	The system could not create the user “ ” because it conflicts with .

en	The system could not create the user. You must provide the following mandatory field:

en	The system could not create the “ ” configuration file:

en	The system could not create the “ ” installation path:

en	The system could not create the “ ” registry file:

en	The system could not create the “ ” upgrade directory:

en	The system could not create user’s directory for :

en	The system could not create your shopping cart.

en	The system could not delete the “ ” for “ ”:

en	The system could not delete the address book “ ” for “ ”:

en	The system could not delete the calendar “ ”:

en	The system could not delete the collection “ ”:

en	The system could not delete the message file “ ” with the following error:

en	The system could not delete the “ ” account. You cannot delete the “ ” account type.

en	The system could not delete the “ ” directory:

en	The system could not deliver the message.

en	The system could not deploy changes for “ ”:

en	The system could not deploy the configuration . Review the file for more details about the error.

en	file

en	files

en	The system could not deploy your configuration changes due to the following error:

en	The system could not deserialize the state from remote authority.

en	The system could not determine a home directory for the user “ ”.

en	The system could not determine if the key is saved to your account because of an error:

en	The system could not determine the IPv6 address by username:

en	The system could not determine the URL for the vendor “ ”.

en	The system could not determine the most recent address for “ ”.

en	The system could not determine the service type for the “ ” service account.

en	The system could not disable Web Analytics for the server.

en	The system could not disable all of the configuration files for the vendor “ ”:

en	The system could not disable automatic folder creation for “ ”.

en	The system could not disable notifications. Remove manually.

en	The system could not disable the configuration files.

en	The system could not disable the vendor “ ”:

en	The system could not disable the “ ” provider in “ ”. The following error occurred:

en	The system could not disable updates for the vendor “ ”:

en	The system could not discard the rule changes because the path “ ” does not exist.

en	The system could not download the file “ ”:

en	The system could not edit the collection “ ”:

en	The system could not enable Web Analytics for the server.

en	The system could not enable all of the configuration files for the vendor “ ”:

en	The system could not enable automatic folder creation for “ ”.

en	The system could not enable notifications. Create manually.

en	The system could not enable the configuration files.

en	The system could not enable the vendor “ ”:

en	The system could not enable the “ ” provider in “ ”. The following error occurred:

en	The system could not enable updates for the vendor “ ”:

en	The system could not extract all of the arguments from the directive. The remaining portion does not conform to the expected syntax:

en	The system could not extract the archive. The archive is either invalid or incomplete. Contact the distributor for assistance.

en	The system could not fetch the for “ ”:

en	The system could not fetch the certificate for the “ ” domain, or the certificate configured for the “ ” service.

en	The system could not fetch the installation script:

en	The system could not fetch the “ ” preference “ ” for “ ”: .

en	The system could not find a mailing list for this user.

en	The system could not find a range with the user in it.

en	The system could not find a shared address book with the unique “ ”.

en	The system could not find a valid available address.

en	The system could not find an address. Add addresses to this server under the heading.

en	The system could not find an available ID to use for the rule. All IDs in the designated range (1 - 99,999) are already in use.

en	The system could not find an item with “ ”.

en	The system could not find an item with “ ”.

en	The system could not find any applications.

en	The system could not find any branches for this repository.

en	The system could not find any configuration files.

en	The system could not find any domains that match your criteria.

en	The system could not find any environment variables.

en	The system could not find any repositories that match your criteria.

en	The system could not find any repositories.

en	The system could not find any templates.

en	The system could not find data in the “ ” file for user “ ”. To create data for this user, your system administrator must run the “/usr/local/cpanel/scripts/backups_create_metadata --all” command.

en	The system could not find or open the following enhancement path:

en	The system could not find the ID number for this rule.

en	The system could not find the file for “ ”.

en	The system could not find the addon domain “ ”.

en	The system could not find the backup file.

en	The system could not find the backup path.

en	The system could not find the binary for the “ ” service.

en	The system could not find the contact with the email address “ ” in the address book.

en	The system could not find the contact with the email address “ ” in the address book:

en	The system could not find the contact with the unique “ ” in the address book.

en	The system could not find the contact with the unique “ ” in the address book:

en	The system could not find the downloaded file:

en	The system could not find the function “ ” in the module “ ”.

en	The system could not find the hits with the row ID “ ”.

en	The system could not find the report URL.

en	The system could not find the report data.

en	The system could not find the repository’s .

en	The system could not find the requested resource.

en	The system could not find the rule with ID number “ ” from the “ ” vendor rule set.

en	The system could not find the rule with ID number “ ” from your user-defined rule set.

en	The system could not find the specified .

en	The system could not find the user’s unique .

en	The system could not find the “ ” binary for the “ ” service because of an error:

en	The system could not find the “ ” repository.

en	The system could not find the “ ” user at the “ ” domain.

en	The system could not find the “ ” binary in the expected location while preparing to install .

en	The system could not find the “ ” binary in the expected location while preparing to install .

en	The system could not find the “ ” binary in the expected location while preparing to install .

en	The system could not find the “ ” binary in the expected location while preparing to install .

en	The system could not fix the ownership on the home directory at “ ”.

en	The system could not generate a password that meets the minimum strength of after .

en	attempt

en	attempts

en	The system could not generate a page identifier with the . It also could not determine the “ ” for the running application.

en	The system could not generate a page identifier with the . You must specify the .

en	The system could not generate a random password that meets the minimum strength of after .

en	attempt

en	attempts

en	The system could not generate a random username after .

en	attempt

en	attempts

en	The system could not generate a valid install path for “ ” after .

en	attempt

en	attempts

en	The system could not generate an unused name based on the prefix “ ” and the suffix “ ” after .

en	attempt

en	attempts

en	The system could not generate the report because it contained unexpected attributes:

en	The system could not get records for “ ”:

en	The system could not get the records for “ ”:

en	The system could not grant the user access to the database:

en	The system could not initialize the database:

en	The system could not link “ ” to the user’s home directory because it already links to “ ”.

en	The system could not load either of the following modules:

en	The system could not load moderation requests from the following path:

en	The system could not load the MD5 file for the via module :

en	The system could not load the SSL datastore file because of an error:

en	The system could not load the SSL datastore file because of an unknown error.

en	The system could not load the SSL datastore file “ ” because it is inaccessible or owned by the wrong user.

en	The system could not load the datastore.

en	The system could not load the user attributes file from the archive because of an error:

en	The system could not load the file for the “ ” account.

en	The system could not load the with the following error:

en	The system could not load the file for the “ ” user.

en	The system could not load the data.

en	The system could not load the file:

en	The system could not load the moderation approvals from the following path:

en	The system could not load the module:

en	The system could not load the service account with the following error:

en	The system could not load the “ ” module. It may be damaged or not installed.

en	The system could not locate a compatible update for the current version:

en	The system could not locate the account information for “ ”.

en	The system could not locate the executable path:

en	The system could not locate the file “ ” while building the lexicon “ ” …

en	The system could not locate the file:

en	The system could not locate the home directory for the user “ ”.

en	The system could not locate the home directory for the user “ ”.

en	The system could not locate the owner of the domain “ ”.

en	The system could not locate the “ ” archive for the “ ” .

en	The system could not locate the “ ” directory in the extracted archive.

en	The system could not locate the “ ” instance that you wish to uninstall.

en	The system could not locate the “ ” instance that you wish to upgrade.

en	The system could not locate the “ ” instance.

en	The system could not locate the “ ” package in the path.

en	The system could not log in to the cPanel Store:

en	The system could not modify the address book permissions:

en	The system could not move the update from the temporary directory to the production directory. You must move the files in the “ ” directory to the “ ” directory manually.

en	The system could not open the directory:

en	The system could not open the home directory in order to remove the “ ” directory:

en	The system could not open the install directory :

en	The system could not open the license :

en	The system could not open the public_html directory:

en	The system could not open the public_html directory: “ ” You must manually clean up the “ ” directory.

en	The system could not open the subdomain’s “ ” directory:

en	The system could not open the user’s “ ” home directory:

en	The system could not open the “ ” backup. Select another backup to restore.

en	The system could not open the “ ” directory after the upgrade:

en	The system could not open the “ ” directory to remove “ ”:

en	The system could not open the “ ” directory:

en	The system could not open the “ ” template file.

en	The system could not open “ ” to edit it:

en	The system could not open “ ” to remove old ModSecurity logs.

en	The system could not parse the certificate because of an error:

en	The system could not parse the requested message:

en	The system could not perform “ ” statements for the due to :

en	user

en	users

en	an error

en	errors

en	The system could not perform “ ” statements on the database “ ” for the due to :

en	user

en	users

en	an error

en	errors

en	The system could not prepare the working directory:

en	The system could not process the invitation due to an unknown error.

en	The system could not process the template for “ ”:

en	The system could not process the template ‘ ’ with the following error:

en	The system could not process the template ‘ ’.

en	The system could not process your agreement:

en	The system could not prune the “ ” directory due to an error.

en	The system could not read from the repository.

en	The system could not read from “ ”.

en	The system could not read the installed Site Software package list:

en	The system could not read the installed plugins file.

en	The system could not read the message file “ ” for the email account “ ”.

en	The system could not read the “ ” upgrade directory:

en	The system could not redirect you to the File Manager interface.

en	The system could not register the :

en	The system could not register the page for the interface settings reset. Is the file missing?

en	The system could not remove one or more address books from your account.

en	The system could not remove one or more calendars from your account.

en	The system could not remove one or more task lists from your account.

en	The system could not remove the records from “ ”:

en	The system could not remove the actions from the queue for “ ”.

en	The system could not remove the search preferences for “ ”:

en	The system could not remove the address books for “ ”:

en	The system could not remove the calendars for “ ”:

en	The system could not remove the contact for “ ” in the address book with the “ ”:

en	The system could not remove the cron jobs entries: “ ” You must remove the entries manually.

en	The system could not remove the database user:

en	The system could not remove the file “ ”:

en	The system could not remove the instance from the “ ” registry file:

en	The system could not remove the metadata cache file for the vendor.

en	The system could not remove the metadata file for the vendor.

en	The system could not remove the task lists for “ ”:

en	The system could not remove the “ ( )” authentication linkage for “ ” due to an error:

en	The system could not remove the “ ” admin area passwd file:

en	The system could not remove the “ ” directory:

en	The system could not remove the “ ” directory: . You must remove the directory manually.

en	The system could not remove the “ ” file. You must remove the file manually.

en	The system could not remove the “ ” file:

en	The system could not remove the “ ” file: . You must remove the directory manually.

en	The system could not remove the “ ” file: “ ” You must remove the file manually.

en	The system could not remove the “ ” install directory:

en	The system could not remove the “ ” preference “ ” for “ ”: .

en	The system could not remove the “ ” repository in the “ ” directory.

en	The system could not remove “ ” file(s) or folder(s), :

en	The system could not remove “ ”.

en	The system could not rename “ ” to “ ” because of an error:

en	The system could not restore the MySQL database file “ ” because of an error:

en	The system could not restore the MySQL database “ ” as “ ” because of an error:

en	The system could not restore the authentication links for “ ” because it belongs to another user.

en	The system could not restore the zone “ ” because it does not match any domain on this account.

en	The system could not restore the zone “ ” because it is controlled by the user “ ”.

en	The system could not retrieve and remove all address books for “ ”.

en	The system could not retrieve and remove the calendars for “ ”.

en	The system could not retrieve and remove the task lists for “ ”.

en	The system could not retrieve data for deprecated versions of PHP.

en	The system could not retrieve the URL .

en	The system could not retrieve the address book “ ” for “ ”:

en	The system could not retrieve the address books for “ ”:

en	The system could not retrieve the attribute “ ” because it is not set.

en	The system could not retrieve the calendars for “ ”:

en	The system could not retrieve the license key automatically, installation will continue with a TRIAL license.

en	The system could not retrieve the remote branches for this repository.

en	The system could not retrieve the service status for “ ”.

en	The system could not retrieve the shared address books for “ ”:

en	The system could not run the install script:

en	The system could not run the “ ” SQL file. You must run the file manually.

en	The system could not run the “ ” file on the databases. You must run the file manually.

en	The system could not run the “ ” file on the databases. You must run the file manually.

en	The system could not run the “ ” install script and received the error code “ ”:

en	The system could not save certificate # because of an error:

en	The system could not save settings because the system failed open the configuration file.

en	The system could not save settings because the system failed open the “ ” template file.

en	The system could not save some of the settings for the following reason(s):

en	The system could not save the changes.

en	The system could not save the queue file “ ”.

en	The system could not save the upgrade information to the “ ” registry file. In this condition, you may lose the ability to manage this with the interface.

en	The system could not save your contact email address and nameservers.

en	The system could not save your contact email address.

en	The system could not save your nameservers.

en	The system could not send data to the Slack WebHook due to an error:

en	The system could not send data via to the “ ” due to an error:

en	The system could not set default identity for “ ”:

en	The system could not set the configuration. You must set the configuration manually.

en	The system could not set the file permissions to “ ” on the requested files:

en	The system could not set the “ ” preference “ ” for “ ”.:

en	The system could not transfer this session because you did not access this service over a secure connection. Please log in now to continue.

en	The system could not unassign the “ ” enhancement from the “ ” account.

en	The system could not uninstall the vendor:

en	The system could not unlink the file:

en	The system could not unlock the SSL datastore file because of an error:

en	The system could not unlock the SSL datastore file because of an unknown error.

en	The system could not update for “ ”:

en	The system could not update the with the old hostname “ ” in the “ ” address book because of the following errors:

en	The system could not update the for “ ”:

en	The system could not update the configurations for “ .” The following error occurred: “ ”

en	The system could not update the email addresses with the old hostname “ ” in the “ ” address book because of the following errors:

en	The system could not update the following domains:

en	The system could not update the zone file with IPv6 entries:

en	The system could not update the “ ” configuration file: “ ” You must update the file manually.

en	The system could not upgrade the . The upgrade patch failed because the current installation uses the legacy system.

en	The system could not validate the license for this .

en	The system could not validate the new configuration because exited with a nonzero value. produced the following error:

en	The system could not write the SSL datastore file because of an error:

en	The system could not write the SSL datastore file because of an unknown error.

en	The system could not write to “ ”.

en	The system couldn’t ensure dependencies for your application. For more information, see the instructions below.

en	The system couldn’t update your configuration cluster servers’ settings.

en	The system counts Failed Logins for the duration of the specified period, which is currently set to .

en	minute

en	minutes

en	The system created a new database for “ ”.

en	The system created a temporary database user “ ”.

en	The system created the file successfully.

en	The system created the calendar and address book resources for “ ”.

en	The system created the database “ ” since it did not exist.

en	The system created the upgrade directory:

en	The system created the “ ” contact in the address book.

en	The system created the “ ” folder for “ ”.

en	The system created the “ ” subdomain when it created the “ ” domain. To delete this subdomain, you must first delete the following :

en	domain

en	domains

en	The system created the “ ” user at the domain “ ”, but failed to send the invite because of the following error:

en	The system creates the database with this name.

en	The system currently forwards mail for “ ” to “ ”.

en	The system default version has been set to “ ”.

en	The system default version is set by the system administrator.

en	The system delayed the backup process for over while it waited on statistics processing

en	hour

en	hours

en	The system deleted ’s old leftover “ ” account (alternate email address: ).

en	The system deleted ’s old leftover “ ” account.

en	The system deleted all the message with the any of the senders from the requested , but there were warnings for .

en	message

en	messages

en	one of the messages

en	some of the messages

en	The system deleted all the message with the any of the senders from the requested .

en	message

en	messages

en	The system deleted all the messages with the any of the senders from the requested , but there were errors for .

en	message

en	messages

en	one message

en	some of the messages

en	The system deleted some of the requested , but there were errors for .

en	message

en	messages

en	one message

en	some of the messages

en	The system deleted the requested , but there were warnings for .

en	message

en	messages

en	one of the messages

en	some of the messages

en	The system deleted the requested .

en	message

en	messages

en	The system delivered the messages with any of the senders in the requested , but there were errors for .

en	message

en	messages

en	one message

en	some of the messages

en	The system delivered the messages with any of the senders in the requested , but there were warnings for .

en	message

en	messages

en	one message

en	some of the messages

en	The system delivered the messages with any of the senders in the requested .

en	message

en	messages

en	The system delivered the requested , but there were errors for .

en	message

en	messages

en	one message

en	some of the messages

en	The system delivered the requested , but there were warnings for .

en	message

en	messages

en	one message

en	some of the messages

en	The system delivered the requested .

en	message

en	messages

en	The system deselected the “all” privilege.

en	The system detected DirectAdmin version “ ” on the source server.

en	The system detected Ensim version “ ” on the source server.

en	The system detected Parallels Plesk® version “ ” on the source server.

en	The system detected template changes as a result of a change in the environment.

en	The system detected whose signatures were inactive despite valid configuration. The system has automatically enabled signatures for the following :

en	domain

en	domains

en	domain

en	domains

en	The system detected a installation. As a result, the system disabled all settings.

en	The system detected a conflict between “ ” and “ ” packages in .

en	The system detected a corruption in the database

en	The system detected a local configuration template during the service’s update.

en	The system detected a missing language handler within your web server configuration.

en	The system detected a missing “ ” handler in your “ ” web server configuration on:

en	The system detected a service account with the same username.

en	The system detected a version of that did not provide. You can not use a non- -provided package with a -provided package. If you click install, conflicts will occur.

en	The system detected an error during the version change from “ ” to “ ”, which prevented the process from completing normally.

en	The system detected an invalid hostname configuration on:

en	The system detected an invalid hostname configuration.

en	The system detected an unknown service for the “ ” service account.

en	The system detected cPanel version “ ” on the source server.

en	The system detected corruption in the following :

en	table

en	tables

en	The system detected multiple with the same attribute.

en	The system detected no issues preventing cPanel ELevate from upgrading the system to .

en	The system detected problems when it tried to restore the “ ” backup for the “ ” file. “ ”.

en	The system detected problems with the following -provided files that the Packaging System controls:

en	The system detected that sent messages to a large number of distinct recipients in an hour.

en	this email account

en	these email accounts

en	The system detected that one or more templates were updated as a result of a change in the environment.

en	The system detected the standalone package. does not support caching in standalone mode. To use caching, use in reverse proxy mode.

en	The system detected the following corrupt zone files on “ ” and automatically removed them from the configuration file:

en	The system detected the following issues which would prevent cPanel ELevate from upgrading the system to :

en	The system determined that your server is already licensed.

en	The system did not change ownership on the file “ ”: multiply-linked file (number of links: )

en	The system did not change the ownership on “ ”: the file’s did not match the user’s

en	The system did not detect processes with outdated binaries.

en	The system did not determine an address for the domain “ ” (from the “ ”).

en	The system did not enable because the disk usage check failed:

en	The system did not extract any files from the archive.

en	The system did not find a file for “ ” in the archive. The archive may be incomplete or you may be transferring from a non-cPanel WHM system.

en	The system did not find a valid integration configuration for the application “ ” for the user “ ”.

en	The system did not find an address for “ ”.

en	The system did not find an account archive for the user “ ” in any of the possible locations .

en	The system did not find any outdated services.

en	The system did not find any settings.

en	The system did not find the Certificate Authority Bundle that matches this certificate.

en	The system did not find the root certificate that corresponds to the supplied Certificate Authority Bundle’s intermediate certificate. Please supply a full Certificate Authority Bundle with the root certificate included.

en	The system did not import the user “ ” because it does not belong to: “ ”.

en	The system did not import the user “ ” with userid “ ” because it is a duplicate.

en	The system did not migrate the entries related to “ ” because it is not a valid IP address.

en	The system did not recognize the command.

en	The system did not recognize the directory list type “ ” that you requested.

en	The system did not recognize the format for “ ” when looking up the account.

en	The system did not recognize the update mode:

en	The system did not restore the previous document root for “ ” because an error prevented the system from retrieving a list of former home directories:

en	The system did not restore the previous document root for “ ” because the archive does not contain a list of the user’s previous home directories, or that list is empty.

en	The system disabled a record for “ ” due to a conflict.

en	The system disabled backup destination “ ” .

en	The system disabled firewall options. These options require or higher and a non- environment.

en	The system disabled firewall options:

en	The system disabled the setting for in order to add IP addresses to the whitelist. You must restart SSH through the page to implement the change.

en	The system disabled the feature.

en	The system disabled the following configuration directives and each requires administrator intervention:

en	The system disabled the following invalid configuration directives:

en	The system disabled the “ ” setting for in order to add IP addresses to the whitelist. The system will now restart .

en	The system disables certificate checking while the file exists.

en	The system discards configuration data that is unknown or that the system cannot validate.

en	The system does not allow using this interface to forward the account’s system email address.

en	The system does not apply quota limits to the default backup directory, /backup.

en	The system does not automatically grant access to system-created or root-created packages, unless you specifically define them below.

en	The system does not currently forward mail for “ ”.

en	The system does not have a process with ID “ ”. It is possible that a process was running but has since ended.

en	The system does not possess a valid license provisioning file, so it could not connect to the . Run the “ ” command.

en	The system does not recognize the attribute “ ” for the product with “ ” as a settable attribute.

en	The system does not recognize the “ ” parameter.

en	The system does not recreate symbolic links outside of the account’s home directory in restricted mode.

en	The system does not support running on the remote server.

en	The system does not support a “ ” filter using the “ ” operator.

en	The system does not support additional “ ” filters. To filter the “ ”, do not include any other filters.

en	The system does not support the .

en	capability

en	capabilities

en	The system does not support the algorithm “ ” with type “ ”.

en	The system does not support the algorithm “ ”.

en	The system does not support the requested action:

en	The system does not support the version of , , running on the remote server.

en	The system does not support the “ ” authentication protocol.

en	The system empties raw logs at the beginning of each month.

en	The system enabled the for the user “ ” to ensure access to the “ ”.

en	feature

en	features

en	The system encountered a problem as it attempted to stream the log data from the remote server. It will try again …

en	The system encountered a token validation error.

en	The system encountered an error as it attempted to cancel your transaction:

en	The system encountered an error as it attempted to complete your transaction.

en	The system encountered an error as it attempted to get the store login :

en	The system encountered an error as it attempted to refresh your pending certificates:

en	The system encountered an error as it attempted to request the :

en	certificate

en	certificates

en	The system encountered an error as it attempted to set the after checkout:

en	The system encountered an error as it attempted to verify the login token:

en	The system encountered an error during the attempt to restore the file. For details, check this error log, or contact your hosting provider: /usr/local/cpanel/logs/error_log .

en	The system encountered an error when it accessed the cPanel Store login :

en	The system encountered an error when it attempted to initiate a reindex of your email:

en	The system encountered an error when it attempted to process the message “ ”:

en	The system encountered an error when it generated your license order.

en	The system encountered an error when it tried to list the forwarders: “ ”.

en	The system encountered an error when it tried to save the list changes: “ ”.

en	The system encountered an error when it tried to save the new forwarders: “ ”.

en	The system encountered an error when it updated your license.

en	The system encountered an error while attempting to find a new name for the unmanaged MySQL database user “ ” before renaming it:

en	The system encountered an error while attempting to find a new name for the unmanaged PostgreSQL database user “ ” before renaming it:

en	The system encountered an error while attempting to rename the unmanaged MySQL database user “ ”:

en	The system encountered an error while attempting to rename the unmanaged PostgreSQL database user “ ”:

en	The system encountered an error while it attempted to fetch the auto login :

en	The system encountered an error while it tried to retrieve results, please refresh the interface:

en	The system encountered an error while it tried to retrieve the providers:

en	The system encountered an error while it tried to retrieve the users:

en	The system encountered an error.

en	The system encountered an error. Check your configuration and try again.

en	The system encountered an incorrectly-formatted log message:

en	The system encountered an unknown error while it attempted to fetch the auto login .

en	The system encountered an unknown error while restoring MySQL statements:

en	The system encountered errors during transport of the backup files.

en	The system encountered errors during transport of the backup files. Below is a preview of the attached log file.

en	The system encountered errors while importing accounts.

en	The system encountered the following while it tried to enable IPv6 for the selected users: .

en	error

en	errors

en	The system encountered the following while it tried to modify the external authentication link database to change domain names for the user “ ”.

en	error

en	errors

en	The system encountered the following while it tried to modify the external authentication link database to change the system username from “ ” to “ ”.

en	error

en	errors

en	The system encountered the following while it tried to remove the link data for .

en	error

en	errors

en	The system encountered the following while it tried to remove the link data for the system user “ ” and its sub-users.

en	error

en	errors

en	The system encountered the following database error and is unable to get zones from :

en	The system encountered the following error when it attempted to connect to the database:

en	The system encountered the following error while activating the “ ” provider:

en	The system encountered the following error while installing the “ ” plugin:

en	The system encountered warnings specific to your configuration.

en	The system ensured the dependencies for your application.

en	The system experienced a problem and your app was installed. Try again, or contact our support team.

en	The system experienced a timeout error while it attempted to connect to “ ”:

en	The system experienced an error when it attempted to save the new password for the following account: .

en	The system experienced an error when it attempted to save the new password.

en	The system experienced an internal error in the attempt to re-enable the vendor’s rules. The system could not find the required attributes. File a bug report with cPanel Support.

en	The system experienced an unknown error when it attempted to save the file.

en	The system experienced issues when it tried to access the email account, .

en	The system experienced the following error when it attempted to install the “ ” vendor:

en	The system experienced the following error when it attempted to remove the vendor :

en	The system failed restore the log file: “ ” because of an error: .

en	The system failed to access the email account “ ”.

en	The system failed to access the verification file “ ” for the email account “ ”.

en	The system failed to acquire the lock. Another update is in progress or has failed to complete.

en	The system failed to add an IP address to hosts because the “ ” table may be corrupted and returned the following error: .

en	The system failed to add the registry entry for “ ”:

en	The system failed to add the disinfection task to the queue.

en	The system failed to add the fingerprints from “ ” to the file:

en	The system failed to add the user to the address book. If you receive this error, copy the following message into a ticket with cPanel Support: The system failed to pass the address book to the function.

en	The system failed to add the user to the address book. The address book with the unique “ ” does not exist.

en	The system failed to add the vendor from the URL “ ”:

en	The system failed to add the “ ” to the blacklist.

en	The system failed to add the “ ” to the ignore list.

en	The system failed to add whitelist rules for “ ” while configuring access for support.

en	The system failed to advance the pointer for a file by because of an error:

en	byte

en	bytes

en	The system failed to advance the pointer for the file “ ” by because of an error:

en	byte

en	bytes

en	The system failed to allocate of disk space: .

en	The system failed to apply the IP address :

en	The system failed to apply the IP address label :

en	The system failed to apply the “ ” version to “ ”:

en	The system failed to authenticate with the server “ ” because of an error:

en	The system failed to authenticate. Please try again

en	The system failed to authorize access to the server with following error:

en	The system failed to begin polling for because of an error:

en	new certificate

en	new certificates

en	The system failed to blacklist the senders and delete the .

en	message

en	messages

en	The system failed to call “ ” because of an error:

en	The system failed to change a process’s current directory because of an error:

en	The system failed to change a process’s current directory to “ ” because of an error:

en	The system failed to change directory to “ ” because of an error:

en	The system failed to change ownership of “ ” to “ ” because of an error:

en	The system failed to change the password for the user:

en	The system failed to change the root directory because of an error:

en	The system failed to change the root directory to “ ” because of an error:

en	The system failed to change the route with the following error: -

en	The system failed to change the route, but there is no information about the error.

en	The system failed to change the server profile to “ ”.

en	The system failed to cleanly copy all of the files from “ ” to “ ” because of the following error: .

en	The system failed to cleanup some of the matching messages that were delivered.

en	The system failed to close a directory because of an error:

en	The system failed to close a file handle because of an error:

en	The system failed to close a file handle for “ ” because of the following error:

en	The system failed to close an unknown file because of an error:

en	The system failed to close the directory “ ” because of an error:

en	The system failed to close the file “ ” because of an error:

en	The system failed to complete an authentication due to a possible misconfiguration.

en	The system failed to complete its data transmission to the server “ ” because of an error:

en	The system failed to complete validation of “ ”’s “ ” because of an error:

en	The system failed to configure access permissions for the “ ” directory because of an error:

en	The system failed to connect a domain socket to “ ” because of an error:

en	The system failed to connect an Internet socket to port “ ” of “ ” because of an error:

en	The system failed to connect to an server ( ) because of an error:

en	The system failed to connect to the MySQL server as “ ” because of an error:

en	The system failed to connect to the PostgreSQL server “ ” because of an error:

en	The system failed to connect to the Roundcube data on the MySQL server as the user “ ” because of an error:

en	The system failed to connect to the “ ” database “ ” because of an error:

en	The system failed to connect to the “ ” service

en	The system failed to connect to this service’s port.

en	The system failed to connect to “ ” because of an error:

en	The system failed to connect to “ ” on port “ ” because of an error:

en	The system failed to convert “ ” to “ ” because of an error:

en	The system failed to copy the file “ ” to “ ” because of an error.

en	The system failed to copy the file “ ” to “ ” because of an error:

en	The system failed to copy the file “ ” to “ ” because of an error: “ ”.

en	The system failed to create a child process because of the following error:

en	The system failed to create a child process to chown files to the nobody user.

en	The system failed to create a hard link “ ” to “ ” because of an error:

en	The system failed to create a stub ticket with the following error:

en	The system failed to create a symbolic link “ ” to “ ” because of an error:

en	The system failed to create a temporary PostgreSQL user “ ” because of an error:

en	The system failed to create create a symbolic link “ ” to “ ” because of an error:

en	The system failed to create or deliver the requested backup.

en	The system failed to create the token:

en	The system failed to create the backup for the “ ” database.

en	The system failed to create the database “ ” because of an error:

en	The system failed to create the database “ ”:

en	The system failed to create the default calendar or address book for “ ” because of an error:

en	The system failed to create the directory “ ” as the user “ ” because of an error:

en	The system failed to create the directory “ ” because of an error:

en	The system failed to create the directory “ ” due to an error:

en	The system failed to create the file “ ” (as : , : ) because of the following error:

en	The system failed to create the file “ ” with permissions “ ” (as : , : ) because of the following error:

en	The system failed to create the mailing list “ ”.

en	The system failed to create the package “ ” because of an error:

en	The system failed to create the requested backup.

en	The system failed to create the table “ ” in the database “ ” because of an error:

en	The system failed to create the temporary directory “ ” because of an error:

en	The system failed to create the temporary file “ ” because of an error:

en	The system failed to create the user:

en	The system failed to create the “ ” mailbox because of an error:

en	The system failed to create the “ ” user with the following error:

en	The system failed to delete local mail because of an error:

en	The system failed to delete the key.

en	The system failed to delete the account. An unknown error occurred.

en	The system failed to delete the annotation record for the account “ ”.

en	The system failed to delete the cache file for “ ” because of an error:

en	The system failed to delete the database “ ” because of an error:

en	The system failed to delete the directory “ ” because of an error:

en	The system failed to delete the file “ ” as the user “ ” because of an error:

en	The system failed to delete the public key “ ”.

en	The system failed to delete the requested .

en	message

en	messages

en	The system failed to delete the secret key “ ”.

en	The system failed to delete the session with ID “ ” due to an error:

en	The system failed to delete the temporary database “ ” because of an error:

en	The system failed to delete “ ”’s account archive from the remote system because of an error:

en	The system failed to deliver or cleanup some of the matching messages.

en	The system failed to deliver some of the matching messages.

en	The system failed to deliver the requested .

en	message

en	messages

en	The system failed to deploy the changes for “ ”:

en	The system failed to detect the remote shell. This probably indicates misconfiguration on the remote host or very high system load.

en	The system failed to determine a suitable remote address for the session. Submit a “ ”.

en	The system failed to determine if its hostname ( ) resolves locally.

en	The system failed to determine if the local server is authoritative for the zone “ ” because of an error:

en	The system failed to determine if “ ” resolves to the origin server:

en	The system failed to determine the IP address for “ ” because of an unknown error.

en	The system failed to determine the status of the remote package account.

en	The system failed to determine the status of the service “ ”.

en	The system failed to determine the “ ” version on remote host “ ”.

en	The system failed to determine the “ ” version.

en	The system failed to determine whether the username is available:

en	The system failed to determine whether this certificate is saved in your home directory:

en	The system failed to determine whether “ ” exists on the filesystem because of an error:

en	The system failed to disable Force Redirect.

en	The system failed to disable Interface Analytics participation:

en	The system failed to disable because it couldn’t delete “ ” due to an error:

en	The system failed to disable ’s “ ” setting due to an error:

en	The system failed to disable the automatic whitelist.

en	The system failed to discard the staged changes for the following configuration files:

en	The system failed to download the access hash from “ ”.

en	The system failed to download the “ ” files. Contact “ ” for support.

en	The system failed to drop the MySQL user “ ” because of an error:

en	The system failed to drop the database “ ” for the user “ ” because of an error:

en	The system failed to edit the user:

en	The system failed to enable Force Redirect.

en	The system failed to enable Interface Analytics participation:

en	The system failed to enable SNI for Mail services on “ ” because of an error:

en	The system failed to enable because it couldn’t create “ ” due to an error:

en	The system failed to enable the file “ ”.

en	The system failed to ensure that the directory “ ” exists with permissions “ ” because of an error:

en	The system failed to escalate privileges to root on “ ” with “ ” or “ ” because of an error:

en	The system failed to evaluate loopback on this address because of an error:

en	The system failed to examine the archive’s MySQL data directory because of an error:

en	The system failed to execute an unknown program because of an error:

en	The system failed to execute the conversion script:

en	The system failed to execute the database script with the following errors:

en	The system failed to execute the mbx2mbox conversion as the user because of an error:

en	The system failed to execute the operation on the remote server “ ” because of an error:

en	The system failed to execute the program “ ” because of an error:

en	The system failed to execute the system call “ ” ( ) because of an error:

en	The system failed to execute the system call “ ” because of an error:

en	The system failed to execute “ ” because of an error:

en	The system failed to export data from the database “ ”:

en	The system failed to export the key “ ”.

en	The system failed to export the table structure from the database “ ”:

en	The system failed to extract a valid “ ” from the file “ ” because of an error:

en	The system failed to extract files from the archive because of the following error:

en	The system failed to extract files from the archive because the restore process was not ready in 10 seconds.

en	The system failed to extract the database script from the archive with the following error:

en	The system failed to extract the database script from the backup file “ ”.

en	The system failed to extract the files from the archive file due to the following error:

en	The system failed to extract the files from the “ ” backup file.

en	The system failed to fetch hosts because the “ ” table may be corrupted and returned the following error: .

en	The system failed to fetch domain details:

en	The system failed to fetch information about the remote server in preflight phase , and returned the error:

en	The system failed to fetch the file at “ ” because of an error (cached): .

en	The system failed to fetch the file at “ ” because of an error: .

en	The system failed to fetch the file at “ ” because of an error: . The domain “ ” resolved to an address “ ” that does not exist on this server.

en	The system failed to fetch the file at “ ”, which was redirected from “ ”, because of an error: .

en	The system failed to fetch the file at “ ”, which was redirected from “ ”, because of an error: . The domain “ ” resolved to an address “ ” that does not exist on this server.

en	The system failed to fetch the conversion job details:

en	The system failed to fetch the conversion job status:

en	The system failed to fetch the disinfect status.

en	The system failed to fetch the infected files.

en	The system failed to fetch the list of addon domains:

en	The system failed to fetch the list of conversions:

en	The system failed to fetch the scan status.

en	The system failed to fetch the status of the database “ ” because of an error:

en	The system failed to fetch the transfer session state.

en	The system failed to fetch the user’s account information because of the following error:

en	The system failed to find a product with the identifier “ ” in the .

en	The system failed to find a program named “ ”.

en	The system failed to find a suitable name for the archive’s MySQL database user “ ” on this system because of an error:

en	The system failed to find a suitable name for the archive’s MySQL database “ ” on this system because of an error:

en	The system failed to find a suitable name for the archive’s PostgreSQL database user “ ” on this system because of an error:

en	The system failed to find a suitable name for the archive’s PostgreSQL database “ ” on this system because of an error:

en	The system failed to find a “ ” record for “ ”.

en	The system failed to find an available file name.

en	The system failed to find matching records because of an error:

en	The system failed to find the for . Because of this, the system cannot find “ ”’s authoritative nameservers. See the error log for more details.

en	address

en	addresses

en	The system failed to find the file “ ” because of an error:

en	The system failed to find the home directory for the user “ ”.

en	The system failed to find the “ ” command.

en	The system failed to find the “ ” password hash for the “ ” user at the “ ” domain.

en	The system failed to flush its I/O buffers with the server “ ” because of an error:

en	The system failed to fork a new process because of an error:

en	The system failed to generate an token on “ ”.

en	The system failed to generate an unused session ID after “ ” attempts.

en	The system failed to generate the configuration file due to the following error:

en	The system failed to grant privileges on the database “ ” to the user “ ” because of an error:

en	The system failed to identify the database name due to the following error:

en	The system failed to identify the database name.

en	The system failed to ignore the senders and delete the .

en	message

en	messages

en	The system failed to initialize the file.

en	The system failed to initialize the directory “ ” with permissions “ ” because it already exists and is not a directory.

en	The system failed to initialize the directory “ ” with permissions “ ” because of an error:

en	The system failed to initiate a remote background package account due to an error:

en	The system failed to initiate an connection test for this server:

en	The system failed to initiate the conversion process: occurred

en	error

en	errors

en	The system failed to insert a session entry for “ ”.

en	The system failed to insert into the table “ ” of the database “ ” because of an error:

en	The system failed to install an certificate onto the website “ ” because of the following error:

en	The system failed to install the certificate onto the website “ ” because of the following error:

en	The system failed to install the new certificate because of an error:

en	The system failed to install “ ”’s certificate for “ ” because of the following error:

en	The system failed to list “ ”’s databases because of an error:

en	The system failed to load SSL userdata for “ ”.

en	The system failed to load and to parse the file “ ” because of an error:

en	The system failed to load original userdata for “ ” because of an error:

en	The system failed to load the .

en	The system failed to load the account summary.

en	The system failed to load the file “ ” because of an error:

en	The system failed to load the file “ ” because of an error: .

en	The system failed to load the market provider module for “ ” because of an error:

en	The system failed to load the module “ ” because of an error:

en	The system failed to load the “ ” account’s data file because of an error:

en	The system failed to locate a configuration file for the domain “ ”. Are you sure that this domain is installed on this server?

en	The system failed to locate a document root for the domain “ ”.

en	The system failed to locate a home directory for the account “ ”.

en	The system failed to locate either the file “ ” or the file “ ”.

en	The system failed to locate the email account “ ”.

en	The system failed to locate the file “ ”.

en	The system failed to locate the home directory for the email account, .

en	The system failed to locate the installed certificate for the website “ ” because of the following error:

en	The system failed to locate the message file “ ” for the email account “ ”.

en	The system failed to locate the message with Message “ ” in the queue. The system may have delivered the message during the request process.

en	The system failed to locate the message with Message “ ”. The system may have deleted the message.

en	The system failed to locate the message with Message “ ”. The system may have deleted the message:

en	The system failed to locate the requested message:

en	The system failed to locate the verification file “ ” for the email account “ ”.

en	The system failed to locate the “ ” filepath on the disk.

en	The system failed to lock ( ) an unknown file because of an error:

en	The system failed to lock ( ) the file “ ” because of an error:

en	The system failed to lock system utilities for shell restoration.

en	The system failed to lock the append-only (+a) file “ ” (as : , : ) because of the following error:

en	The system failed to lock the file “ ” (as : , : ) because of the following error:

en	The system failed to lock the file “ ” after .

en	second

en	seconds

en	The system failed to lock the immutable (+i) file “ ” (as : , : ) because of the following error:

en	The system failed to lock “ ” because of an unknown error.

en	The system failed to log agreement to the Technical Support Agreement with the following error:

en	The system failed to look up the remote address’s information because of an error:

en	The system failed to look up the remote address’s fingerprint because of an error:

en	The system failed to look up the remote address’s geographical origin because of an error:

en	The system failed to manipulate a file descriptor because of an error:

en	The system failed to migrate from the Legacy Backup system to the new Backup system. Refresh your page and try again.

en	The system failed to modify the quota for “ ” on the device “ ” because quotas are not enabled on this device. Generally you can run “ ” to fix this.

en	The system failed to modify the service account for “ ”:

en	The system failed to modify the zone “ ” to prepare for .

en	The system failed to mount the backup disk at “ ”.

en	The system failed to move the file “ ” to “ ” because of an error:

en	The system failed to move the pointer for a file back by because of an error:

en	byte

en	bytes

en	The system failed to move the pointer for a file to after the beginning because of an error:

en	byte

en	bytes

en	The system failed to move the pointer for a file to before the end because of an error:

en	byte

en	bytes

en	The system failed to move the pointer for a file to the beginning because of an error:

en	The system failed to move the pointer for a file to the end because of an error:

en	The system failed to move the pointer for the file “ ” back by because of an error:

en	byte

en	bytes

en	The system failed to move the pointer for the file “ ” to after the beginning because of an error:

en	byte

en	bytes

en	The system failed to move the pointer for the file “ ” to before the end because of an error:

en	byte

en	bytes

en	The system failed to move the pointer for the file “ ” to the beginning because of an error:

en	The system failed to move the pointer for the file “ ” to the end because of an error:

en	The system failed to multiplex filehandles because of an error:

en	The system failed to obtain filesystem information about the node that a file handle references because of an error:

en	The system failed to obtain filesystem information about “ ” because of an error:

en	The system failed to open a file handle to a scalar reference because of an error:

en	The system failed to open a socket of domain “ ” and type “ ” using the “ ” protocol because of an error:

en	The system failed to open the restore file due to an error:

en	The system failed to open the append-only (+a) file “ ” because of an error:

en	The system failed to open the append-only (+a) file “ ” for reading and writing because of an error:

en	The system failed to open the append-only (+a) file “ ” for reading because of an error:

en	The system failed to open the append-only (+a) file “ ” for writing because of an error:

en	The system failed to open the append-only (+a) file “ ” with flags because of an error:

en	The system failed to open the append-only (+a) file “ ” with permissions “ ” and flags because of an error:

en	The system failed to open the blocked mail message “ ” with the following error:

en	The system failed to open the directory “ ” because of an error:

en	The system failed to open the file “ ” because of an error:

en	The system failed to open the file “ ” for reading and writing because of an error:

en	The system failed to open the file “ ” for reading because of an error:

en	The system failed to open the file “ ” for writing because of an error:

en	The system failed to open the file “ ” with flags because of an error:

en	The system failed to open the file “ ” with permissions “ ” and flags because of an error:

en	The system failed to open the immutable (+i) file “ ” because of an error:

en	The system failed to open the immutable (+i) file “ ” for reading and writing because of an error:

en	The system failed to open the immutable (+i) file “ ” for reading because of an error:

en	The system failed to open the immutable (+i) file “ ” for writing because of an error:

en	The system failed to open the immutable (+i) file “ ” with flags because of an error:

en	The system failed to open the immutable (+i) file “ ” with permissions “ ” and flags because of an error:

en	The system failed to open the log file “ ” due to the error: “ ”

en	The system failed to open the uploaded file “ ”.

en	The system failed to open the “ ” email forwarders backup file.

en	The system failed to open the “ ” file.

en	The system failed to package the account on the remote system via connection. It will now attempt to package the account via .

en	The system failed to parse the stream data “ ” for the caller “ ” because of an error:

en	The system failed to parse the stream data “ ” from the file “ ” because of an error:

en	The system failed to parse the stream for the caller “ ” because of an error:

en	The system failed to parse the stream from the file “ ” because of an error:

en	The system failed to parse the stream:

en	The system failed to parse the response from the API:

en	The system failed to pass the ID query string parameter.

en	The system failed to prepare the database script due to the following error:

en	The system failed to prepare the database script.

en	The system failed to process your request because of an error:

en	The system failed to purge “ ”’s existing connections because of an error:

en	The system failed to query “ ” for order item “ ” ( ) because of the following error:

en	The system failed to read SSL information for the domain “ ” from the account backup because of an error:

en	The system failed to read ’s configuration file because of an error:

en	The system failed to read from the interconnected handle because of an error:

en	The system failed to read from a file handle because of an error:

en	The system failed to read from an unknown file because of an error:

en	The system failed to read from the data stream.

en	The system failed to read from the directory “ ” because of an error:

en	The system failed to read from the file “ ” because of an error:

en	The system failed to read from the input pipe with the following error:

en	The system failed to read from the remote server because of an error:

en	The system failed to read from “ ” because of an error:

en	The system failed to read from “ ” with the error:

en	The system failed to read the tokens:

en	The system failed to read the configuration file because of an error:

en	The system failed to read the archive’s grants because of an error:

en	The system failed to read the configuration file for the user “ ” because of an error:

en	The system failed to read the directory “ ” because of an error:

en	The system failed to read the file “ ” as the user “ ” because of an error:

en	The system failed to read the file “ ” because of an error:

en	The system failed to read the file “ ” because of an error: “ ”.

en	The system failed to read the scan status from “ ”. This may indicate the scan status data is missing or corrupt.

en	The system failed to read the symbolic link “ ” because of an error:

en	The system failed to read the the email filter from the backup.

en	The system failed to read the user file for “ ” because of an error:

en	The system failed to read up to from a file handle because of an error:

en	The system failed to read up to from the filehandle that contains standard input for the process that is running the command “ ”. This failure happened because of an error:

en	The system failed to read up to from “ ” because of an error:

en	The system failed to read “ ” as a symbolic link because of an error:

en	The system failed to read “ ”.

en	The system failed to read “ ”’s backup because of an error:

en	The system failed to rebuild the Mail SNI configuration. Error: “ ”.

en	The system failed to rebuild the email filter for “ ” because of an error:

en	The system failed to rebuild the mail SNI configuration on the server because of an error:

en	The system failed to rebuild “ ”’s web virtual hosts because an error happened:

en	The system failed to recreate the connection to the source server due to an error:

en	The system failed to release the lock for “ ”.

en	The system failed to release the lock on the file “ ” because of an error:

en	The system failed to remove an IP address from hosts because the “ ” table may be corrupted and returned the following error: .

en	The system failed to remove previous upgrade directory:

en	The system failed to remove the IP address :

en	The system failed to remove the IP address label :

en	The system failed to remove the SSL host for “ ” because of an error:

en	The system failed to remove the user’s files:

en	The system failed to remove the custom favicon.

en	The system failed to remove the logo.

en	The system failed to remove the message file “ ” for the email account “ ”.

en	The system failed to remove the redirect when it removed the “ ” alias.

en	The system failed to remove the user from the address book. If you receive this error, copy the following message into a ticket with cPanel Support: The system failed to pass the address book to the function.

en	The system failed to remove the user from the address book. The address book with the unique “ ” does not exist.

en	The system failed to remove the vendor “ ”:

en	The system failed to remove the verification file “ ”.

en	The system failed to remove two-factor authentication for .

en	user

en	users

en	The system failed to remove two-factor authentication for “ ”.

en	The system failed to remove verification file “ ”.

en	The system failed to remove “ ” because of the following error:

en	The system failed to remove “ ”’s remote account archive via the because of an error ( ). The system will now try to delete the account via instead.

en	The system failed to rename the database “ ” because of an error:

en	The system failed to rename “ ” because of an error:

en	The system failed to rename “ ” to “ ” because of an error:

en	The system failed to reset the status of the server “ ” because of an error:

en	The system failed to reset your account’s password. Additional information may exist in the server error log. Contact your server administrator or hosting provider.

en	The system failed to resolve the hostname, , to an address. This means either that is not set up correctly, there is no entry for “ ”, or both. Ensure that the contents of are configured correctly, and that there is a correct record entry for the hostname in the zone file.

en	The system failed to resolve your hostname ( ) to an address; no ‘host’ binary found.

en	The system failed to restart because of an error:

en	The system failed to restart “ ”.

en	The system failed to restore file because of an unrecognized format. Email forwarder file names must start with “aliases-”. Email filter files must either be a file, or they must start with “filter-” and use the filter format.

en	The system failed to restore file “ ” because you do not own the domain “ ”.

en	The system failed to restore the brand colors to the default.

en	The system failed to restore the database due to a timeout.

en	The system failed to restore the database “ ” because of an error:

en	The system failed to restore the database “ ” because the system failed to open the file “ ” because of an error:

en	The system failed to restore the database “ ” with the following error:

en	The system failed to restore the database “ ” with the following error: “ ”. The database “ ” may be corrupt.

en	The system failed to restore the email filter configuration with the following error:

en	The system failed to restore the email filters because of the following error:

en	The system failed to restore the email filters due to a timeout.

en	The system failed to restore the email forwarder configuration with the following error:

en	The system failed to restore the email forwarders due to a timeout.

en	The system failed to restore the file system due to a timeout.

en	The system failed to restore the integration group for the application “ ” because of an error:

en	The system failed to restore the integration link for the application “ ” because of an error:

en	The system failed to restore the mailman archive for “ ” because of an error: .

en	The system failed to restore the saved session.

en	The system failed to restore the “ ” database because of an error:

en	The system failed to restore the “ ” protocol link with the subject “ ” for the provider “ ” because of an error:

en	The system failed to restore “ ” functionality to “ ” ( ). Because of this, the restored “ ” functionality will reside on the local server.

en	The system failed to restore “ ”’s certificate for “ ” because of the following error:

en	The system failed to retrieve a product name.

en	The system failed to retrieve a valid path from the stream.

en	The system failed to retrieve an access token from .

en	The system failed to retrieve the account-wide personalization preferences with the error:

en	The system failed to retrieve the database list.

en	The system failed to retrieve the filesystem quota information.

en	The system failed to retrieve the list of available :

en	The system failed to revoke the token:

en	The system failed to rewind a directory handle because of an error:

en	The system failed to rewind its handle for the directory “ ” because of an error:

en	The system failed to run the “ ” upgrade script with error code “ ”:

en	The system failed to run upgrade script:

en	The system failed to sanitize the pickle file “ ” because of an error:

en	The system failed to sanitize the pickle file “ ” because the child process terminated with the error code “ ”.

en	The system failed to save a file because of an error:

en	The system failed to save the SSL userdata file for “ ” because of an error:

en	The system failed to save the archive “ ” because of an error:

en	The system failed to save the private key file “ ” to your account.

en	The system failed to save the private key to your account.

en	The system failed to save the reseller limits.

en	The system failed to save the user file for “ ” because of an error:

en	The system failed to save the “ ” configuration file: “ ”.

en	The system failed to save your new settings.

en	The system failed to save your new settings:

en	The system failed to save your other contact preferences due to the following error:

en	The system failed to send to the process that is running the command “ ” because of an error:

en	The system failed to send a new verification code to .

en	The system failed to send a note via because of an error of type “ ”: ( )

en	The system failed to send a note via because of an error: .

en	The system failed to send a note via because of an error: . The payload ( ) was also invalid.

en	The system failed to send a request to the remove server because of an error:

en	The system failed to send an “ ” request to “ ” because of an error:

en	The system failed to send an instant message to “ ” because of an error:

en	The system failed to send data to the server “ ” because of an error:

en	The system failed to send the message to the server ( ).

en	recipient

en	recipients

en	Is the recipient’s address valid?

en	Are the recipients’ addresses valid?

en	The system failed to send the message to the server “ ” because of an error:

en	recipient

en	recipients

en	The system failed to send the message sender’s identity ( ) to the server “ ” because of an error:

en	The system failed to send the “ ” request to “ ” as “ ”:

en	The system failed to set the data keys to default for the user “ ”.

en	The system failed to set the access time or the modify time for “ ”.

en	The system failed to set the group ID to “ ” on because of an error:

en	The system failed to set the group ID to “ ” on one or more append-only (+a) filesystem nodes because of an error:

en	The system failed to set the group ID to “ ” on one or more filesystem nodes because of an error:

en	The system failed to set the group ID to “ ” on one or more immutable (+i) filesystem nodes because of an error:

en	The system failed to set the group ID to “ ” on the append-only (+a) file because of an error:

en	The system failed to set the group ID to “ ” on the immutable (+i) file because of an error:

en	The system failed to set the home directory for the account. An unknown error occurred.

en	The system failed to set the password for the account. An unknown error occurred.

en	The system failed to set the permissions for the account. An unknown error occurred.

en	The system failed to set the permissions on to “ ” (as : , : ) because of the following error:

en	The system failed to set the permissions on one or more append-only (+a) inodes to “ ” (as : , : ) because of the following error:

en	The system failed to set the permissions on one or more immutable (+i) filesystem nodes to “ ” (as : , : ) because of the following error:

en	The system failed to set the permissions on one or more inodes to “ ” (as : , : ) because of the following error:

en	The system failed to set the permissions on the append-only (+a) file to “ ” (as : , : ) because of the following error:

en	The system failed to set the permissions on the immutable (+i) file to “ ” (as : , : ) because of the following error:

en	The system failed to set the user ID to “ ” and the group ID to “ ” on because of an error:

en	The system failed to set the user ID to “ ” and the group ID to “ ” on one or more append-only (+a) filesystem nodes because of an error:

en	The system failed to set the user ID to “ ” and the group ID to “ ” on one or more filesystem nodes because of an error:

en	The system failed to set the user ID to “ ” and the group ID to “ ” on one or more immutable (+i) filesystem nodes because of an error:

en	The system failed to set the user ID to “ ” and the group ID to “ ” on the append-only (+a) file because of an error:

en	The system failed to set the user ID to “ ” and the group ID to “ ” on the immutable (+i) file because of an error:

en	The system failed to set the user ID to “ ” on because of an error:

en	The system failed to set the user ID to “ ” on one or more append-only (+a) filesystem nodes because of an error:

en	The system failed to set the user ID to “ ” on one or more filesystem nodes because of an error:

en	The system failed to set the user ID to “ ” on one or more immutable (+i) filesystem nodes because of an error:

en	The system failed to set the user ID to “ ” on the append-only (+a) file because of an error:

en	The system failed to set the user ID to “ ” on the immutable (+i) file because of an error:

en	The system failed to set up services for the user “ ” at the domain “ ”:

en	The system failed to set up your requested website at “ ”.

en	The system failed to set up “ ”’s configuration.

en	The system failed to set “ ” as the primary SSL host on its IP address because of an error:

en	The system failed to setup the directory index for the “ ” directory: “ ”.

en	The system failed to shut down a socket fully because of an error:

en	The system failed to shut down a socket’s ability to read because of an error:

en	The system failed to shut down a socket’s ability to write because of an error:

en	The system failed to start a disinfection.

en	The system failed to start a scan.

en	The system failed to start the data transmission to the server “ ” because of an error:

en	The system failed to start the disinfection process in the background.

en	The system failed to start the installation for “ ” because of an error:

en	The system failed to start the session with ID “ ” because that session has been aborted.

en	The system failed to start the transfer session “ ” because of an error:

en	The system failed to start the uninstallation for “ ” because of an error:

en	The system failed to start the virus scanner in the background.

en	The system failed to stream log data from the remote server due to an error:

en	The system failed to synchronize contact information for the user “ ” because of an error:

en	The system failed to trace delivery to “ ” because of an error:

en	The system failed to transfer “ ” from the remote server because of an error:

en	The system failed to transport the backups via because the connection timed out during communication with “ ”:

en	The system failed to transport the backups via due to an error:

en	The system failed to truncate a file because of an error:

en	The system failed to truncate the file “ ” because of an error:

en	The system failed to trust any addresses.

en	The system failed to unlink because of an error:

en	The system failed to unlink the “ ” service with the following error:

en	The system failed to unlink “ ” because of an error:

en	The system failed to unlock ( ) an unknown file because of an error:

en	The system failed to unlock ( ) the file “ ” because of an error:

en	The system failed to unlock system utilities for shell restoration.

en	The system failed to untrust any addresses.

en	The system failed to update some of the hostnames with the following errors:

en	The system failed to update the Nameserver IP Address Report because of an error: .

en	The system failed to update the token:

en	The system failed to update the and records for the domain “ ” because of an error:

en	The system failed to update the record for the domain “ ” because of an error:

en	The system failed to update the record for the domain “ ” because of an error:

en	The system failed to update the record for the domain “ ” because of an error:

en	The system failed to update the record for the domain “ ” because of an error:

en	The system failed to update the record for the domain “ ” because of an error:

en	The system failed to update the record for the domain “ ” because of an error:

en	The system failed to update the brand colors.

en	The system failed to update the directory index settings for “ ” file: “ ”.

en	The system failed to update the favicon.

en	The system failed to update the file “ ” on the remote server because of an error:

en	The system failed to update the license on your cPanel WHM server.

en	The system failed to update the server software to the latest versions.

en	The system failed to update the server:

en	The system failed to update the vendor from the URL “ ”:

en	The system failed to update the verification file “ ”.

en	The system failed to update the “ ” record for “ ” because of an error:

en	The system failed to update the “ ” user with the following error:

en	The system failed to update the “ ” user’s services from the old hostname “ ” to the new hostname “ ” with the following errors:

en	The system failed to update to the latest version of version because it could not install basic requirements for . The specific failure was:

en	The system failed to update your account’s password. Additional information may exist in the server error log. Contact your server account provider, server administrator, or hosting provider.

en	The system failed to update your links.

en	The system failed to update your logos.

en	The system failed to upgrade the “ ” service account to a with the following error:

en	The system failed to upload the file “ ” to the remote server because of an error:

en	The system failed to validate domain control for the domain “ ” using the “ ” method:

en	The system failed to whitelist and deliver the requested .

en	message

en	messages

en	The system failed to whitelist and delivered the requested .

en	message

en	messages

en	The system failed to write to a file handle because of an error:

en	The system failed to write to the interconnected handle because it was unexpectedly closed.

en	The system failed to write to the interconnected handle because of an error:

en	The system failed to write sanitized pickle data into the file “ ” because of an error:

en	The system failed to write the datastore.

en	The system failed to write the file “ ” because of an error:

en	The system failed to write to the file “ ” as the user “ ” because of an error:

en	The system failed to write to the file “ ” because of an error:

en	The system failed to write to the privileges datastore for the domain “ ” because of an error:

en	The system failed to write to “ ” because of an error: .

en	The system failed to “ ” the transfer session.

en	The system finished checking .

en	user

en	users

en	The system finished writing to this log.

en	The system found :

en	outdated service

en	outdated services

en	The system found more than one match for the lookup criteria.

en	The system found the address book with the unique “ ”.

en	The system found the unexpected account type “ ” in the unified account storage.

en	The system generated the key successfully.

en	The system generated this notice on at .

en	The system grants users access to these features by default. If you disable a feature from this list, the system will disable it in every user’s that uses that list.

en	The system has but needs .

en	The system has of available.

en	The system has of total memory.

en	The system has added the account to the removal queue.

en	The system has been rebooted.

en	The system has canceled the request for this certificate; however, “ ” was already waiting on approval before processing your order. To ensure that this certificate order is canceled, you must .

en	The system has canceled this certificate. Your credit card should not be charged for this order.

en	The system has completed importing .

en	zone

en	zones

en	The system has completed the and will begin to poll for your .

en	purchase

en	purchases

en	certificate

en	certificates

en	The system has completed the installation of the “ ” plugin.

en	The system has completed the removal of the “ ” plugin.

en	The system has completed “ ”’s check.

en	The system has created a new database named “ ”.

en	The system has detected an unusually large amount of outbound email.

en	The system has detected errors with the configuration. The system attempted to repair your configuration, but failed. To resolve this issue, you must reinstall your configuration.

en	The system has detected failed attempts to create new directories or files whose filenames begin with numbers. This usually indicates a root compromise of the server.

en	The system has detected invalid domains

en	The system has detected invalid domains.

en	The system has detected that you are using 11. no longer supports 11. For more information, read the .

en	The system has detected that you use “ ”. Click to view instructions to access your Web Disk account from this operating system.

en	The system has disabled for the

en	user

en	users

en	The system has disabled changing the email routing settings for the “ ” account.

en	The system has disabled this provider module for the .

en	service

en	services

en	The system has downgraded data in the restored database “ ” because your server does not support four-byte encoding. If the database archive contains any characters that lie outside Unicode’s , the system may not have restored them. You should manually check for data corruption in the restored database.

en	The system has encountered a security violation. The home directory, “ ”, does not exist, and the system could not create it due to an error: “ ”.

en	The system has initiated a reindex of your email.

en	The system has installed the new certificate on to the .

en	website

en	websites

en	The system has not delivered a message with Message “ ” to an account that you control.

en	The system has not encountered any problems specific to your configuration.

en	The system has not finished writing to this log.

en	The system has queued a restart of .

en	The system has queued a task to install the WordPress site.

en	The system has queued a task to update existing accounts and domains so that they support and . If you close this page, the task will continue in the background. The system will log its progress in the file.

en	The system has registered a brute force attempt on security questions for the account “ ”.

en	The system has removed for rule ID “ ”. The rule no longer exists.

en	The system has removed the “ ( )” authentication linkage for “ .”

en	The system has renamed the file “ ” to “ ”

en	The system has renamed the file “ ” to “ ”.

en	The system has renamed the unprivileged MySQL database user “ ” to “ ”.

en	The system has renamed the unprivileged PostgreSQL database user “ ” to “ ”.

en	The system has restarted “ ”.

en	The system has restored the MySQL database “ ” as “ ”.

en	The system has restored the MySQL user “ ” as “ ”.

en	The system has restored the PostgreSQL database “ ” as “ ”.

en	The system has restored the PostgreSQL user “ ” as “ ”.

en	The system has restored the contents of the database “ ”.

en	The system has restored the main ’s server configuration file on “ ”.

en	The system has retrieved and installed an certificate that you ordered from “ ” in order “ ”, order item “ ”.

en	The system has saved the database archive data in the directory “ ”. You may use this directory’s contents to restore your data manually.

en	The system has skipped the unrecognized file “ ”.

en	The system has skipped zones that already exist in the database. Use the following command to manually import these zones into the database:

en	The system has successfully changed and saved Load on Boot for the “ ” app.

en	The system has successfully disabled the product “ ”.

en	The system has successfully disabled the “ ” provider in “ ”.

en	The system has successfully enabled the product “ ”.

en	The system has successfully enabled the “ ” provider in “ ”.

en	The system has successfully generated the and private key for “ ”. The system also generated a self-signed certificate that you can temporarily use until you receive a signed certificate from your SSL certificate vendor.

en	The system has successfully set the password for user “ ”.

en	The system has successfully set the per-domain pricing for the product “ ” to $ .

en	The system has successfully set the per-wildcard-domain pricing for the product “ ” to $ .

en	The system has successfully updated all authentication tokens.

en	The system has updated the for the following :

en	password

en	passwords

en	service

en	services

en	The system has validated your login credentials. Redirecting …

en	The system holds outbound emails from because you configured the system to automatically hold email from accounts that it detects as potential spammers.

en	this email account

en	these email accounts

en	The system hostname is not configured in .

en	The system identified the database name for the backup file “ ” to be “ ”.

en	The system ignored the value “ ” for the domain “ ” because the system did not restore that domain.

en	The system ignored the value “ ” for the domain “ ” because this value is not valid.

en	The system installed a new self-signed certificate to replace the expired certificate.

en	The system installed the best available certificate for the domain: .

en	The system installed the certificate onto the website “ ”.

en	The system installed “ ”.

en	The system is already performing an account conversion for “ ”.

en	The system is archiving the data to the “ ” file.

en	The system is asking you to set this PostgreSQL user’s password because you have renamed the user. This user will not be able to log in until you set its password (you may use the user’s previous password here).

en	The system is broadcasting zones to cluster. However, some receivers do not support . This will result in responses from those cluster members when queried.

en	The system is busy. Try again once the current operation is complete.

en	The system is checking the “ ” account’s domains (process “ ”).

en	The system is checking your account …

en	The system is checking your support information …

en	The system is cleaning the old data archives.

en	The system is configured to use a remote server profile. This feature is disabled and repairs will need to be made on the remote server “ ”.

en	The system is configured to use a remote database server profile. This feature is disabled and repairs will need to be made on the remote server “ ”.

en	The system is extracting the archive “ ”.

en	The system is extracting the “ ” archive file.

en	The system is extracting the “ ” backup file.

en	The system is loading configuration files.

en	The system is loading the rule vendors.

en	The system is loading the account list.

en	The system is loading your .

en	The system is loading your rules.

en	The system is not able to load your rules.

en	The system is processing the raw “ ” log for the domain “ ”.

en	The system is redirecting you.

en	The system is removing the files or directories that the upgrade specified …

en	The system is removing the old backup:

en	The system is retrieving the Blocked IP Addresses list.

en	The system is retrieving the Blocked Users list.

en	The system is retrieving the Failed Logins list.

en	The system is retrieving the One-day Blocks list.

en	The system is running a supported database.

en	The system is running the install script from the cli:

en	The system is set to the “ ” profile.

en	The system is starting to restore the database backup “ ”.

en	The system is switching from “ ” to “ ”.

en	The system is unable to access metadata. Error: “ ”.

en	The system is unable to activate the “ ” provider because the “ ” plugin is not installed.

en	The system is unable to determine the database to back up from the supplied arguments.

en	The system is unable to grant privileges for the PostgreSQL database “ ” because of an error:

en	The system is unable to grant privileges for the PostgreSQL username “ ” because of an error:

en	The system is unable to install the “ ” plugin because it is not supported on this system.

en	The system is unable to locate the account information for “ ”.

en	The system is unable to package the account due to remote command “ ” failure.

en	The system is unable to restore the MySQL database “ ” because of an error:

en	The system is unable to restore the PostgreSQL username “ ” because of an error:

en	The system is unable to restore the database “ ” because of an error:

en	The system is unable to retrieve the hostname configuration information.

en	The system is unable to set session ID “ ” for this object.

en	The system is unable to stream account transfers because encryption is disabled.

en	The system is unable to stream account transfers with accesshash authentication:

en	The system is unable to stream account transfers with password authentication:

en	The system kernel has changed from version “ ” to boot to version “ ”. While you are fully protected by KernelCare, it may still be a good idea to reboot into the latest system kernel at your earliest convenience.

en	The system kernel is at version “ ”, but an update is available:

en	The system kernel is at version “ ”, but the system is configured to boot version “ ”.

en	The system kernel is up-to-date at version “ ”.

en	The system kernel will now boot version “ ” instead of “ ”. Although still fully protects your server, we recommend that you reboot to the latest kernel version.

en	The system lacks a saved account ID for this provider.

en	The system left the corrupted database intact, and you can review the database at:

en	The system linked the temporary database user “ ” to the database “ ”.

en	The system made no changes.

en	The system mapped “ ” to the virtual host “ ” …

en	The system may be overloaded, the user’s bandwidth data may be corrupt, or the server may be receiving an unusually high level of traffic.

en	The system may require more time to clone large remote repositories.

en	The system now ignores the sender and deleted the , but there were warnings for .

en	message

en	messages

en	one of the messages

en	some of the messages

en	The system now ignores the sender and deleted the .

en	message

en	messages

en	The system now ignores the senders and deleted the , but there were errors for .

en	message

en	messages

en	one message

en	some of the messages

en	The system overwrote the old file.

en	The system performed a deprecated call within a script. As a result, the system terminated the script.

en	The system performed an invalid call within a script.

en	The system previously attempted to get a new certificate from the “ ” provider and will not make another attempt.

en	The system processed the pending certificate queue successfully, but available.

en	your pending certificate was not

en	none of your pending certificates were

en	The system queried for a temporary file at “ ”, but the web server responded with the following error: ( ). A or web server misconfiguration may exist.

en	The system queried for a temporary file at “ ”, but the web server responded with the following error: ( ). A or web server misconfiguration may exist. The domain “ ” resolved to an address “ ” that does not exist on this server.

en	The system queried for a temporary file at “ ”, which was redirected from “ ”. The web server responded with the following error: ( ). A or web server misconfiguration may exist.

en	The system queried for a temporary file at “ ”, which was redirected from “ ”. The web server responded with the following error: ( ). A or web server misconfiguration may exist. The domain “ ” resolved to an address “ ” that does not exist on this server.

en	The system queued your application to ensure its dependencies …

en	The system ran the “ ” script as “ ” for longer than 6 hours. The system will terminate this process and run the script again.

en	The system reached the timeout of while reading interconnected handles.

en	second

en	seconds

en	The system reached the timeout of while writing interconnected handles.

en	second

en	seconds

en	The system rebuilt the database because it became corrupt. Due to the nature of the rebuild process, you will need to recreate the whitelist and blacklist entries.

en	The system received an error from :

en	The system received an error from the “ ” database “ ”:

en	The system received an error from “ ” for the service “ ”:

en	The system received an error from “ ”:

en	The system received an invalid password hash.

en	The system received an unexpected status while retrieving the :

en	The system received the following error when closing the file handle for “ ”:

en	The system received unexpected attributes for the adjustment:

en	The system received unexpected output from “ ”:

en	The system recreated “ ”’s entry.

en	The system removed the .

en	The system removed the access permissions for the “ ” directory.

en	The system removed the block for:

en	The system removed the following obsolete files or directories:

en	The system removed the service: .

en	The system removed the temporary database user “ ”.

en	The system removed the “ ” domain and any associated redirections.

en	The system removed “ ”.

en	The system renamed the following configuration directives:

en	The system repaired the configuration

en	The system repaired the configuration.

en	The system replaced the incorrect main domain “ ” with the domain “ ” from the user file in order to repair the for “ ”.

en	The system replaced the service with .

en	The system requires a instance to perform filtering operations.

en	The system requires a backup id.

en	The system requires a path.

en	The system requires a username.

en	The system requires an archive or path to restore.

en	The system requires an existing user to restore to.

en	The system requires an overwrite.

en	The system reserves the “ ” document root. You must specify a document root that the system does not reserve.

en	The system reset the password to a random string because there was no password in “ ”.

en	The system restored the permissions for “ ”.

en	The system restored the password to the password in “ ”.

en	The system restored the “ ” folder permissions for “ ”.

en	The system restored the “ ” protocol link with the subject “ ” for the provider “ ”.

en	The system restores backups one at a time. The backup staging directory must be large enough to contain the largest remote backup file that you wish to restore.

en	The system restricted the upload of “ ” due to its size.

en	The system retrieved the certificate for “ ”, but failed to install it because of an error: . The system will attempt to fetch the certificate and to install it again.

en	The system sanitized permissions on “ ”.

en	The system saved an update of notification settings for your account:

en	The system saved the updated configuration to:

en	The system saved your changes.

en	The system saved your changes. To update now, click .

en	The system saved your settings locally and will apply your changes during the next update. To update now, click .

en	The system sends a notification to the administrators when templates are updated.

en	The system sends account notifications and password reset confirmations to this email address.

en	The system sends the domain “ ” in the handshake for this domain’s email.

en	The system sends this domain’s outgoing mail from a private address, “ ”. Reverse does not work with private addresses because does not store records for them.

en	The system sends “ ”’s outgoing email from the “ ” address.

en	The system sent the notification message “ ” successfully to “ ”.

en	The system sent the notification message “ ” successfully.

en	The system sent the security code to the account’s contact email address, again. Enter the security code below to complete the password reset process. If you did not set up a contact email address or you cannot access the contact email address, you cannot proceed.

en	The system sent the security code to the account’s contact email address. Enter the security code below to complete the password reset process. If you did not set up a contact email address or you cannot access the contact email address, you cannot proceed.

en	The system sent your request. You will receive an email at your contact address or account after the admin responds to your request.

en	The system set the access permissions for the “ ” directory.

en	The system skipped restoring the zone “ ” because it exceeds the maximum size of .

en	The system skipped the rebuild of the list “ ” because it does not exist in “ ”.

en	The system skipped the rebuild of the list “ ” because the account is suspended.

en	The system started a separate transport process for remote backup destinations.

en	The system started the conversion process for “ ”.

en	The system stopped waiting to connect to “ ” on port “ ” after .

en	second

en	seconds

en	The system successfully added the address book to the search preferences for “ ”.

en	The system successfully added the calendars to the free/busy list for “ ”.

en	The system successfully canceled the order.

en	The system successfully configured for the account “ ”.

en	The system successfully copied the “ ” clone to the clipboard.

en	The system successfully created an archive of the “ ” plugin.

en	The system successfully created the database and related resources.

en	The system successfully created the domain forwarder.

en	The system successfully created the “ ” repository.

en	The system successfully created your new account and website.

en	The system successfully deleted the key.

en	The system successfully deleted the package.

en	The system successfully deleted the “ ” destination.

en	The system successfully disabled the Market provider “ ”.

en	The system successfully enabled filesystem quotas on the server.

en	The system successfully enabled the Market provider “ ”.

en	The system successfully initiated the clone process for the “ ” repository.

en	The system successfully installed the .

en	The system successfully linked all of the service accounts for the “ ” user to the . The service account passwords did not change.

en	The system successfully linked all of the service accounts for the “ ” user to the . The service account passwords did not change. You must provide a new password if you wish to enable any additional services.

en	The system successfully linked the service account to the “ ” user’s . The service account passwords did not change. You must provide a new password if you wish to enable any additional services.

en	The system successfully linked the service account to the “ ” user’s . The service account passwords have not changed.

en	The system successfully linked the service account to the “ ” user’s . The service account passwords have not changed. You must provide a new password if you enable any additional services.

en	The system successfully migrated your server from the Legacy Backup system to the new Backup system.

en	The system successfully modified the address book permissions.

en	The system successfully modified the service account:

en	The system successfully parked (aliased) the domain “ ” on top of the domain “ ”.

en	The system successfully performed the custom action on the .

en	The system successfully prepared the archive for restoration.

en	The system successfully removed all calendar and address book resources for “ ”.

en	The system successfully removed the search preferences for “ ”.

en	The system successfully removed the custom favicon and restored the default favicon.

en	The system successfully removed the logo.

en	The system successfully removed the “ ” repository from the list of -managed repositories.

en	The system successfully removed the “ ” repository from the list of -managed repositories. You can use the interface to delete the repository contents.

en	The system successfully removed two-factor authentication for .

en	user

en	users

en	The system successfully removed two-factor authentication for all users.

en	The system successfully removed two-factor authentication for “ ”.

en	The system successfully restored the brand colors to the default.

en	The system successfully restored the database “ ” from the backup file “ ”.

en	The system successfully restored the email filters from the “ ” backup.

en	The system successfully restored the email forwarders from the “ ” backup.

en	The system successfully restored the “ ” backup file from the date “ ”.

en	The system successfully restored the “ ” directory from the backup file “ ”.

en	The system successfully retrieved the address book “ ” for “ ”.

en	The system successfully retrieved the address books for “ ”.

en	The system successfully retrieved the shared address books for “ ”.

en	The system successfully revoked the following :

en	token

en	tokens

en	The system successfully saved the configuration.

en	The system successfully saved the backup configuration.

en	The system successfully saved the current packages to the “ ” profile. It is available in the EasyApache 4 profiles page.

en	The system successfully saved the issuer name.

en	The system successfully saved the “ ” destination.

en	The system successfully saved your Common Mail Provider settings.

en	The system successfully saved your configuration settings.

en	The system successfully saved your configuration settings.

en	The system successfully sent the moderation request for .

en	The system successfully set the commission for the provider “ ” to “ ”.

en	The system successfully uninstalled the .

en	The system successfully unlinked the “ ” service.

en	The system successfully updated the SSL certificate for ; however, it failed to update the following :

en	service

en	services

en	The system successfully updated the records.

en	The system successfully updated the setting.

en	The system successfully updated the version to “ ”.

en	The system successfully updated the password. The following service passwords changed:

en	The system successfully updated the brand colors.

en	The system successfully updated the configurations for “ .”

en	The system successfully updated the favicon.

en	The system successfully updated the following user:

en	The system successfully updated the hostname for “ ” to “ ”.

en	The system successfully updated the hostnames for users.

en	The system successfully updated the hostnames for all users.

en	The system successfully updated the license.

en	The system successfully updated the logos.

en	The system successfully updated the pool options for the domain “ ”.

en	The system successfully updated the server:

en	The system successfully updated the “ ” password. The following service passwords changed:

en	The system successfully updated the “ ” repository.

en	The system successfully updated your links.

en	The system successfully upgraded the .

en	The system successfully uploaded your profile.

en	The system successfully validated the configuration.

en	The system suppressed . Check your browser console for the suppressed .

en	additional message

en	additional messages

en	message

en	messages

en	The system temporarily disabled this feature to enable domain and subdomain non-main docroot support.

en	The system terminated the execution of “ ” because it exceeded its allowed time ( ).

en	The system timed out while it processed “ ” bandwidth for the domain “ ”.

en	The system tried to create a filesystem link from “ ” to “ ”, but each time “ ” already existed, even though the system ed that file on each attempt.

en	time

en	times

en	The system tried to parse a buffer from the caller “ ”, but the parser received no data.

en	The system tried to parse a buffer from the file “ ”, but the parser received no data.

en	The system unblocked the IP address “ ” successfully.

en	The system unlinked “ ” because it is neither a regular file nor a directory.

en	The system updated the Certificate Authority bundle for the current SSL installation.

en	The system updated the default key type to “ ”.

en	The system updated the directory index settings for the “ ” directory.

en	The system updated the zone file for “ ” to remove IPv6 entries.

en	The system updated the zone file for “ ” with IPv6 entries that point to “ ”.

en	The system updated the “ ” record for “ ” to the following:

en	The system updated the “ ” service configuration on “ ”.

en	The system updated the “ ” value to equal the value configured for “ ”.

en	The system updated your default key type.

en	The system updated “ ” with IPv6 support.

en	The system updated “ ”’s web virtual host.

en	The system upgraded the service: “ ”.

en	The system user email account accepts email addressed to your username on the server’s hostname. Depending on the settings in the interface, it may also accept mail which is addressed to your domains but cannot be routed to another mailbox. This account’s username and password are the same as your account’s login. The account can’t be deleted and has no quota.

en	The system user “ ” does not control a MySQL database named “ ”.

en	The system user “ ” does not control a MySQL user named “ ”.

en	The system user “ ” does not control a PostgreSQL database named “ ”.

en	The system user “ ” does not control a PostgreSQL user named “ ”.

en	The system uses an alternate of “ ” when sending mail from the “ ” domain.

en	The system uses the following criteria to detect the email routing settings:

en	The system uses this branch when it pulls changes from a remote repository or deploys them.

en	The system validated domain control for the “ ” domain using the “ ” method.

en	The system was unable to add server “ ” to the configuration cluster servers list.

en	The system was unable to authenticate to the local / server on “ ”.

en	The system was unable to authenticate to the remote / server on “ ” from the “ ” server.

en	The system was unable to automatically merge your existing configuration with the new settings in version “ ” because your configuration contains incompatible custom settings or broken settings.

en	The system was unable to automatically reconnect to the server.

en	The system was unable to connect to the remote server.

en	The system was unable to convert “ ” because “ ” already exists.

en	The system was unable to convert “ ”:

en	The system was unable to copy file “ ” to “ ”:

en	The system was unable to create the schema for the table “ ” for session “ ”.

en	The system was unable to create the table schema for session “ ”.

en	The system was unable to create the thumbnail directory “ ”:

en	The system was unable to create the thumbnail for “ ”:

en	The system was unable to create “ ”.

en	The system was unable to delete from the Trusted Hosts list.

en	record

en	records

en	The system was unable to delete from the blacklist.

en	record

en	records

en	The system was unable to delete from the whitelist.

en	record

en	records

en	The system was unable to delete server “ ” from the configuration clusters list.

en	The system was unable to determine a new name for the unmanaged MySQL database user “ ”, please remove it manually.

en	The system was unable to determine a new name for the unmanaged PostgreSQL database user “ ”, please remove it manually.

en	The system was unable to determine the dimensions for “ ”.

en	The system was unable to determine the dimensions for “ ”:

en	The system was unable to export the private key:

en	The system was unable to fetch a response from “ ” because of an error:

en	The system was unable to find a valid IPv6 address.

en	The system was unable to find or install the kernel modules needed to support disk quotas.

en	The system was unable to find the “ ” enhancement.

en	The system was unable to get an access token from the remote authority at “ ”: “ ”

en	The system was unable to interpret backup data. Error: “ ”.

en	The system was unable to load the log configuration.

en	The system was unable to load the “ ” web server type:

en	The system was unable to locate the home directory for username “ ”.

en	The system was unable to locate the key with ID “ ” and the algorithm “ ”.

en	The system was unable to log in to the remote server due to an error: “ ”

en	The system was unable to move file “ ” to “ ” ( ). Resize operation failed.

en	The system was unable to parse the response from “ ” because of an error:

en	The system was unable to purge the table when it attempted to import the database.

en	The system was unable to read the zone file directory “ ”. The system encountered the following error:

en	The system was unable to refresh an access token from the remote authority at “ ”: “ ”

en	The system was unable to resize the image “ ” because the append only attribute is set.

en	The system was unable to resize the image “ ” because the immutable attribute is set.

en	The system was unable to resize the image “ ” because “ ” already exists.

en	The system was unable to resize the image “ ”:

en	The system was unable to resolve the host, “ ”, to an IP address.

en	The system was unable to resolve the hostname, “ ”, to an IP address.

en	The system was unable to resolve the system hostname “ ” to an address.

en	The system was unable to restore the outgoing mail hold for “ ” because of an error:

en	The system was unable to restore the outgoing mail suspension for “ ” because of an error:

en	The system was unable to save the configuration cluster servers list.

en	The system was unable to save the settings for “ ”.

en	The system was unable to save your document in “ ” encoding. Most likely, your document contains characters incompatible with “ ”.

en	The system was unable to send email.

en	The system was unable to send the notification because of the following error:

en	The system was unable to send the notification to “ ” because of the following error:

en	The system was unable to send the message because of an error:

en	The system was unable to submit the request:

en	The system was unable to track the domain that you entered. “ ”.

en	The system was unable to update SPF records for “ ”:

en	The system was unable to update the Apache configuration for “ ”:

en	The system was unable to update the configuration file:

en	The system was unable to update the mail configuration for “ ”:

en	The system was unable to update the named config for “ ”:

en	The system was unable to update the user data for “ ”:

en	The system was unable to upload the backup to the remote server due to an error: “ ”

en	The system white listed and delivered the requested , but there were warnings for .

en	message

en	messages

en	one of the messages

en	some of the messages

en	The system whitelisted and delivered all messages with any of the senders from the requested , but there were errors for some of the .

en	message

en	messages

en	message

en	messages

en	The system whitelisted and delivered all messages with any of the senders from the requested , but there were warnings for .

en	message

en	messages

en	one of the messages

en	some of the messages

en	The system whitelisted and delivered all messages with any of the senders from the requested .

en	message

en	messages

en	The system whitelisted and delivered some of the requested , but there were errors for .

en	message

en	messages

en	one of the message

en	some of the messages

en	The system whitelisted and delivered the requested .

en	message

en	messages

en	The system will abort any transfer processes as soon as possible. In order to prevent data loss, the system will complete ongoing restore operations before the entire session aborts.

en	The system will attempt to get a new certificate for the domains:

en	The system will attempt to install a certificate for the “ ” service from the system storage.

en	The system will attempt to renew the for .

en	certificate

en	certificates

en	The system will attempt to replace the certificate for the “ ” service with a signed certificate from the “ ” provider because it uses a weak signature algorithm:

en	The system will attempt to replace the certificate for the “ ” service with a signed certificate from the “ ” provider because none of the domains on the current certificate reside on the local server.

en	The system will attempt to replace the certificate for the “ ” service with a signed certificate from the “ ” provider because the current certificate expires in less than .

en	day

en	days

en	The system will attempt to replace the certificate for the “ ” service with a signed certificate from the “ ” provider because the system could not parse the current certificate due to an error:

en	The system will attempt to replace the certificate for the “ ” service with a signed certificate from the “ ” provider. : None of the domains on the current certificate match this server’s hostname: “ ”

en	The system will attempt to replace the expired certificate for the “ ” service with a signed certificate from the “ ” provider.

en	The system will attempt to replace the revoked certificate for the “ ” service with a signed certificate from the “ ” provider.

en	The system will attempt to replace the self-signed certificate for the “ ” service with a signed certificate from the “ ” provider.

en	The system will attempt to replace the “ ” service’s certificate with a signed certificate from the “ ” provider because it uses a key ( ) that is too weak to provide good security.

en	The system will attempt to restore the archive file “ ”.

en	The system will attempt to synchronize the current hostname “ ” to the system configuration.

en	The system will attempt to verify that the certificate for the “ ” service is still valid using .

en	The system will automatically add and configure the repository.

en	The system will automatically remove the service in and in order to continue receiving updates.

en	day

en	days

en	hour

en	hours

en	The system will automatically switch the service to in and in order to continue receiving updates.

en	day

en	days

en	hour

en	hours

en	The system will automatically upgrade the “ ” service in and in order to continue receiving updates.

en	day

en	days

en	hour

en	hours

en	The system will catalog files owned by “ ” in “ ”.

en	The system will check for the certificate for the “ ” service.

en	The system will check the for the following :

en	entry

en	entries

en	domain

en	domains

en	The system will check the again the next time that “ ” runs.

en	The system will copy data from “ ” to “ ” using multiple “ ” executions.

en	The system will create a file of .

en	The system will create a temporary database named “ ” to import the data.

en	The system will deploy any other unpublished changes when you select this checkbox.

en	The system will enable filesystem quotas the next time that you reboot the server.

en	The system will fetch the stream through Remote from host “ : ” …

en	The system will force all of the selected distributed accounts to use only the local server. Performing this action result in account data loss.

en	The system will include the following items in the backup file:

en	The system will install the following records:

en	The system will install the “ ” plugin.

en	The system will leave the original files in place at “ ” to allow for manual retrieval.

en	The system will link this service account to the .

en	The system will link this service account to the .

en	The system will link this service account to the .

en	The system will link your account to the external authentication server.

en	The system will move “ ” to “ ”.

en	The system will not add new items to the queue until you choose to resume. In order to prevent data loss, the system will complete ongoing operations.

en	The system will not attempt to get a new certificate from the “ ” provider because no suitable domains were found.

en	The system will not attempt to get a new certificate from the “ ” provider because the system hostname “ ” failed DCV.

en	The system will not attempt to replace the certificate for the “ ” service with a signed certificate from the “ ” provider because the administrator disabled this functionality.

en	The system will not attempt to replace the certificate for the “ ” service with a signed certificate from the “ ” provider because the system detected “ ”. : None of the domains on the current certificate cover this server’s hostname: “ ”

en	The system will not attempt to replace the certificate for the “ ” service with a signed certificate from the “ ” provider because the system detected “ ”. : None of the domains on the current certificate reside on the local server.

en	The system will not change the MX record, as the primary domain ( ) uses an MX record that points to a remote mail server.

en	The system will not create a file because it is not supported on Virtuozzo containers.

en	The system will not create a file because sufficient memory or space exists on your server.

en	The system will not create the team configuration file for the restored user “ ”.

en	The system will not install the unsupported packages. Do you wish to continue?

en	The system will not remove the following :

en	user

en	users

en	The system will not restore databases because this system shares a server with the source system.

en	The system will not restore the suspension reason or old shell for the account and instead will use a default.

en	The system will not restore “ ”’s archived DKIM keys.

en	The system will notify you at your current and previous contact email addresses.

en	The system will notify you if a non- certificate will expire soon.

en	The system will notify you when the password changes because of a user request.

en	The system will notify “ ” of “ ”’s new certificate.

en	The system will now change the calendar and address book hostnames from “ ” to “ ”.

en	The system will now install the new certificate.

en	The system will now update this setting to the minimum value.

en	The system will overwrite ’s database user “ ”.

en	The system will overwrite ’s existing database “ ” and its associated role.

en	The system will overwrite ’s existing database “ ”.

en	The system will overwrite any files that exist whose name matches a file name that is part of the installation.

en	The system will periodically inspect users’ installed certificates and replace those that are about to expire or that are insufficient to provide a baseline level of security.

en	The system will rebuild the configuration files (if applicable).

en	The system will redirect you in a moment.

en	The system will redirect you when the installation is complete.

en	The system will redirect you.

en	The system will remove the certificate now to ensure that no client receives it after it expires.

en	The system will remove the old files from “ ”.

en	The system will rename the unmanaged database user “ ” to “ ”.

en	The system will rename the unmanaged database “ ” to “ ”.

en	The system will rename the unmanaged role “ ” to “ ”.

en	The system will restart the server.

en	The system will restart the web server.

en	The system will restore ownership for “ ” in “ ”.

en	The system will restore subdomains, parked domains, and addon domains if they pass the server’s domain creation rules. If the server rejects the restoration of an addon domain, it will still create a subdomain associated with that addon domain.

en	The system will restore the backup in the background with a transfer session ID of “ ”.

en	The system will restore the database user “ ” as “ ” because another cPanel user owns “ ”.

en	The system will restore the database “ ” as “ ” because another cPanel user owns “ ”.

en	The system will restore the following items if they exist in the backup file:

en	The system will restore the key “ ” in another stage.

en	The system will restore the old home directory link “ ” …

en	The system will send a final notification when the quota initialization scan finishes.

en	The system will send an email to this address when leech protection redirects users from the site.

en	The system will send an email with a password reset link. This will allow the user to choose a password.

en	The system will send an email with instructions to the user’s Contact Email Address.

en	The system will skip data in table “ ” because it could not migrate the UID because it does not belong to “ ”.

en	The system will symlink “ ” to “ ”.

en	The system will undo previous changes.

en	The system will uninstall the “ ” plugin.

en	The system will update all accounts that use the extension package to use the new filename.

en	The system will update the configuration file:

en	The system will update the jail configuration.

en	The system will update the configuration.

en	The system will update the file “ ”.

en	The system will update the virtual host include files.

en	The system will update the “ ” record.

en	The system will use the signed certificate for the hostname, on the “ ” service, that it found in the system’s datastore.

en	The system “ ” version is unavailable.

en	The system’s “ ” query for “ ” failed. The system expected the “ ” value.

en	The system’s command to check or to restart this service failed.

en	The system’s core libraries or services have been updated.

en	The system’s hostname ( ) does not resolve locally. Because of this, are disabled.

en	The system’s shared IPv6 address is not in the correct format: .

en	The system’s shared IPv6 address.

en	The system’s statistics processor may not be able to keep pace with its configured schedule.

en	The system’s upload of “ ” failed unexpectedly. Retry the upload, or contact your hosting provider.

en	The table below lists the differences between Restricted and Unrestricted restores, and displays notes about each item.

en	The table “ ” does not appear in the database metadata.

en	The target path, , already exists, but is not a directory.

en	The task queue is empty. Any updates to the queue will appear here.

en	The team config file “ ” is corrupt.

en	The team owner name “ ” has been modified to “ ”.

en	The team owner “ ” does not exist.

en	The team user will be notified via email on expiry.

en	The team user “ ” does not exist.

en	The team user “ ” is not scheduled to expire at this time.

en	The team user’s expire date has been cleared.

en	The template content cannot be empty.

en	The template content has exceeded the maximum of . It is currently .

en	The template content must contain .

en	The template content must contain .

en	The template failed with an error:

en	The template name you specified is invalid.

en	The template parameter is not valid. It should be one of .

en	The template that you select determines which content you will enter in the next step.

en	The temporary wheel user “ ” operation failed with a “ ” error:

en	The text that you entered cannot be equal to “ ”.

en	The text you have entered can not be equal to “ ”.

en	The text you have entered is not equal to “ ”.

en	The third set of digits of Latitude are for Seconds. Seconds can only have up to 3 decimal places, and must be between 0 and 59.999.

en	The third set of digits of Longitude are for Seconds. Seconds can only have up to 3 decimal places, and must be between 0 and 59.999.

en	The threshold is currently emails per day.

en	The ticket system “ ” request to “ ” failed with a “ ” status code and the following error message:

en	The ticket system failed to update the Technical Support Agreement approval information, and returned a “ ” status code:

en	The tier’s current version.

en	The time at which the mail server treats a resent email as coming from a new, unknown triplet.

en	The time in seconds between updates to idle connections. Lowering this value will cause idle clients to see new messages faster, however lower values may also increase server load slightly. The default setting of 30 is recommended.

en	The time in seconds that failed logins will be stored in the authentication cache. Lowering this value may cause more work for the authentication server but decrease the likelihood of problems when passwords are updated.

en	The time in seconds that the server waits for an idle interactive connection to become active before closing it.

en	The time of the request

en	The time, in seconds, that successful logins will be stored in the authentication cache. A lower value may cause more work for the authentication server but decrease the likelihood of problems when passwords are updated.

en	The token cannot be verified.

en	The token has an invalid signature.

en	The token is invalid.

en	The token secret could not be located.

en	The top right corner of the interface will display a message until you resolve the issue.

en	The top right corner of the interface will display a reboot message until you reboot the server.

en	The transfer for session ID “ ” is complete.

en	The transfer for session ID “ ” is paused.

en	The transfer for session ID “ ” is running with PID “ ”.

en	The transfer for session ID “ ” was aborted.

en	The transfer process does stop when you close this window. To view the transfer, run the following command:

en	The transfer session id: “ ” does not exist.

en	The transfer session identifier.

en	The transfer session module “ ” can not be enqueued as a non-root user.

en	The transfer session module “ ” does not exist.

en	The transfer “ ” is already in progress.

en	The two removed interfaces now redirect to the interface.

en	The type of record that this entry represents. The and values represent the certificate authority’s domain name. The value is the location to which the authority reports exceptions.

en	The type of key that you want to import.

en	The type of key that the system will create by default for certificates and signing requests.

en	The update for vendor “ ” is unnecessary because you already have distribution “ ” installed.

en	The update of that started on at is still in progress. The email statistics database will be available after the update finishes.

en	The upgrade patch completed.

en	The upgrade process failed. You should correct any errors listed in the output window and retry the upgrade process.

en	The upgrade process succeeded.

en	The upgrade process succeeded. You should recompile any software that used the previous version.

en	The upgrade script has checked your system to see if an upgrade is possible at this time.

en	The upload failed. The server indicated error ( ).

en	The uploaded file, “ ”, is not in a valid format. Please see existing examples.

en	The user aborted the update, and the system will terminate the update.

en	The user declined the request.

en	The user does not exist.

en	The user has no linked external accounts.

en	The user has not installed any .

en	The user information payload, “ ”, does not contain a known display name.

en	The user is already installed on the only usable partition on this machine.

en	The user must accept the agreement to use this service.

en	The user name can not be empty.

en	The user name should only contain the following characters: .

en	The user pressed and aborted the “ ” script.

en	The user will set the account password.

en	The user “ ” ( ) has almost reached their disk quota.

en	The user “ ” ( ) has nearly reached their disk quota.

en	The user “ ” ( ) has reached their disk quota.

en	The user “ ” added the addon domain: “ ”

en	The user “ ” already exists on this system.

en	The user “ ” already exists, and you, “ ”, are not allowed to re-create it.

en	The user “ ” already exists.

en	The user “ ” at domain “ ” does not exist.

en	The user “ ” cannot be created because it already exists.

en	The user “ ” does not exist on the system.

en	The user “ ” does not exist on this server.

en	The user “ ” does not exist.

en	The user “ ” does not have a MySQL database named “ ”.

en	The user “ ” does not have a MySQL user named “ ”.

en	The user “ ” does not have a team configuration file. The system will not create the team file for the restored user.

en	The user “ ” does not have access to the account “ ”.

en	The user “ ” does not have any domains.

en	The user “ ” does not have the feature enabled.

en	The user “ ” is not authorized to access user “ ” to test the password.

en	The user “ ” is not authorized to access “ ” for granting permissions to all.

en	The user “ ” is not authorized to access “ ” for revoking permissions from all.

en	The user “ ” is not authorized to create database owner “ ”.

en	The user “ ” is not authorized to delete its own user ( ).

en	The user “ ” is not authorized to delete the database “ ”.

en	The user “ ” is not authorized to delete user “ ”.

en	The user “ ” is not authorized to drop the user “ ”.

en	The user “ ” is not authorized to update hosts “ ”.

en	The user “ ” is not authorized to update privileges for “ ” on the database “ ”.

en	The user “ ” is not authorized to update privileges for “ ”.

en	The user “ ” is not permitted to access the account “ ”.

en	The user “ ” is required to have the features “ ” and “ ” to manage SSL items.

en	The user “ ” is up to date.

en	The user “ ” may not change the password because you do not own “ ”.

en	The user “ ” may not create a database user named “ ” because a user with that name already exists.

en	The user “ ” was not suspended. The system will not suspend the restored user.

en	The user “ ” was suspended. The system will now attempt to suspend the restored user.

en	The user, , for Ticket ID “ ” and Server “ ” does not exist on the server. Verify that you have clicked Grant on the correct Ticket ID and Server. Access the to update the username.

en	The user, , is not valid. All usernames must conform to Linux naming conventions. Access the and update the username.

en	The user, “ ”, that owns the account in this backup is not a reseller on this system. Because of this, “ ” will own this restored account instead.

en	The user, “ ”, who owns the account in this backup uses . cannot restore accounts for non-root resellers that use linked nodes. Because of this, “ ” will own this restored account instead.

en	a linked node of type

en	linked nodes of types

en	The userdata file, “ ” could not be loaded because it exceeds the maximum size of “ ” bytes.

en	The username can only contain letters, numbers, periods, hyphens, and underscores.

en	The username can only contain the following characters:

en	The username can only include alphanumeric characters.

en	The username cannot be the same as the password.

en	The username cannot begin or end with a period.

en	The username cannot contain two consecutive periods.

en	The username cannot exceed characters.

en	The username for the API token.

en	The username is already being used by a account.

en	The username is already being used by an FTP account.

en	The username is already being used by an email account.

en	The username is not available.

en	The username must contain between and characters.

en	The username of the account to transfer.

en	The username validation routine received an empty username.

en	The user’s account in the archive uses the “ ” theme, which does not exist on this server. The system has set the restored account to use the “ ” theme.

en	The user’s domain.

en	The user’s full name.

en	The user’s password.

en	The user’s shell is already set to “ ”.

en	The user’s username.

en	The validation for the “ ” destination failed.

en	The validation for the “ ” destination succeeded.

en	The value contains spaces.

en	The value contains the following excluded characters, which are not allowed:

en	The value for “ ” ( ) is invalid. ( )

en	The value for “ ” may not be empty or undefined.

en	The value for “ ” must be a whole number between and .

en	The value for “ ” must be a whole number greater than or equal to .

en	The value for “ ” must be lower than the domain owner’s maximum spam score ( ).

en	The value must be a valid address.

en	The value must start with the “ ” character.

en	The value of the parameter “ ” is not valid for this user.

en	The value of “ ” is not valid. Configuration field values are limited to strings.

en	The value of “ ” may not be empty.

en	The value of “ ” must be one of the following:

en	The value should end with “ ”.

en	The value should only contain alphanumeric characters.

en	The value should only contain lowercase letters.

en	The value should only contain the letters and .

en	The value should only contain uppercase letters.

en	The value should start with “ ”.

en	The value that you provided is not a valid access key. This value must be a sequence of 12 lower-case alphabetic characters.

en	The value you entered is not valid.

en	The value you entered is valid.

en	The value “ ” entered for “ ” is invalid.

en	The value “ ” for the “ ” key in the user attributes file failed to validate because of an error:

en	The value “ ” for “ ” is too long by . The maximum allowed length is .

en	byte

en	bytes

en	byte

en	bytes

en	The value “ ” is not a valid feature name.

en	The vendor has reported that the commission “ ” does not exist.

en	The vendor has reported the correct price for item # as $ ( ).

en	The vendor metadata directory is not available.

en	The vendor metadata does not contain an entry for your version of , “ ”. The only of this rule set supports .

en	version

en	versions

en	is

en	are

en	The vendor name part of the file name must only contain characters in the following set: (Example: )

en	The vendor reported that the license you entered is invalid. Contact the vendor for additional assistance.

en	The vendor that provides the rule “ ” is disabled. Whether enabled or disabled, the rule will have no visible effect until you enable that vendor.

en	The vendor that provides this rule does not have a report available.

en	The vendor “ ” is already up to date.

en	The vendor “ ” is not set up.

en	The verbosity of the server in writing various log messages. Set to 1 for error messages only, 2 for errors and warnings, and 3 for errors, warnings, and information messages.

en	The verification code is required.

en	The verification code must be exactly characters in length and composed of only numbers.

en	The verification code was incorrect. Please try again.

en	The version of on your remote server, , is no longer supported. You must upgrade to one of the following options:

en	The virtfs home “ ” could not be removed from the device:

en	The web server does not run scripts as the script owner. The system must set the file permission on this application more permissively. This can result in security issues with this application on shared servers.

en	The web server does not run scripts as the script owner. With this configuration, we must set the file permission on this application more permissively. This can result in security issues with this application on shared servers. Only use this with this configuration if you use a dedicated server. To enable the more secure mode, contact your hosting provider and request that they install ruid2 or itk on the web server. After your administrator enables the module, they can run the script to adjust the security of any with this security policy.

en	The web server runs scripts as the script owner. The system can install the application with safe file permissions.

en	The webmail data includes information such as address books, calendars, and signatures.

en	The whitelist is a list of content that will be allowed into your inbox after confirmation.

en	The whitelist is empty.

en	The ‘Digest‘ must be represented by a sequence of case-insensitive hexadecimal digits. Whitespace is allowed.

en	The “ ” ( ) cannot include a query string.

en	The “ ” API module is not available on this system.

en	The “ ” failed due to the following error:

en	The “ ” handler is not installed on the system.

en	The “ ” provider attempted to renew the certificate; however, the order has not yet completed. If you correct the above , and this prevents the certificate renewal order, request help below:

en	problem

en	problems

en	The “ ” provider attempted to renew the certificate; however, the order has not yet completed:

en	The “ ” provider could renew the certificate without a reduction of coverage because of the following :

en	problem

en	problems

en	The “ ” that you requested is disabled.

en	The “ ” account does not have a shared address book.

en	The “ ” parameter is not a valid ID.

en	The “ ” is not supported by the “ ” package.

en	The “ ” access IP address has been added.

en	The “ ” account already has an IPv6 address:

en	The “ ” account does not appear to have an assigned IPv6 address. The system will now remove any other IPv6 configuration information that is with the account.

en	The “ ” account does not exist.

en	The “ ” account is a distributed account. Distributed accounts cannot use .

en	The “ ” account is not eligible for restoration on this server: “ ” accounts cannot be restored on “ ” systems.

en	The “ ” account “ ” is now authorized to access “ ” ( )

en	The “ ” account “ ” links to multiple “ ” accounts. Select the “ ” account that you wish to access.

en	The “ ” address cannot be bound:

en	The “ ” allows you to customize the way a directory appears when no index files reside in a directory.

en	The “ ” and “ ” parameters cannot be the same value.

en	The “ ” argument cannot be longer than .

en	character

en	characters

en	The “ ” argument cannot begin with “ ”.

en	The “ ” argument cannot contain special characters: .

en	The “ ” argument cannot include:

en	The “ ” argument contains the value “ ”, which contains unsupported characters. It must contain only printable characters.

en	The “ ” argument contains the value “ ”, which is an invalid value. Boolean values are either .

en	The “ ” argument contains the value “ ”, which is not a valid string.

en	The “ ” argument is invalid.

en	The “ ” argument is required.

en	The “ ” argument may only have a value of .

en	The “ ” argument must be a valid parameter type:

en	The “ ” argument must be an object of type “ ”.

en	The “ ” argument must be set to “ ”.

en	The “ ” argument must be “ ” or “ ”.

en	The “ ” argument with the value “ ” is not supported.

en	The “ ” arguments cannot be empty.

en	The “ ” binary could not be located.

en	The “ ” cPanel account is not a reseller.

en	The “ ” command (process ) ended prematurely because it received the “ ” ( ) signal.

en	The “ ” command (process ) reported error number when it ended.

en	The “ ” command failed because of an error:

en	The “ ” command is disabled or missing on the remote server “ ”:

en	The “ ” data parameter must be a “ ” type.

en	The “ ” directory already exists.

en	The “ ” directory does not exist.

en	The “ ” directory for the “ ” domain is not empty.

en	The “ ” domain is now redirected to:

en	The “ ” driver does not implement the following : .

en	option

en	options

en	The “ ” email account is almost full.

en	The “ ” email account is full.

en	The “ ” email account is nearly full.

en	The “ ” enhancement ID is not valid.

en	The “ ” enhancement contains the invalid “ ” value:

en	The “ ” enhancement file contains incomplete or corrupt data.

en	The “ ” enhancement name already exists on the system.

en	The “ ” enhancement name is reserved or contains unsupported characters.

en	The “ ” enhancement name must be between “1” and “ ” characters.

en	The “ ” error already appears on the errors list.

en	The “ ” feature is disabled due to:

en	The “ ” feature is not available. Ask your reseller about adding this feature.

en	The “ ” feature is not enabled on this system. Contact your hosting provider to enable this feature.

en	The “ ” featurelist could not be migrated.

en	The “ ” featurelist migrated successfully.

en	The “ ” featurelist was modified successfully.

en	The “ ” field cannot be left blank.

en	The “ ” field must be at least characters long.

en	The “ ” field must be at least long.

en	character

en	characters

en	The “ ” file does not exist.

en	The “ ” file must exist on disk.

en	The “ ” forward type is not allowed for webmail accounts.

en	The “ ” function already appears on the disabled functions list.

en	The “ ” handler requires the unavailable “ ” .

en	The “ ” hook denied this operation with the following error:

en	The “ ” install folder does not exist.

en	The “ ” key format is not valid.

en	The “ ” method is missing in the “ ” class.

en	The “ ” method is not available in the “ ” module.

en	The “ ” module does not contain any security rules.

en	The “ ” node type has required services. However, it does not have a required minimum version.

en	The “ ” of the Legacy Backup System is set to “ ”, but the password for “ ” is not defined.

en	The “ ” of the Legacy Backup System is set to “ ”, but the user is not defined.

en	The “ ” of the Legacy Backup System is set to “ ”, but the backup failed because “ ” could not be loaded on “ ”.

en	The “ ” option cannot be disabled in the “ ” restore module as requested.

en	The “ ” option must be a code reference.

en	The “ ” option must be a valid file handle.

en	The “ ” option requires a source server that runs version “ ” or greater. “ ” runs version “ ”.

en	The “ ” option requires a source server that runs . “ ” runs “ ”.

en	The “ ” option requires the “ ” option. Restricted Restore may not skip restoring the account.

en	The “ ” option requires the “ ” option. You may not force Restricted Restore.

en	The “ ” package conflicts with the “ ” package in .

en	The “ ” package does not expose a version number.

en	The “ ” package does not provide an executable binary.

en	The “ ” package is already in the registry.

en	The “ ” package is not available for the “ ” language.

en	The “ ” package “ ” is not installed on the system.

en	The “ ” parameter ( ) is too long. The maximum allowed length is .

en	byte

en	bytes

en	byte

en	bytes

en	The “ ” parameter cannot be decoded.

en	The “ ” parameter cannot be greater than the current time (“ ”).

en	The “ ” parameter cannot contain control characters.

en	The “ ” parameter for is empty.

en	The “ ” parameter is invalid.

en	The “ ” parameter is invalid. The only supported for this API call .

en	service

en	services

en	is

en	are

en	The “ ” parameter is invalid. The “ ” parameter may not be longer than 16 characters.

en	The “ ” parameter is invalid. The “ ” parameter must be a domain or on this server.

en	The “ ” parameter is invalid. The “ ” parameter must be a valid domain name or .

en	The “ ” parameter is missing.

en	The “ ” parameter is not a subroutine.

en	The “ ” parameter is not valid for the “ ” module.

en	The “ ” parameter is required

en	The “ ” parameter is required for the “ ” module.

en	The “ ” parameter is required, and you must pass a valid string value.

en	The “ ” parameter is required.

en	The “ ” parameter must be a reference.

en	The “ ” parameter must be a string of length less than or equal to and containing only valid hexadecimal characters:

en	The “ ” parameter must be a subdomain of an existing domain.

en	The “ ” parameter must be a valid Perl regular expression. The system returned the following error: “ ”.

en	The “ ” parameter must be a “ ” object.

en	The “ ” parameter must be an absolute path.

en	The “ ” parameter must be an array reference containing only “ ” objects.

en	The “ ” parameter must be an array reference if passed to this method.

en	The “ ” parameter must be an array reference with at least one valid archive if passed to this method.

en	The “ ” parameter must be an array reference.

en	The “ ” parameter must be an array.

en	The “ ” parameter must be an integer between 0 and “ ” inclusive.

en	The “ ” parameter must be at least long.

en	character

en	characters

en	The “ ” parameter must be greater than 0.

en	The “ ” parameter must be in email address format.

en	The “ ” parameter must be in the “ ” format.

en	The “ ” parameter must be in valid format.

en	The “ ” parameter must be less than or equal to 32 characters in length. It can only use spaces and the following characters:

en	The “ ” parameter must be less than the “ ” parameter.

en	The “ ” parameter must be numeric.

en	The “ ” parameter must be one of the following:

en	The “ ” parameter must be one of the following:

en	The “ ” parameter must be one of:

en	The “ ” parameter must be “ ” or “ ” value.

en	The “ ” parameter must be “ ”, “ ” or “ ” value.

en	The “ ” parameter must either be or long.

en	character

en	characters

en	character

en	characters

en	The “ ” parameter must have a value of either “ ” or “ ”.

en	The “ ” parameter must have at least one change.

en	The “ ” parameter must not contain the :

en	character

en	characters

en	The “ ” parameter must not exceed “ ”.

en	The “ ” parameter must only include the following:

en	The “ ” parameter must refer to an existing account.

en	The “ ” parameter value of “ ” is invalid. It must only contain alphanumeric characters.

en	The “ ” parameter “ ” is invalid and may only be one of “ ”.

en	The “ ” parameter, if given, must be one of these values:

en	The “ ” parameter’s value must be .

en	The “ ” path cannot be read.

en	The “ ” path does not exist.

en	The “ ” path provided in the “ ” parameter cannot be read.

en	The “ ” path provided in the “ ” parameter is not a directory.

en	The “ ” path provided in the “ ” parameter is not a file.

en	The “ ” plugin is not installed.

en	The “ ” preference “ ” exists for “ ”.

en	The “ ” processor child exited in the “ ” state.

en	The “ ” processor child exited unexpectedly and did not report an error.

en	The “ ” property is required.

en	The “ ” provider is obsolete and cannot be used to issue new certificates.

en	The “ ” repository is up-to-date.

en	The “ ” request to “ ” as “ ” failed because of an error:

en	The “ ” restore module failed because of an error:

en	The “ ” restore module has been skipped because it was disabled by request.

en	The “ ” restore module has the following areas disabled by request:

en	The “ ” script is not an executable.

en	The “ ” security measure is not available.

en	The “ ” server is currently unavailable because of an error:

en	The “ ” service failed because it cannot find the “ ” socket.

en	The “ ” service failed to reload because the reload script exited with an error:

en	The “ ” service failed to restart because the restart script exited with an error:

en	The “ ” service failed to start.

en	The “ ” service failed to start. Check “ ” for more details.

en	The “ ” service is deprecated on your system.

en	The “ ” service is disabled.

en	The “ ” service is down.

en	The “ ” service is down:

en	The “ ” service is not a known service.

en	The “ ” service is not configured completely. To fix this issue, go to “ ” in the WHM menu. Then, enter a username, password, and recipient. Finally, try this action again.

en	The “ ” service is not configured.

en	The “ ” service is not configured:

en	The “ ” service is not installed.

en	The “ ” service reached its memory limit while it accessed mail for the account “ ”.

en	The “ ” service’s certificate is invalid. ( ) The system will attempt to replace it with a new certificate from the “ ” provider.